arXiv:1707.00613v1 [astro-ph.SR] 3 Jul 2017

Mon. Not. R. Astron. Soc. 000, 1–16 (2002) Printed 5 July 2017 (MN L^ATEX style file v2.2)

Spectroscopic survey of Kepler stars.

II. FIES/NOT observations of A- and F-type stars

E. Niemczura^{1⋆}, M. Polińska^2, S. J. Murphy^{3,4}, B. Smalley^5, Z. Kołaczkowski^1, J. Jessen-Hansen^6, K. Uytterhoeven^{7,8}, J. M. Lykke^9, A. Triviño Hage^{7,8}, G. Michalska^1

1 Instytut Astronomiczny, Uniwersytet Wrocławski, Kopernika 11, 51-622 Wrocław, Poland 2 Astronomical Observatory Institute, Faculty of Physics, A. Mickiewicz University, Słoneczna 36, 60-286 Poznań, Poland 3 Sydney Institute for Astronomy (SIfA), School of Physics, University of Sydney NSW 2006, Australia 4 Stellar Astrophysics Centre, Department of Physics and Astronomy, Aarhus University, 8000 Aarhus C, Denmark 5 Astrophysics Group, Keele University, Staffordshire, ST5 5BG, United Kingdom 6 Stellar Astrophysics Centre, Department of Physics and Astronomy, Aarhus University, Ny Munkegade 120, DK-8000 Aarhus C, Denmark 7 Instituto de Astrofisica de Canarias, E-38205 La Laguna, Tenerife, Spain 8 Universidad de La Laguna, Departamento de Astrofisica, E-38206 La Laguna, Tenerife, Spain 9 Centre for Star and Planet Formation, Niels Bohr Institute & Natural History Museum of Denmark, University of Copenhagen, Øster Voldgade 5-7, 1350, Copenhagen K., Denmark

Accepted ... Received ...; in original form ...

ABSTRACT We have analysed high-resolution spectra of 28 A and 22 F stars in the Kepler field, observed with the FIES spectrograph at the Nordic Optical Telescope. We provide spectral types, atmospheric parameters and chemical abundances for 50 stars. Balmer, Fe i, and Fe ii lines were used to derive effective temperatures, surface gravities, and microturbulent velocities. We determined chemical abundances and projected rotational velocities using a spectrum synthesis technique. Effective temperatures calculated by spectral energy distribution fitting are in good agreement with those determined from the spectral line analysis. The stars analysed include chemically peculiar stars of the Am and λ Boo types, as well as stars with approximately solar chemical abundances. The wide distribution of projected rotational velocity, v sin i, is typical for A and F stars. The microturbulence velocities obtained are typical for stars in the observed temperature and surface gravity ranges. Moreover, we affirm the results of Niemczura et al., that Am stars do not have systematically higher microturbulent velocities than normal stars of the same temperature.

Key words: stars: abundances – stars: chemically peculiar – stars: rotation – stars: general.

1 INTRODUCTION

The high-precision Kepler photometric time series are excellent for studying the variability of stars across the Hertzsprung-Russell (H-R) diagram (Kjeldsen et al. 2010; Gilliland et al. 2015). The ultra-high precision and long duration offer unparalleled opportunities to discover and characterize stellar pulsations and consecuently to make progress in modelling stellar evolution and internal structure using asteroseismology.

To perform an asteroseismic study, the precise pulsation frequencies, mode identification, and atmospheric parameters (effective temperature T_{eff} , surface gravity log g, chemical abundances, rotational velocity v sin i) are the nec-

⋆ E-mail: eniem@astro.uni.wroc.pl essary ingredients. Pulsation frequencies can be determined from the analysis of the precise Kepler photometry. The best way to obtain information about atmospheric parameters is the investigation of high-resolution spectra. For this reason, ground-based spectroscopic observations of stars in the Kepler field began before the mission (Uytterhoeven et al. 2010).

High- and medium-resolution spectra have been collected and analysed for a substantial number of A and F-type stars (e.g. Catanzaro et al. 2011; Tkachenko et al. 2012, 2013a,b; Niemczura et al. 2015, hereafter Paper I). The atmospheric parameters obtained in those investigations are of great importance for seismic modelling of δ Scuti, γ Doradus, and γ Dor/δ Sct hybrid stars, which occupy this region of the H-R diagram. The hybrid variables are of particular interest, showing g-mode as well as p-mode pulsa-

© 2002 RAS

2 E. Niemczura et al.

tions. In such cases, two regions of the stellar interior can be probed because the g-modes propagate in the layers between the convective core and the envelope while the pmodes probe the outer layers of the envelope (Guzik et al. 2015).

An additional benefit of studying atmospheric parameters of pulsating A and F stars is the possibility to observationally define instability regions of δ Scuti, γ Doradus, and γ Dor/δ Sct hybrids on the H-R diagram. The question of purity of the pulsational instability strips has been addressed with high-resolution spectroscopy once before, when the improvement over SDSS photometry showed the DAV instability strip to be pure (Murphy et al. 2015).

From the analysis of Kepler data, Grigahcène et al. (2010), and Uytterhoeven et al. (2011) discovered a large number of hybrid star candidates, occupying a region of the T_{eff} -log g diagram broader than predicted by the current stellar pulsation theory (e.g. Guzik et al. 2015). However, the correct interpretation of the observed low-frequency modes can be difficult. For instance, Balona & Dziembowski (2011) analysed over 12, 000 Kepler stars and identified 1568 candidate δ Sct pulsators. They defined a group of δ Sct stars with low-frequency modes similar to those characteristic for γ Dor stars. Photometric atmospheric parameters place all of these stars in the γ Dor region of the H-R diagram. Accurate stellar atmospheric parameters are obligatory to place the observed γ Dor/δ Sct hybrids in the H-R diagram.

The investigation of Kepler data revealed A and F-type stars located in the δ Scuti or γ Doradus instability regions but showing no variability (Guzik et al. 2015; Murphy et al. 2015). The simplest explanation of this phenomenon is that the atmospheric parameters are incorrect. If so, the determination of accurate values would place the star outside the instability regions. Other explanations are observational constraints preventing the detection of oscillations with amplitudes below the noise level of the data, or the existence of a physical mechanism that inhibits pulsations for some stars. The problem of non-pulsating A and F stars is widely discussed in Guzik et al. (2015) and Murphy et al. (2015).

The analysis of large samples of A and F stars helps in finding answers to many questions concerning these stars and their atmospheres in general, like the v sin i distribution and the influence of fast rotation on chemical abundances, the dependence of microturbulent velocity on effective temperature and surface gravity, and the reasons for peculiar abundances of chemical elements among A and F stars.

This paper is organised as follows. In Sect. 2, we describe observational data used in the analysis, methods of data reduction, calibration and normalisation. The methods applied for spectral classification and for determining the atmospheric parameters of the investigated objects, together with the sources of possible errors are given in Sect. 3. The results are discussed in Sect. 4. The sample of chemically peculiar (CP) stars are discussed in Sect. 5. Positions of the stars in the log T_{eff} – log g diagram and the discussion of their pulsation properties are shown in Sect. 6. Conclusions and future prospects are given in Sect. 7.

2 SPECTROSCOPIC SURVEYS OF Kepler STARS

In this work we analyse the spectra taken with the crossdispersed, fibre-fed échelle spectrograph FIES (Telting et al. 2014), attached to the 2.56-m Nordic Optical Telescope (NOT) located on La Palma (Canary Islands, Spain). The obtained spectra have ‘medium’ R ∼ 46 000 or ‘low’ R ∼ 25 000 resolving power and cover the visual spectral range from 3700 to 7300 Å. Signal-to-noise (S/N) ratio for an individual spectrum at 5500 Å is 80–100.

The spectra have been reduced with a dedicated Python software package FIEStool^1 (Telting et al. 2014) based on iraf^2. The standard procedures have been applied, which includes bias subtraction, extraction of scattered light produced by the optical system, cosmic ray filtering, division by a normalized flat-field, wavelength calibration by a ThArNe lamp, and order merging. Normalisation to the continuum was performed using the standard iraf procedure continuum. The accuracy of the normalisation was tested by fitting synthetic spectra to four Balmer lines (Hα, Hβ, Hγ, Hδ) in the spectrum of each star. The normalisation process was successful if all hydrogen lines can be fitted satisfactorily with the same T_{eff} . Otherwise, the whole procedure is repeated. If several spectra were available for a star, we analysed the averaged spectrum. The averaging process is applied after normalization and forms an additional test of the quality of the normalization process.

The data analysed here were collected during the spectroscopic survey carried out between 2010 and 2012. The stars were selected on the basis of spectral types and photometric atmospheric parameters available in the Kepler Input Catalogue (KIC, Brown et al. 2011) as a potential δ Sct, γ Dor or hybrid variables.

Table 1 lists the stars analysed and gives their KIC numbers, year of the observations, number of spectra and their resolution, visual (V ) magnitudes, and spectral types taken from the literature and determined in the current work. We also provide notes on chemical peculiarity resulting from spectral classification and spectroscopic analysis, type of binarity, and pulsation characteristics obtained from Kepler data analysis.

3 ATMOSPHERIC PARAMETERS

The basic information about the stars and the initial stellar atmospheric parameters were derived from spectral classification, spectral energy distribution (SED) analysis, and taken from the catalogue of Huber et al. (2014, hereafter H2014). Effective temperatures, surface gravities and metallicities determined by these methods were used as input parameters for the high-resolution spectroscopic data analysis. The atmospheric parameters are refined by analysis of the spectral lines, guided by our spectral classifications.

(i) Spectral classification – We compared the spectra of the studied stars with those of standards (Gray & Corbally 2009). Our sample consists of A and early F stars, so the

1 http://www.not.iac.es/instruments/fies/fiestool/FIEStool.html 2 Image Reduction and Analysis Facility,

http://iraf.noao.edu/

Spectroscopic survey of Kepler stars 3

Table 1. Journal of spectroscopic observations, the derived spectral classes, and variability classification. N is the number of available spectra; SpT1 indicates the spectral classification from the literature, whereas SpT2 means spectral classifications obtained in this work. Additional notations for luminosity class: “b” – lower luminosity main-sequence star; “a” or “a+” – higher luminosity main-sequence star; “IV-V” – between IV and V; “IV/V” – either IV or V; “n” – nebulous (e.g. broad-lined); “s” – sharp lines; “nn” – very rapid rotators; “met wk” – weak metal lines; “met str” – strong metal lines. In the last column additional information taken from spectra and Kepler data are presented. “SB2” means double-lined spectroscopic binary; “EB” – eclipsing binary; “ell. var.” – ellipsoidal variable; “hybrid” – frequencies of γ Dor and δ Sct visible in periodogram; “HADS” – high amplitude δ Sct variable; “cont.” – Kepler data contaminated by a nearby star; “unknown” – unknown variability type.

KIC Obs. N Resolving V SpT1 SpT2 Notes Number year power [mag] (literature) (this work)

KIC 2162283 2010 1 med 9.47 F21 Am+F EB, ell. var., δ Sct KIC 2694337 2010 1 low 10.35 F0.5 IVs6 A9 (met str F3) γ Dor/δ Sct hybrid KIC 3217554 2010 1 med 9.56 A51 A3 IVn SB2, γ Dor (γ Dor/δ Sct hybrid?), cont. KIC 3219256 2010 1 med 8.31 A8 V2 A9 V γ Dor/δ Sc hybrid KIC 3331147 2011 1 med 10.06 – F0.5 Vs γ Dor KIC 3429637 2010 2 med 7.72 kF2 hA9 mF33,F0 III2 kF0 hA8 mF0 IIIas δ Sct (γ Dor/δ Sct hybrid?) KIC 3453494 2010 1 med 9.53 A7 IV4 A4 Vn γ Dor/δ Sct hybrid KIC 3858884 2010 2 med 9.28 F55 kA8 hF0 mF2.5 III Am: SB2, EB, δ Sct KIC 3868420 2011 1 med 9.88 – A9 Vs (Ca wk A4) HADS (γ Dor/δ Sct hybrid?) KIC 4647763 2012 2 low 10.89 – F0.5 IV-III δ Sct/γ Dor hybrid KIC 4840675 2010 1 med 9.66 F0 Vn13 F0 Vn SB2, δ Sct/γ Dor hybrid KIC 5641711 2010 2 low 10.51 F01 F0 Vn SB2, δ Sct/γ Dor hybrid KIC 5880360 2010 1 med 8.75 A01 A3 IVan unknown (γ Dor?), 0 − 7 c/d KIC 5988140 2010 1 med 8.81 A8 IIIs6 A9 IV δ Sct KIC 6123324 2010 1 med 8.71 F01 F2.5 Vn δ Sct/γ Dor hybrid? KIC 6279848 2010 1 med 9.23 F01 F1.5 IVs (met wk A9) δ Sct/γ Dor hybrid KIC 6370489 2011 1 med 8.79 F8 V7 F5.5 V solar-like oscillations KIC 6443122 2011 1 med 11.10 – F0 IVs δ Sct/γ Dor hybrid KIC 6670742 2010 1 med 9.10 A51 F0 Vnn (met wk A7) δ Sct/γ Dor hybrid KIC 7119530 2010 1 med 8.44 A3 IVn6 A3 IVn δ Sct/γ Dor hybrid KIC 7122746 2012 2 low 10.62 – A5 Vn δ Sct/γ Dor hybrid? KIC 7668791 2010 1 med 9.21 A21 A5/7 IV/V δ Sct KIC 7748238 2011 1 med 9.54 A9.5 V-IV4 F1 V (met wk F0) δ Sct/γ Dor hybrid KIC 7767565 2010 1 med 9.29 kA5 hA7 mF1 IV Am6 kA5 hA7 mF1 IV Am γ Dor KIC 7773133 2012 1 low 10.93 – F0 IIIas δ Sct (δ Sct/γ Dor hybrid?) KIC 7798339 2010 1 med 7.85 F3 IV2 F1.5 IV γ Dor KIC 8211500 2010 1 med 8.08 A5 IV8 A6 V unknown (γ Dor?) KIC 8222685 2010 1 med 8.89 F0 V9 F0 V γ Dor KIC 8694723 2011 1 med 8.92 G0 IV7 hF6 mF2 gF5 V solar-like oscillations KIC 8827821 2012 1 low 11.14 – A8 IV-V δ Sct/γ Dor hybrid? KIC 8881697 2010 1 low 10.50 A59 A8 Vn δ Sct/γ Dor hybrid KIC 8975515 2010 1 med 9.48 A6 V:6 A7 IV SB2, δ Sct/γ Dor hybrid KIC 9229318 2010 1 med 9.59 F01 A8 III (met str F0) δ Sct/γ Dor hybrid KIC 9349245 2010 1 med 8.11 Am:10 F2 IIIs constant KIC 9408694 2011 2 med 11.48 – F0 IVs + ? HADS (δ Sct/γ Dor hybrid?) KIC 9410862 2012 2 low 10.78 – F6 V solar-like oscillations KIC 9650390 2010 1 med 9.32 A01 A3 IV-Vnn (met wk A2.5) δ Sct/γ Dor hybrid KIC 9655114 2010 1 low 12.03 A411 A5 Vn SB2, δ Sct + cont. KIC 9656348 2010 3 low 10.28 – hA9 kA4m A4 V λ Boo δ Sct/γ Dor hybrid KIC 9828226 2012 1 low 9.92 hA2 kA0 mB9 Vb6 hA2 kB9.5 mB9 Vb λ Boo δ Sct/γ Dor hybrid KIC 9845907 2012 3 low 11.42 – A4 IVs δ Sct KIC 9941662 2011 1 med 9.95 A01 kA2 hA5 mA7 (IV) Am: constant, planet transit KIC 9970568 2010 1 med 9.58 A4 IVn6 A8 Vnn (met wk A4) δ Sct/γ Dor hybrid KIC 10030943 2011 2 med 11.45 – F1.5 IV-V ell. var., δ Sct KIC 10341072 2010 1 med 8.95 F81 F6 III unknown KIC 10661783 2011 1 med 9.53 A21 A5 IV EB, δ Sct KIC 10717871 2012 1 low 10.52 – F0 V γ Dor/δ Sct hybrid KIC 11044547 2012 1 low 9.94 A01 A2 Vs δ Sct (δ Sct/γ Dor hybrid?) KIC 11622328 2010 1 med 9.42 A21 A4.5 Vn unknown (γ Dor?) KIC 11973705 2010 1 med 9.09 B8.5IV-V12 hF0.5 kA2.5m A2.5 V λ Boo ell. var., δ Sct/γ Dor hybrid

1 Heckmann & Dieckvoss (1975); 2 Catanzaro et al. (2011); 3 Abt (1984); 4 Tkachenko et al. (2012); 5 Kharchenko (2001); 6 Paper I; 7 Molenda-Żakowicz et al. (2013); 8 Murphy et al. (2015); 9 Macrae (1952); 10 Catanzaro et al. (2015); 11 Lindoff (1972); 12 Lehmann et al. (2011). 13 this work

spectral type is derived from hydrogen, Ca K and metal lines. For non-CP stars these three sets of lines provide the same spectral type. For CP stars (Am, marginal Am:, λ Boötis) different spectral types are derived. For early A stars the luminosity class is obtained from hydrogen lines, whereas for later types, the lines of ionised Fe and Ti became useful.

The literature and new spectral classifications of the investigated stars are given in Table 1. The spectral classification process revealed CP stars of Am, Am: and λ Boötis type. Some of these stars were already known peculiar stars

(KIC 3429637: Am:, Murphy et al. 2012), (KIC 7767565 and KIC 9828226: Am and λ Boo, Niemczura et al. 2015). We classified one new Am: star (KIC 3858884) and two λ Boo objects (KIC 9656348, KIC 11973705).

Eight stars from our sample were also analysed in Paper I based on the high-resolution HERMES spectra (see Table 1). We took this opportunity to check the influence of spectral resolution, S/N and normalisation process on the spectral classification results. No differences in classification were found for KIC 7119530 (A3 IVn) and CP stars KIC 7767565 (kA5 hA7 mF1 IV Am), KIC 9828226 (hA2 kA0 mB9 Vb and

© 2002 RAS, MNRAS 000, 1–16

4 E. Niemczura et al.

hA2 kB9.5 mB9 Vb, the negligible difference in spectral type from Ca lines). Minor differences, none more than one temperature subclass or one luminosity class were found for KIC 5988140 (A8 IIIs and A9 IV), KIC 8975515 (A6 V: and A7 IV), and KIC 2694337 (F0.5 IVs and A9 met strong F3). Larger differences were found for the very fast rotating star KIC 9970568 (A4 IVn and A8 Vnn met wk A4). This could be a consequence of differences in the normalisation of the broad, blended spectral lines.

(ii) Interstellar reddening – SEDs are affected by interstellar reddening E(B − V ). Therefore, we estimated this parameter using the equivalent width of the interstellar Na D2 (5889.95 Å) line. E(B − V ) values were obtained from the relation given by Munari & Zwitter (1997). The equivalent widths of the individual components were measured for those with resolved multi-component interstellar Na D2 lines. Because the interstellar reddening is additive (Munari & Zwitter 1997), the total E(B − V ) is the sum of the reddening per component.

In Fig. 1, the spectroscopic interstellar reddenings E(B − V )(Na) were compared with E(B − V ) values from the KIC catalogue, E(B − V )(KIC), for stars analysed here and those taken from Paper I. The current results fully confirm those obtained in Paper I. The photometric interstellar reddenings given in the KIC are higher than E(B − V )(Na) and the differences increase with effective temperature. The highest differences between E(B − V )(Na) and E(B − V )(KIC) were obtained for faint stars (KIC 10030943, KIC 6443122, KIC 9408694, KIC 9845907).

(iii) Spectral Energy Distributions – Stellar effective temperatures T_{eff} were determined from SEDs, constructed from the available photometry and TD-1 ultraviolet fluxes (Carnochan 1979). For photometric data we searched the same photometric catalogues as in Paper I. The constructed SEDs were de-reddened using the appropriate analytical extinction fits of Seaton (1979) and Howarth (1983) for the ultraviolet and the optical and infrared spectral ranges, respectively.

As in Paper I, we obtained T_{eff} values using a non-linear least-squares fit to the SED. We fixed log g = 4.0 and [M/H] = 0.0 for all of the stars, since they are poorly constrained by the SED. The results are given in Table 2. The uncertainties in T_{eff} include the formal least-squares error and those due to the assumed uncertainties in E(B − V ) of ±0.02 mag, log g of ±0.5 and [M/H] of ±0.5 dex. The latter two were included to assess the effect of the assumed fixed values log g and [M/H] on the T_{eff} obtained from the SED. The four individual contributions to the uncertainties in T_{eff} were added in quadrature, but overall uncertainty is mostly dominated by the formal least-squares error.

(iv) Balmer lines – The values of T_{eff} were obtained using the sensitivity of Balmer lines to this parameter, following the method proposed by Catanzaro et al. (2004). On the other hand, hydrogen lines are not good indicators of log g for effective temperatures lower than about 8000 K. Therefore, for almost all stars but two (KIC 9828226 and KIC 11044547), the initial surface gravity was assumed to be equal to 4.0 dex. We used an iterative approach to minimize the differences between observed and theoretical Hδ, Hγ and Hβ profiles (see Catanzaro et al. 2004). The effective temperature obtained from the Balmer lines was then revisited when a log g value from the Fe lines was available.

The uncertainties in log g and continuum placement were accounted for when estimating the uncertainty in the derived values. First, we take into account the differences in the determined T_{eff} values from separate Balmer lines. Next, we check the influence of the assumed log g value on the final T_{eff} value. For most stars, the obtained uncertainties equal 100 K (this is the step of T_{eff} in the grid of synthetic fluxes). The bigger errors are caused by incorrect normalisation (see Table 2).

(v) Iron lines – The atmospheric parameters, chemical compositions, and v sin i were determined through the analysis of lines of neutral and ionised iron. In general, we required that the abundances obtained from Fe i and Fe ii lines yield the same result. The detailed analysis of the iron lines was fully discussed in Paper I. In brief, we proceeded according to the following scheme:

– microturbulence ξt was adjusted until there was no correlation between iron abundances and line depths for the Fe i lines;

– T_{eff} was changed until there was no trend in the abundance versus excitation potential for the Fe i lines; and – log g was obtained by requiring the same Fe abundance from the lines of both Fe ii and Fe i ions.

For hotter stars, with more Fe ii than Fe i lines visible in the spectra, the Fe ii lines were used to determine T_{eff} and ξt. This approach is limited by stellar rotation, since line blending grows rapidly with v sin i. In cases where the analysis of individual lines was impossible we assumed that the iron abundances obtained from different spectral regions are the same for the correct T_{eff} , log g and ξt values. The analysis relies on the same physics, regardless of rotation (see Paper I for further explanation).

We analysed the metal lines using spectrum synthesis, relying on an efficient least-squares optimisation algorithm (see Paper I). The chosen method allows for a simultaneous determination of various parameters influencing stellar spectra. The synthetic spectrum depends on T_{eff} , log g, ξt, v sin i, and the relative abundances of the elements. Due to the fact that all atmospheric parameters are correlated, the T_{eff} , log g and ξt parameters were obtained prior to the determination of chemical abundances. The remaining parameters (chemical abundances and v sin i) were determined simultaneously. The v sin i values were determined by comparing the shapes of observed metal line profiles with the computed profiles, as shown by Gray (2005). Chemical abundances and v sin i values were determined from many different lines or regions of the spectrum. In the final step of the analysis, we derived the average values of v sin i and abundances of all the chemical elements considered for a given star.

We used atmospheric models (plane-parallel, hydrostatic and radiative equilibrium) and synthetic spectra computed with the line-blanketed, local thermodynamical equilibrium (LTE) code ATLAS9 (Kurucz 1993a). The grid of models was calculated for effective temperatures between 5000 and 12000 K with a step of 100 K, surface gravities from 2.0 to 4.6 dex with a step of 0.1 dex, microturbulence velocities between 0.0 and 6.0 km s^{−1} with a step of 0.1 km s^{−1}, and for metallicities of 0.0, −0.5 and −1.0. The synthetic spectra were computed with the SYNTHE code (Kurucz

Spectroscopic survey of Kepler stars 5

Figure 1. Left panel: the differences ΔE(B − V ) = E(B − V )(Na) − E(B − V )(KIC) as a function of T_{eff} (Fe). A linear function is fitted (solid line). The open circles represent results taken from Paper I. The filled circles indicate the results obtained here. Right panel: the distribution of differences ΔE(B − V ) for Paper I stars (HERMES observations, light gray histogram) and objects analysed here (FIES observations, dark gray histogram). Arithmetic means and standard deviations of both distributions are indicated in the figure.

1993b). Both codes, ATLAS9 and SYNTHE, were ported to GNU/Linux by Sbordone (2005) and are available online^3. We used the line list of Castelli & Hubrig (2004). In our method we take into account all elements that show lines in the chosen spectral region. Elements with little or no influence are assumed to have solar abundances or abundances typical for the analysed star. The stellar rotation and signalto-noise ratio of the spectrum dictate which elements will be analysed. The atmospheric parameters obtained from our analysis are given in Table 2, and the abundances of analysed elements are given in Table B1.

The derived atmospheric parameters and chemical abundances are influenced by errors from a number of sources: – several assumptions, e.g., plane parallel geometry (1-D), and hydrostatic equilibrium (Kurucz 1993a), made in the atmosphere models used to compute the synthetic spectra; adopted atomic data (see Kurucz 2011); non-LTE effects for Fe i and Fe ii lines (see Mashonkina 2011). These error sources have already been discussed in Paper I. – the quality (resolution, S/N) and wavelength range of the observed spectra, as well as their normalisation can influence the results. The difficulty of normalisation increases for heavily blended spectra of stars with v sin i higher than about 100 km s^{−1}, even for high-resolution and high S/N data. This problem was also discussed by Ryabchikova et al. (2016) and Kahraman Aliçavuş et al. (2016). For a few stars we have FIES and HERMES spectra at our disposal. The HERMES data were analysed in the Paper I. The S/N of the data is similar, but the resolution differs significantly. The HERMES spectra have a resolving power of about 90 000, compared to 24 000 (low resolution) or 46 000 (medium resolution) for FIES. Both HERMES and FIES spectra are available for KIC 2694337, KIC 9828226 (low resolution FIES spectra) and KIC 4840675 (SB2), KIC 5988140, KIC 7119530, KIC 7767565, KIC 8975515 (SB2), KIC 9970568 (medium resolution FIES spectra). For these stars we can compare

3 http://wwwuser.oats.inaf.it/castelli/ the results obtained from different sets of spectra. We found that the differences in T_{eff} and log g do not exceed 100 K and 0.1 dex, respectively. The biggest differences in ξt were obtained for KIC 2694337 (0.4 km s^{−1}), KIC 7119530 (0.6 km s^{−1}), and KIC 9970568 (0.3 km s^{−1}; but in agreement within the error bars). This is due to the effect of different lines used for analysis. For the other stars the discrepancies were no more than 0.1 km s^{−1}. Both Ryabchikova et al. (2016) and Kahraman Aliçavuş et al. (2016) obtained similar results.

The chemical abundances are affected by uncertainties in atmospheric parameters. For example, an error of T_{eff} equal to 100 K leads to changes in abundances smaller than 0.1 dex in most cases. Similarly, an error of log g equal to 0.1 dex changes chemical abundances by about 0.05 dex, and a 0.1 km s^{−1} uncertainty in ξt changes abundances by no more than 0.15 dex. The uncertainty of the microturbulence velocity increases with v sin i, from 0.1 km s^{−1} for small and moderate velocities, to 0.4 km s^{−1} for rapid rotators. Chemical abundances determined for rapidly rotating stars have the largest uncertainty. The combined errors of chemical abundances were calculated as in Paper I. In most cases these errors are lower than 0.20 dex. The v sin i values obtained from HERMES ans FIES spectra are consistent.

Table 2. Atmospheric parameters of the investigated Kepler A- and F-type stars. Photometric values (H2014 and KIC), those obtained from spectral energy distributions (Na & SED) and from analysis of metal and Balmer lines are presented. The 1σ uncertainties are given for effective temperatures from SED and for v sin i and log ϵ(Fe) values from metal lines.

KIC H2014 & KIC Na D & SED Balmer lines Fe lines Number Teff log g E(B − V ) log ϵ(Fe) E(B − V ) Teff Teff Teff log g ξt vsini log ϵ(Fe) [K] [mag] [mag] [K] [K] [K] [km s−1 ] [km s−1 ]

2162283 6947 4.07 0.05 7.60 0.01 7030 ± 150 7100 ± 100 7000 ± 100 4.1 ± 0.1 3.1 ± 0.1 42 ± 2 7.70 ± 0.14 2694337 7526 3.96 0.08 7.42 0.06 7640 ± 190 7300 ± 100 7400 ± 100 4.1 ± 0.1 3.0 ± 0.1 96 ± 3 7.60 ± 0.07 3219256 7493 3.59 0.06 7.48 0.03 7550 ± 180 7500 ± 100 7300 ± 100 3.8 ± 0.1 3.0 ± 0.1 99 ± 3 7.40 ± 0.10 3331147 7256 3.60 0.10 7.28 0.03 7040 ± 150 7000 ± 100 7000 ± 100 3.7 ± 0.1 2.0 ± 0.1 63 ± 2 7.46 ± 0.13 3429637 7211 3.99 0.12 7.30 0.02 7260 ± 160 7200 ± 100 7300 ± 100 3.4 ± 0.1 2.9 ± 0.1 51 ± 1 7.55 ± 0.08 3453494 7766 3.64 0.09 7.38 0.03 7830 ± 200 7800 ± 100 8000 ± 200 3.8 ± 0.2 2.0 ± 0.4 230 ± 9 7.42 ± 0.11 3868420 6782 4.08 0.06 7.24 0.00 6090 ± 110 7600 ± 200 7800 ± 100 3.9 ± 0.1 2.9 ± 0.1 11 ± 1 7.93 ± 0.13 4647763 6842 3.52 0.08 7.44 0.05 7220 ± 170 7100 ± 100 7100 ± 100 3.8 ± 0.1 3.9 ± 0.1 69 ± 2 7.39 ± 0.08 5880360 7930 3.68 0.08 7.34 0.05 8070 ± 220 7900 ± 100 7700 ± 200 3.6 ± 0.2 3.5 ± 0.3 187 ± 10 7.18 ± 0.13 5988140 7404 3.28 0.09 7.57 0.04 7630 ± 180 7800 ± 200 7800 ± 100 3.8 ± 0.1 1.9 ± 0.1 52 ± 2 7.48 ± 0.11 6123324 6691 3.09 0.07 7.57 0.05 7110 ± 160 7000 ± 100 6800 ± 200 3.5 ± 0.2 3.9 ± 0.3 189 ± 18 6.63 ± 0.18 6279848 6843 3.75 − 7.64 0.03 7000 ± 150 7000 ± 200 7100 ± 100 4.0 ± 0.1 3.2 ± 0.1 39 ± 1 7.27 ± 0.09 6370489 6302 3.92 0.02 7.30 0.01 6300 ± 120 6200 ± 100 6300 ± 100 4.0 ± 0.1 1.4 ± 0.1 7 ± 1 7.12 ± 0.12 6443122 7696 3.54 0.17 6.92 0.04 7420 ± 190 7100 ± 100 7200 ± 100 3.8 ± 0.1 3.0 ± 0.1 83 ± 3 7.50 ± 0.08 6670742 7694 3.63 0.08 7.42 0.02 7540 ± 190 7400 ± 100 7300 ± 200 3.6 ± 0.2 3.2 ± 0.4 276 ± 8 7.31 ± 0.11 7119530 7521 3.26 0.09 7.57 0.07 8240 ± 230 7800 ± 100 8200 ± 200 3.8 ± 0.2 2.5 ± 0.4 240 ± 11 7.35 ± 0.21 7122746 7710 4.00 0.15 7.56 0.08 8390 ± 280 8200 ± 100 8100 ± 100 4.1 ± 0.2 2.9 ± 0.2 110 ± 5 7.46 ± 0.12 7668791 8394 3.78 0.08 7.28 0.02 8110 ± 220 8200 ± 100 8200 ± 100 3.8 ± 0.1 2.7 ± 0.1 51 ± 2 7.46 ± 0.10 7748238 7244 4.06 0.10 7.32 0.05 7440 ± 170 7200 ± 100 7400 ± 100 3.9 ± 0.2 3.0 ± 0.2 129 ± 4 7.48 ± 0.11 7767565 8466 3.98 − 7.71 0.06 7810 ± 200 7900 ± 200 7800 ± 100 3.8 ± 0.1 2.7 ± 0.1 62 ± 3 7.75 ± 0.13 7773133 6977 3.53 0.13 7.30 0.10 7070 ± 170 7100 ± 100 7200 ± 100 3.9 ± 0.1 2.9 ± 0.1 41 ± 2 7.64 ± 0.11 7798339 6878 3.91 0.05 7.44 0.01 7000 ± 150 6800 ± 100 7000 ± 100 3.9 ± 0.1 2.5 ± 0.1 13 ± 1 7.13 ± 0.12 8211500 7619 3.93 0.04 7.60 0.01 7730 ± 180 7900 ± 100 8000 ± 100 3.9 ± 0.1 2.4 ± 0.1 90 ± 7 7.56 ± 0.09 8222685 6861 4.17 − 7.60 0.01 7150 ± 160 7100 ± 100 7100 ± 100 3.8 ± 0.1 3.2 ± 0.1 82 ± 2 7.20 ± 0.07 8694723 6120 4.10 0.03 6.91 0.02 6370 ± 120 6100 ± 100 6200 ± 100 4.1 ± 0.1 1.3 ± 0.1 7 ± 1 7.02 ± 0.10 8827821 7610 3.71 0.14 7.50 0.10 7680 ± 190 7400 ± 100 7700 ± 100 3.7 ± 0.1 3.4 ± 0.1 87 ± 2 7.60 ± 0.07 8881697 7932 3.93 0.11 7.40 0.05 7800 ± 200 7700 ± 100 7900 ± 200 3.8 ± 0.2 3.3 ± 0.3 184 ± 4 7.51 ± 0.11 9229318 7358 3.63 0.09 7.38 0.09 7550 ± 180 7200 ± 100 7400 ± 100 4.0 ± 0.1 3.0 ± 0.1 66 ± 2 7.74 ± 0.08 9349245 7914 3.72 0.05 7.06 0.02 7880 ± 210 8000 ± 200 8200 ± 100 3.7 ± 0.1 2.9 ± 0.1 82 ± 2 7.92 ± 0.11 9408694 6813 3.78 0.16 7.42 0.00 7120 ± 170 7200 ± 100 7300 ± 100 4.0 ± 0.1 2.0 ± 0.1 16 ± 1 7.53 ± 0.13 9410862 6230 4.32 0.04 7.30 0.04 6240 ± 130 6000 ± 100 6100 ± 100 3.9 ± 0.1 1.3 ± 0.1 4 ± 1 7.18 ± 0.13 9650390 8572 3.77 0.10 7.30 0.05 8510 ± 290 8100 ± 200 8900 ± 200 3.9 ± 0.2 3.2 ± 0.4 267 ± 7 7.63 ± 0.11 9656348 7177 3.90 0.14 7.57 0.05 7600 ± 180 7400 ± 200 7600 ± 100 3.9 ± 0.1 3.0 ± 0.1 32 ± 2 6.83 ± 0.11 9828226 9155 4.03 0.10 7.57 0.04 8950 ± 370 9000 ± 200 9100 ± 100 4.1 ± 0.1 2.0 ± 0.1 99 ± 18 6.39 ± 0.21 9845907 8148 4.01 0.14 7.57 0.00 7540 ± 220 7900 ± 200 7900 ± 100 3.9 ± 0.1 2.0 ± 0.1 13 ± 1 7.10 ± 0.11 9941662 9107 3.87 0.10 7.57 0.03 6940 ± 140 8100 ± 100 8200 ± 100 4.1 ± 0.1 2.7 ± 0.1 76 ± 3 7.65 ± 0.06 9970568 8035 3.71 0.11 7.40 0.10 8080 ± 220 7800 ± 100 7800 ± 200 4.0 ± 0.2 2.1 ± 0.4 250 ± 11 7.35 ± 0.09 10030943 6883 4.23 0.07 7.64 0.19 7410 ± 210 6900 ± 100 6900 ± 100 4.0 ± 0.1 3.8 ± 0.1 79 ± 4 7.07 ± 0.10 10341072 6543 4.17 0.03 7.38 0.02 6610 ± 130 6700 ± 300 6700 ± 100 3.8 ± 0.2 3.0 ± 0.2 104 ± 2 7.65 ± 0.08 10661783 8117 3.72 0.10 7.34 0.01 7960 ± 220 7800 ± 100 7900 ± 100 4.1 ± 0.1 1.8 ± 0.1 83 ± 2 7.51 ± 0.12 10717871 7485 3.51 0.12 7.57 0.03 7200 ± 160 7200 ± 100 7100 ± 100 3.9 ± 0.2 2.0 ± 0.2 128 ± 5 7.45 ± 0.11 11044547 9143 3.89 0.11 7.57 0.08 9360 ± 470 9000 ± 200 9200 ± 100 4.0 ± 0.1 1.2 ± 0.1 68 ± 4 7.60 ± 0.13 11622328 7725 4.19 − 7.57 0.06 8250 ± 240 8300 ± 300 8300 ± 100 3.8 ± 0.2 2.8 ± 0.2 144 ± 5 7.41 ± 0.09 11973705 11086 3.98 0.05 7.57 0.01 7520 ± 180 7400 ± 100 7500 ± 100 3.9 ± 0.2 3.4 ± 0.2 114 ± 7 6.52 ± 0.14 Results using TD-1: KIC 3219256: 7750 ± 290 K; KIC 3429637: 7340 ± 330 K; KIC 7119530: 8380 ± 220 K; KIC 7668791: 8580 ± 240 K; KIC 7798339: 7110 ± 290 K; KIC 8211500: 8040 ± 290 K; KIC 9349245: 8030 ± 200 K; KIC 9650390: 8870 ± 240 K.

Comments on individual stars:

KIC 3868420 (WDS19434+3855): 10.35+10.61 mag pair, separation 2.5” plus wide (26”) 11.71 mag companion. 2MASS photometry is unreliable. Some photometry is for the individual stars (e.g. Tycho) but other is for the combined light of the close pair. Insufficient photometry of the individual stars to obtain SED fits for each star. HADS pulsator, so photometry will sample star at different phases and brightnesses. KIC 7767565 (WDS19457+4330): close pair 9.50+10.0 mag, separation 0.3”. Results for combined light.

KIC 8211500 (WDS18462+4408): 8.19+11.28 mag, separation 0.7”. Results for combined light, but large magnitude difference means that the faint companion should not affect the results. KIC 9408694 (V2367 Cyg): HADS pulsator, so photometry will sample star at different phases and brightnesses.

KIC 9941662 (Kepler-13, WDS19079+4652): 10.35+10.48 mag, pair separation 1.1”. Photometry is for combined light of the pair. Literature shows that both stars are similar magnitudes to within 0.1 ∼ 0.2 mag. SED fit may represent the average of the two stars, but not the individual stars. Fits are therefore not considered reliable.

Spectroscopic survey of Kepler stars 7

Figure 2. Comparison of effective temperatures derived by different methods. Filled circles represent the results obtained in this work, open circles are used for Paper I stars. In panel (a) the differences ΔT_{eff} =T_{eff} (Fe)−T_{eff} (H2014) are shown. In panel (b) ΔT_{eff} =T_{eff} (Fe)−T_{eff} (SED) are plotted. In panel (c) ΔT_{eff} =T_{eff} (Fe)−T_{eff} (Balmer) are shown.

4 DISCUSSION OF THE RESULTS

4.1 Atmospheric parameters

Here we discuss the consistency of our atmospheric parameters from the FIES spectra with those from two other sources: the H2014 catalogue, and SEDs. The v sin i values are compared with typical values for A and F stars. All

Figure 3. Differences Δ log g = log g(Fe)−log g(H2014) as a function of T_{eff} (Fe). The stars indicated by open circles are taken from Paper I. The filled circles show the results obtained in this work. The dotted horizontal lines indicate a difference of ± 0.2 dex.

parameters are presented in the Table 2.

Effective temperature The effective temperatures given by H2014 and determined using the methods described in Sect. 3 are presented in Table 2 and compared in Fig. 2. In this figure, the differences between T_{eff} (Fe) obtained from the analysis of the high-resolution spectra and values taken from H2014, T_{eff} (H2014), from SED fitting, T_{eff} (SED), and from the Balmer lines analysis, T_{eff} (Balmer), are shown as a function of T_{eff} (Fe). The biggest differences are for T_{eff} (H2014) values. The H2014 catalogue is a compilation of literature values for atmospheric properties (T_{eff} , log g and [Fe/H]) derived from different methods, including photometry, spectroscopy, asteroseismology, and exoplanet transits. For the stars considered here, the H2014 values have been determined with large uncertainties via photometry. For most of the stars, the values of T_{eff} (Fe)−T_{eff} (H2014) agree to within ±300 K. The biggest differences are obtained for chemically peculiar stars KIC 3868420 (Am star from high resolution spectra analysis;HADS pulsator), KIC 7767565 (Am), KIC 9941662 (Am:), KIC 11973705 (λ Boo), and for rapidly rotating stars with v sin i exceeding 100 km s^{−1}, e.g. KIC 11622328 and KIC 7119530.

Figure 2 (b) compares T_{eff} (Fe) with T_{eff} (SED). The consistency between the results of these two methods is good. To compare the effective temperatures obtained with different methods we use the Kendall’s rank correlation coefficient that measures the strength of dependence between two variables. There is no significant trend of the differences [T_{eff} (Fe)−T_{eff} (SED)] with T_{eff} (Fe). The Kendall’s rank correlation coefficient is 0.16. The differences exceed 500 K only for KIC 10030943 and KIC 9941662. KIC 10030943 is an eclipsing binary star. The difference T_{eff} (Fe)−T_{eff} (SED) may be the result of the influence of the secondary star on the photometric indices and/or on the spectrum. KIC 9941662 (Kepler-13) is also a binary system, with a magnitude difference Δm = 0.13 and 1.1” separation. The photometry used to construct the SED is the combined light of the pair. The T_{eff} (SED) analysis supports the claimed accuracy of our spectroscopic temperatures because the stars are similar.

The differences T_{eff} (Fe)−T_{eff} (Balmer) are in all cases smaller than 300 K (see Fig. 2 c).

Surface gravities Figure 3 compares the log g(Fe) values obtained from highresolution HERMES (open circles, Paper I) and FIES (filled circles, this work) spectroscopy with those taken from the H2014 catalogue, log g(H2014). For most stars the surface gravities are consistent to within ±0.2 dex. There is no correlation between the differences [log g(Fe)−log g(H2014)] and effective temperature or surface gravity. The values in the H2014 catalogue were mostly calculated from photometry. The high-resolution spectra are much more sensitive to log g than the photometric indices. Therefore, the spectroscopic surface gravities determined from iron lines should be adopted for the subsequent analysis of these stars.

Microturbulent velocity One of the important key parameters in the abundance analysis is microturbulence ξt. Microturbulent velocity orig-

8 E. Niemczura et al.

Figure 4. Microturbulent velocities as a function of the projected rotational velocity. The CP stars from Paper I are shown as open stars, whereas the non-CP stars are indicated as open circles. The CP and non-CP objects from this work are presented as filled stars and circles, respectively. Diamonds show results from Kahraman Aliçavuş et al. (2016). Although microturbulence shows no dependence on v sin i, it is determined to higher precision in slow rotators.

Figure 5. Microturbulent velocities as a function of effective temperature. The CP stars from Paper I are shown as open stars, whereas the non-CP stars are indicated as open circles. The CP and non-CP objects from this work are presented as filled stars and circles, respectively. Diamonds show results from Kahraman Aliçavuş et al. (2016).

inates from non-thermal velocities in the stellar atmosphere at scales shorter than the mean-free-path of a photon. It has a significant effect on the spectral lines of A and F stars, therefore its determination is important in abundance analyses, especially when using strong line features.

The microturbulent velocities obtained in our analyses lie within the range from about 1.2 to 3.9 km s^{−1}. Microturbulent velocities are calculated using Fe lines of various strengths, leading to a dependence on spectral quality. The best data are characterized by a high signal-to-noise and high resolution. Low S/N or/and resolution prevents weak lines from being analysed. Additionally, the precision of the calculated ξt values depends strongly on v sin i. At high v sin i, line blending obscures weak lines. The uncertainties of ξt listed in Table 2 increase with the increasing v sin i value.

To enlarge the sample, the results from Paper I and Kahraman Aliçavuş et al. (2016) were taken into account. Niemczura et al. (2015) analysed stars with a broad range of v sin i values and found ξt within the range 2–4 km s^{−1} for stars with 7000 < T_{eff} ⩽ 8000 K, decreasing to 2 km s^{−1} at 8000 < T_{eff} ⩽ 9000 K, and decreasing further to 0.5–1 km s^{−1} for T_{eff} > 9000 K. With a larger sample of stars analysed in a consistent way, we re-examine the dependence of ξt on T_{eff} , log g, and the influence of v sin i and chemical composition on the determined values.

The absence of a correlation between ξt and v sin i (Fig. 4) shows that microturbulence is still well determined across a wide range of v sin i despite the aforementioned challenges, and that there is no physical connection between the quantities, unless that connection is anti-correlated with a systematic misestimation. There is also no correlation of ξt and iron abundance, however the analysed objects fall within a narrow range of iron abundances, in which most stars have log ϵ(Fe) between about 7.0 and 8.0.

In Fig. 5 the microturbulences are shown as a function of effective temperature. Here, a broad maximum in ξt is observed around 7000 – 8500 K. These results are consistent with the previous determinations of microturbulence for A and F stars. Chaffee (1970) first found that microturbulence varies with effective temperature, from 2 km s^{−1} for early A stars up to 4 km s^{−1} for late A stars, and 2 km s^{−1} for mid F stars. Since then the dependence of ξt with T_{eff} has been investigated in many studies (Coupry & Burkhart 1992; Edvardsson et al. 1993; Gray, Graham, & Hoyt 2001; Smalley 2004; Takeda et al. 2008; Gebran et al. 2014, Paper I). The large dispersion in the results was found in all mentioned works except for Takeda et al. (2008).

The relation between ξt and log g was also checked. This dependence was analysed by Gray, Graham, & Hoyt (2001) for the broad range of log g from 1.0 to 5.0. They discovered the clear correlations between log g and ξt for spectral types from A5 to G2. The microturbulent velocity in giants and supergiants is generally larger than in dwarfs. Our targets occupy a narrow log g range on or near the main-sequence, preventing verification of the Gray, Graham, & Hoyt (2001) result.

As in Paper I, the determined microturbulent velocities of Am stars are similar to those of non-CP stars. The distribution of microturbulent velocities among the Am stars is indistinguishable from that of normal stars. This is in stark contrast to results presented by Landstreet et al. (2009), who claimed that Am stars have higher microturbulent velocities, amid criticism of inadequate sampling (Murphy 2014).

4.2 Projected rotation velocity

The stars analysed here have projected rotational velocities ranging from 4 to 270 km s^{−1}. In Fig. 6 (a) the distribution of the v sin i values obtained here and in Paper I is shown.

Stars with v sin i lower than 30 km s^{−1} are considered here as slowly rotating stars. There are seven such ob-

Spectroscopic survey of Kepler stars 9

Figure 6. The distribution of rotational velocities for all stars (panel a) and for all non-CP stars (panel b) analysed here and in Paper 1.

jects in the sample analysed here, including KIC 3868420 (A9 Vs) showing weakness of Ca lines and KIC 8694723 (hF6 mF2 gF5 V) which shows metal underabundances. There are four single non-CP stars with low v sin i: KIC 7798339 (F1.5 V), KIC 9845907 (A4 IVs), KIC 9410862 (F6 V), and KIC 6370489 (F5.5 V). The slow rotation of F stars is also surprising, if the spectral type is earlier than F5, where the Kraft break is seen (Kraft 1967). Early F stars have a continuous rotational velocity distribution with late A stars. One of the stars, KIC 9408694 (F0 IVs + ?) is a member of binary system.

Figure 6 (b) shows the distribution of v sin i for all non- CP stars analysed here and in Paper I. The mean value of v sin i for the whole sample is 125 km s^{−1}, and the median is 110 km s^{−1}. These results are consistent with the projected rotational velocities of A stars available in the literature. Abt (2000) discovered that most of the non chemically peculiar A0–F0 main-sequence stars have v sin i values greater than 120 km s^{−1}. The average projected rotation velocity of about 130 km s^{−1} was determined by e.g. Royer (2009) and Abt (2009). Our results are consistent with their conclusions.

The occurrence of non-CP A stars with low v sin i has been discussed in Paper I. Various authors have tried to explain the origin of such stars. Abt (2009) considered binarity and the amount of time necessary for slow rotators to become Ap or Am stars by a diffusion mechanism (Talon, Richard, & Michaud 2006; Michaud & Richer 2013). A more probable reason for the low observed v sin i in some A stars is the inclination effect, as for Vega (Gray 1985; Gulliver, Hill, & Adelman 1994; Abt 2009; Hill, Gulliver, & Adelman 2010). The spectroscopically obtained v sin i is a projection of the equatorial velocity along the line-of-sight, so stars classified as slow rotators can be in fact fast rotators seen at low inclination angle. To investigate the effect of low inclination on the observed spectrum of a fast rotator, high-resolution and very high signal-to-noise (S/N ∼ 1000) spectra are necessary (e.g. Royer et al. 2012).

Table 3. Average abundances (log ϵ(El)), standard deviations and number of stars used for abundance calculations for non- CP, Am, and λ Boo stars, compared to the reference solar values of Asplund et al. (2009).

El. non-CP Am λ Boo Solar stars stars stars values

C 8.37, 0.25 (37) 8.26, 0.28 (4) 8.40, 0.08 (3) 8.43 N 8.17, 0.30 (7) 8.72 (1) 8.31 (1) 7.83 O 8.84, 0.25 (31) 8.68, 0.32 (4) 8.69, 0.20 (3) 8.69 Na 6.45, 0.43 (30) 6.59, 0.12 (4) 6.20 (1) 6.24 Mg 7.69, 0.24 (37) 7.71, 0.27 (4) 6.95, 0.51 (3) 7.60 Al 6.38, 0.36 (7) 6.73, 0.08 (2) 6.45 Si 7.50, 0.24 (37) 7.71, 0.05 (4) 6.96, 0.33 (3) 7.51 S 7.38, 0.27 (29) 7.39, 0.22 (4) 6.58 (1) 7.12 Ca 6.42, 0.26 (37) 6.09, 0.47 (4) 5.85, 0.37 (3) 6.34 Sc 3.17, 0.28 (37) 2.97, 0.29 (4) 2.58, 0.59 (3) 3.15 Ti 5.01, 0.21 (37) 5.16, 0.17 (4) 4.11, 0.26 (3) 4.95 V 4.33, 0.40 (28) 4.80, 0.15 (4) 4.07 (1) 3.93 Cr 5.62, 0.22 (37) 6.09, 0.10 (4) 4.79, 0.19 (3) 5.64 Mn 5.36, 0.29 (37) 5.41, 0.25 (4) 4.65 (1) 5.43 Fe 7.40, 0.24 (37) 7.76, 0.13 (4) 6.57, 0.24 (3) 7.50 Co 5.43, 0.64 (16) 5.49, 0.13 (2) 4.73, (1) 4.99 Ni 6.24, 0.31 (37) 6.68, 0.20 (4) 5.77, 0.13 (2) 6.22 Cu 4.15, 0.44 (23) 4.63, 0.26 (3) 4.13, (1) 4.19 Zn 4.41, 0.31 (26) 4.86, 0.31 (4) 3.98, (1) 4.56 Ga 2.94, 0.69 (4) 3.70, 0.45 (2) 3.04 Sr 2.99, 0.85 (36) 3.98, 0.09 (4) 2.49, 0.66 (2) 2.87 Y 2.37, 0.38 (33) 2.99, 0.05 (4) 1.84, 0.18 (2) 2.21 Zr 3.03, 0.34 (29) 3.09, 0.14 (4) 2.58 (1) 2.58 Ba 2.78, 0.53 (36) 3.82, 0.14 (4) 1.51, 0.25 (3) 2.18 La 1.43, 0.44 (22) 2.39, 0.19 (3) 1.16 (1) 1.10 Ce 1.97, 0.34 (15) 2.76, 0.11 (3) 1.47 (1) 1.58 Pr 0.73, 0.39 (6) 1.67 (1) 0.72 Nd 1.86, 0.47 (18) 2.48, 0.11 (3) 1.75 (1) 1.42 Sm 1.28, 0.54 (5) 0.96 Eu 1.28, 0.95 (5) 2.01 (1) 0.52 Gd 1.27, 0.34 (4) 1.07 Dy 1.11, 0.50 (4) 1.10 Er 1.49, 0.14 (3) 0.92

10 E. Niemczura et al.

5 CHEMICAL ABUNDANCES

In Table 3 the average abundances for a sample of non-CP and for all stars are compared with the photospheric solar values of Asplund et al. (2009). The abundances of C, Mg, Si, Ca, Sc, Ti, Cr and Fe were derived for all stars. For O we used lines that are only slightly affected by non-LTE effects (e.g. Przybilla et al. 2000) (e.g., 5331, 6157, 6158, and 6456 Å). Lines of heavy elements except for Sr, Y, Zr, Ba, and rare-earth elements are very sparse in spectra of A stars. Their abundances were investigated only for slowly and moderately rotating stars and in most cases only one or two blends were available.

5.1 Chemically peculiar stars

In Fig. 7, the determined average abundances for CP and non-CP stars are compared with the solar abundances of Asplund et al. (2009). The average abundances of most of the light and iron-peak elements are similar to the solar values. The largest differences were derived for the elements represented by weak blends only. As expected, the abundances of some elements determined for CP stars are far different from the solar values. The CP stars in our sample consist of regular and mild Am stars and λ Boötis candidates. According to the abundance analysis, five stars were classified as Am:, three single stars KIC 3868420, KIC 7767565, KIC 9941662, EB system KIC 2162283 and SB2 star KIC 3858884, the primary of which is a mild Am star (kA8 hF0 mF2.5 III). A detailed abundance analysis of SB2 systems, including KIC 3858884, will be presented in a forthcoming paper (Catanzaro et al., in preparation), because disentangling the spectral components from each star demands a different methodology.

KIC 3868420 was classified initially as A9 Vs with a very weak Ca ii K line in comparison with the hydrogen line type. However, no metal-line enhancement was detected under spectral classification. From the abundance analysis KIC 3868420 is a typical Am star with underabundant Ca and Sc but enhanced metal lines. KIC 7767565 (kA5 hA7 mF1 IV) shows the typical Am abundance pattern except for apparently normal Ca and Sc abundances. The star was classified as an Am in Paper I and the same spectral type was found. For KIC 9941662 (kA2 hA5m A7 (IV)) the spectroscopic data analysis revealed lower Ca and Sc abundances, typical for Am stars.

KIC 2162283 was classified as a star with a composite Am + F spectrum. The spectral type obtained from hydrogen line is roughly consistent with an A9 giant. On the other hand, the extremely strong metal lines match a mid or late- F star. The star shows overabundances of most iron-peak elements and some heavy elements like Zn, Sr, Zr, and Ba, typical for an Am type, but the expected underabundance of Sc is small and Ca has normal abundance, contrary to expectation (Gray & Corbally 2009). From spectral classification the spectrum could be interpreted as an Am or Ap star due to the selective enhancements. The fact that Ca is not weak might appear to rule out an Am type, but the overall metal line morphology is best described by a composite spectrum, in which case the Ca II K line would be the mix of a weak Am type and a strong late-F type, and thus appear normal. Further, the strength of the overall metal line spectrum (in addition to the selective enhancement of some elements) is not typical of Ap stars, and this star is a known eclipsing binary.

KIC 3429637 (hA8 kF0 mF0 IIIas) was previously classified as hA9 kF2 mF3 type by Abt (1984) and as F0 III star by Catanzaro et al. (2011). KIC 3429637 is not an Am star. It’s a giant with slightly enhanced metal lines.

There are three candidate λ Boötis stars in our sample: KIC 9656348, KIC 9828226 and KIC 11973705. They are characterised by a weak Mg II 4481 line and solar abundances of C, N, O, and S (Gray & Corbally 2009). The spectrum of KIC 9656348 (hA9 kA4 mA4 V) has hydrogen lines with deep cores but the core-wing boundaries and the wings themselves are narrow. Metal lines are also narrow and fit between A3 and A5 V, hence rotation cannot explain the metal weakness. KIC 9828226 (hA2 kB9.5 mB9 Vb) has tremendously broad hydrogen lines in the spectrum, hence the Vb luminosity class. Its Mg ii 4481 line is weaker than the metal line type, that is, even weaker than at B9. Other metals are barely discernible. Hence, KIC 9828226 is a firm λ Boo candidate. This star was analysed in Paper I, where similar spectral type (hA2 kA0 mB9 Vb) and atmospheric parameters were found. Its moderate rotational velocity, 99 ± 18 km s^{−1}, allowed us to obtain the abundances of C, O, Mg, Si, Ca, Sc, Ti, Cr, Fe, and Ba. The chemical abundances were determined on the basis of one or two lines only, except for Ti, Cr and Fe. All these elements are underabundant. The C and O abundances are solar, typical for λ Boötis stars. KIC 11973705 (hF0.5 kA2.5 mA2.5 V) has a typical λ Boo spectrum, with pronounced metal weakness and broad-but-shallow hydrogen line wings. Its abundances support the λ Boo classification.

In addition, a metal-weak late-type star was found. KIC 8694723 was classified as hF6 mF2 gF5 V, with hydrogen lines matching an F6 star, but noticeably weaker metal lines and G-band.

5.2 Correlation of chemical abundances with other parameters

We used the stars analysed here and those from Paper I to search for possible correlations between the abundances of chemical elements and other stellar parameters. Also in this case we used the Kendall’s rank correlation coefficient. Any correlations or anticorrelations found between abundances and atmospheric parameters are very useful for investigating hydrodynamical processes in stellar atmospheres. Because of the large sample of stars, we are able to make the reliable analysis of possible correlations between the chemical abundances and T_{eff} , log g, ξt, v sin i and Fe abundances. Only in a few cases was the analysis complicated by large scatter or by having only a small number of stars with measured abundances of a particular element. This is the case for some of the heavy and rare-earth elements.

Usually, chemically normal stars showed at most mild correlation between element abundances and atmospheric parameters. Strong positive correlations with T_{eff} were only calculated for Zn (0.43), and Ce (0.57). In case of Zn the positive correlation can be eliminated by removing the low temperature outliers. Any other correlations can be explain by small number of abundance calculations for a given element, rendering the correlation determination uncertain.

Spectroscopic survey of Kepler stars 11

Figure 7. Average abundances of the non-CP stars (circles), Am (stars) and λ Boötis stars (squares) compared to the solar values of Asplund et al. (2009).

Simiraly, at mild correlations with log g and ξt were found. As expected, positive correlations with iron abundance were found for almost all elements. The highest correlation coefficients were obtained for iron-peak elements Ca, Ti, Cr, Ni, Cu, plus Al, La and Ce, all of which have correlation coefficients > 0.30. Takeda et al. (2008) also found strong positive correlations between the abundances of Si, Ti and Ba, and that of Fe.

For CP stars, mild positive correlations (obtained for Al, S, Mn, Ni, Cu, Zn, Sr, Zr, Ba, La) may again be the result of small number statistics but this time because CP stars are few in number. Richer, Michaud, & Turcotte (2000) also predicted mild correlations between abundances of some elements (e.g. Ni) and T_{eff} . Strong correlations were found only Ca (0.52) and O, Co, and Ce (∼ −0.40). Strong positive correlations with log g were found for Na, V, Mn, Cu, and Zn (0.30−0.50). The strongest positive correlation was found for Ni (0.62), while negative were obtained for N (−0.62) and Sc (−0.33). The strong positive correlations with ξt were found for N (0.55), Cr (0.32), and Mn (0.39), while negative correlations were derived for C (−0.38), and Ba (−0.41). However, values for the smallest ξt sometimes differ significantly from the other results. Removing these values erases any existing correlations. Positive correlations (> 0.30) with iron abundances were obtained for Na, Si, Ca, Ti, V, Cr, Mn, Ni, and La. All correlations for CP should be treated with caution, because of the small number of the analysed CP stars.

In the present work, no strong correlations between the abundances of most elements and v sin i were found among normal stars. Stronger correlations were found only for Co (0.54), Nd (0.41), and Sr (−0.40). Only for Co and Sr can the correlation be considered as reliable, since for the other elements the number of stars considered is less than 20. For chemically peculiar stars strong positive correlations were found for Na, Si, Ti, Mn, and Co, with correlation coefficients higher than 0.40. Comparing samples with A and

F stars, we found a larger scatter of abundances for hotter stars, especially for stars with v sin i higher than 150 km s^{−1}.

The same trend was obtained for the abundances of A and F stars in the Hyades (Gebran et al. 2010), Pleiades (Gebran & Monier 2008), and Coma Berenices open clusters (Gebran, Monier, & Richard 2008). The correlations between abundances and v sin i were examined by Fossati et al. (2008) and Takeda et al. (2008). Fossati et al. (2008) investigated 23 normal A and F stars and found no correlation between abundances and projected rotational velocity. A larger sample was studied by Takeda et al. (2008), who discovered negative correlations for C, O, Ca and strong positive correlations for the Fe-peak elements plus Y and Ba, with rotational velocity.

6 VARIABILITY AND SPECTROSCOPIC H-R DIAGRAM

The atmospheric parameters obtained in this work are necessary ingredients for seismic modelling. Our sample of A and F stars contains pulsating δ Sct, γ Dor, and hybrid stars. To find out if the atmospheric parameters of the analysed stars are consistent with theoretical instability strips in this part of the H-R diagram, we performed an analysis of the Kepler data for all objects investigated here. We used the multi-scale MAP light curves available through the MAST^4 database. We considered all the long cadence data available for a given star. If necessary, short cadence data were used to verify our classification. We visually examined all light curves, the frequency spectra, and detected frequencies to identify candidate δ Sct, γ Dor, hybrid, and other types of variability. The results of our initial classification are presented in the last column of Table 1.

Most of the stars were classified as hybrid δ Sct/γ Dor

4 https://archive.stsci.edu/kepler/

12 E. Niemczura et al.

Figure 8. log T_{eff} – log g diagram for the stars analysed in the current work. Stars identified as δ Sct, γ Dor, hybrids, non-pulsating or CP objects are plotted with different symbols (see legend).

variables (29), including two stars showing HADS pulsations with possible γ Dor frequencies (KIC 3868420 and KIC 9408694). In this work all objects for which we can find frequencies typical for δ Sct and γ Dor stars are termed “hybrid”. We classified 8 stars as δ Sct (single stars and binary systems), and 4 as pure γ Dor variables. For 4 stars the classification was not clear, so we denoted these stars as “unknown” variables. Three of these stars have early spectral types from A3 to A6, all with luminosity class V (KIC 5880360, KIC 8211500, and KIC 11622328) but they show variability with frequencies typical for γ Dor stars. The other “unknown” is the F6 III star, KIC 10341072. Two stars were classified as constant: KIC 9349245 and KIC 9941662. The latter has planetary transits (Kepler-13, Shporer et al. 2014). Solar like oscillations were discovered for the three stars with the lowest temperature: KIC 9410862, KIC 8694723 (metal weak star hF6 mF2 gF5 V), and KIC 6370489. Moreover, we found 6 pulsating stars in binary systems, including eclipsing binaries (KIC 2162283, KIC 3858884, and KIC 10661783).

All of the investigated stars are shown in the T_{eff} − log g diagram (Fig. 8). Evolutionary tracks, calculated with Time Dependent Convection (TDC, Grigahcène et al. 2005), for stars having [Fe/H] = 0.0 and αMLT = 1.8 covering a range of masses from 1.4 to 2.8 M⊙ are also shown. The instability strips for δ Sct (solid line) and γ Dor (dashed line) are shown as well. As can be seen in Fig. 8, all the Am stars are located firmly inside the instability strip. Only one Am star was classified as a non-pulsating star (KIC 9941662),two are δ Sct stars (KIC 2162283 and KIC 3858884), one is γ Dor (KIC 7767565), and one is possible hybrid (KIC 3868420). As for the λ Boo stars, one is located inside the δ Sct instability strip (KIC 11973705) and one is hotter (KIC 9828226). All λ Boo stars were classified as δ Sct/γ Dor variables. Two chemically normal stars are located well outside the blue edge of the δ Sct instability strip, KIC 11044547, classified as possible hybrid with clear δ Sct and possible γ Dor frequencies, and KIC 9650390 classified as a clear hybrid star. Their temperatures are too high for hybrid δ Sct/γ Dor stars. These two stars need further investigation to verify the possibility of contamination by another star. The other hybrid stars are located inside the δ Sct instability strip.

7 CONCLUSIONS

We have analysed FIES/NOT spectra of 50 A and F stars observed by Kepler. Spectral classification showed that our sample consists mostly of non-evolved stars of luminosity types V to IV and revealed 9 CP stars of Am and λ Boötis types. Six of them were discovered as new CP stars. Atmospheric peculiarities of these stars were confirmed by detailed investigation of their stellar spectra.

We determined atmospheric parameters – T_{eff} , log g, ξt, v sin i and chemical abundances – using spectral synthesis. Initial values of T_{eff} and log g were derived from (Huber et al. 2014) (mostly photometric values), SED, and Balmer lines analysis. For discussion of the parameters we used an enlarged sample of stars, including those analysed in Paper I, using the same method. The combined sample consists of 167 stars. We have confirmed that atmospheric parameters obtained from photometry (e.g. H2014), particularly log g, are markedly inferior to those obtained spectroscopically from iron lines. The ability of photometry to derive these quickly for a large number of stars means this

Spectroscopic survey of Kepler stars 13

method will continue to have a role in input catalogues for space telescopes, but spectroscopy should be utilised when high accuracy and precision is required.

We have mapped the change in microturbulent velocities as a function of T_{eff} for normal stars and for Am stars in a self-consistent manner, and buck the trend in finding no microturbulence excess for Am stars over normal stars. We confirm suspicions that earlier results of that nature (e.g. Landstreet et al. 2009) failed to account for the increase in microturbulence for all stars in the 7000 − 8000 K temperature range where Am stars are predominantly found (Murphy 2014). We also find no correlation between ξt and v sin i. The narrow log g range among our targets prevented a similar analysis for that parameter.

The stars analysed here have v sin i values ranging from 4 to about 280 km s^{−1}. There are seven objects with v sin i < 30 km s^{−1} in our sample, including CP and non- CP stars. The mean value of v sin i for the whole sample is 125 km s^{−1}, and the median is 110 km s^{−1}, consistent with literature results for A/F stars in general (e.g. Royer 2009). Abundances are hard to measure for rapidly rotating A stars, but we confirm that they show large star-to-star variations (Hill & Landstreet 1993), especially where v sin i exceeds 150 km s^{−1}.

Homogeneous analysis of large samples of A and F stars frames the discussion of the nature of their atmospheres, e.g. the v sin i distribution and the influence of fast rotation on chemical abundances, and the dependence of microturbulent velocity on effective temperature and surface gravity. This provides a platform for greater understanding of atomic diffusion, mixing processes and angular momentum transport, which are extremely important but remain ill-understood. In addition, the provision of reliable stellar atmospheric parameters from spectroscopy is crucial to successful asteroseismic investigation of these objects, extending analyses from the line-forming region analysed spectroscopically to the deep interior of A/F stars probed by g modes (Kurtz et al. 2014; Saio et al. 2015; Murphy et al. 2016; Schmid & Aerts 2016).

In the next papers we enlarge our sample for the other A-F stars from the Kepler field (Polińska et al., in preparation) as well as K2 fields (Niemczura et al., in preparation). Both samples consist of possible δ Sct, γ Dor and hybrid stars. All the stars will be analysed with the same methods, using the same atmospheric models, and atomic data. The enlarged sample will consist of about 300 stars, what let us to observationally define instability regions for A-F pulsating stars. In addition, we check the possible correlations of pulsational characteristics of stars, obtained from Kepler data analysis with their atmospheric parameters and projected rotational velocity.

ACKNOWLEDGMENTS

EN and MP acknowledge the Polish National Science Center grant no. 2014/13/B/ST9/00902. Calculations have been carried out at the Wrocław Centre for Networking and Supercomputing (http://www.wcss.pl), grant No. 214. This paper includes data collected by the Kepler mission. Funding for the Kepler mission is provided by the NASA Science Mission directorate.

REFERENCES

Abt H. A., 2000, AJ, 544, 933 Abt H. A., 2009, AJ, 138, 28 Abt H. A., 1984, ApJ, 285, 247 Armstrong D. J., Gómez Maqueo Chew Y., Faedi F., Pollacco D., 2014, MNRAS, 437, 3473 Asplund M., Grevesse N., Sauval A. J., Scott P., 2009, ARA&A, 47, 481 Balona L. A., Dziembowski W., 2011, MNRAS, 417, 591 Balona L. A., et al., 2011, MNRAS, 413, 2403 Balona L. A., et al., 2012, MNRAS, 419, 3028 Balona L. A., 2013, MNRAS, 431, 2240 Balona L. A., 2014, MNRAS, 441, 3543 Balona L. A., Baran A. S., Daszyńska-Daszkiewicz J., De Cat P., 2015, MNRAS, 451, 1445 Brown T. M., Latham D. W., Everett M. E., Esquerdo G. A., 2011, AJ, 142, 112 Bruntt H., et al., 2012, MNRAS, 423, 122 Carnochan D. J., 1979, Bull. Inf. CDS, 17, 78 Castelli F., Hubrig S., 2004, A&A, 425, 263 Catanzaro G, Leone F., Dall T. H., 2004, A&A, 425, 641 Catanzaro G., et al., 2011, MNRAS, 411, 1167 Catanzaro G., et al., 2015, MNRAS, 451, 184 Chaffee F. H., Jr., 1970, A&A, 4, 291 Chaplin W. J., et al., 2014, ApJS, 210, 1 Coupry M. F., Burkhart C., 1992, A&AS, 95, 41 Heckmann O., Dieckvoss W., 1975, AGK3 Catalogue Edvardsson B., Andersen J., Gustafsson B., Lambert D. L., Nissen P. E., Tomkin J., 1993, A&A, 275, 101 Fossati L., Bagnulo S., Landstreet J., Wade G., Kochukhov O., Monier R., Weiss W., Gebran M., 2008, A&A, 483, 891 Gebran M., Monier R., 2008, A&A, 483, 567 Gebran M., Monier R., Richard O., 2008, A&A, 479, 189 Gebran M., Vick M., Monier R., Fossati L., 2010, A&A, 523, AA71 Gebran M., Monier R., Royer F., Lobel A., Blomme R., 2014, psce.conf, 193 Gilliland R. L., Chaplin W. J., Jenkins J. M., Ramsey L. W., Smith J. C., 2015, AJ, 150, 133 Gray R. O., Graham P. W., Hoyt S. R., 2001, AJ, 121, 2159 Gray D. F., 2005, The Observation an Analysis of Stellar Photospheres, Cambridge University Press Gray R. O., Corbally C. J., 2009, Stellar Spectral Classification, Princeton University Press Gray R. O., 1985, JRASC, 79, 237 Grigahcène A., Dupret M.-A., Gabriel M., Garrido R., Scuflaire R., 2005, A&A, 434, 1055 Grigahcène A., et al., 2010, ApJ, 713, L192 Gulliver A. F., Hill G., Adelman S. J., 1994, ApJ, 429, L81 Guzik J. A., Bradley P. A., Jackiewicz J., Molenda- Zakowicz J., Uytterhoeven K., Kinemuchi K., 2015, arXiv, arXiv:1502.00175 Hill G., Landstreet, J. D. 1993, A&A, 276, 142 Hill G., Gulliver A. F., Adelman S. J., 2010, ApJ, 712, 250 Howarth I. D., 1983, MNRAS, 203, 301 Howell S. B., et al., 2014, PASP, 126, 398 Huber D., et al., 2014, ApJS, 211, 2 Kahraman Aliçavuş F., et al., 2016, MNRAS, 458, 2307 Karoff C., et al., 2013, MNRAS, 433, 3227 Kharchenko N. V., 2001, KFNT, 17, 409 Kjeldsen H., Christensen-Dalsgaard J., Handberg R.,

14 E. Niemczura et al.

Brown T. M., Gilliland R. L., Borucki W. J., Koch D., 2010, AN, 331, 966 Kraft R. P., 1967, ApJ, 150, 551 Kurtz D. W, et al. 2014, MNRAS, 444, 102 Kurucz R. L., 1993, Kurucz CD-ROM 13.SAO, Cambridge, USA.

Kurucz R. L., 1993, Kurucz CD-ROM 18.SAO, Cambridge, USA.

Kurucz R. L., 2011, CaJPh, 89, 417 Lampens P., et al., 2013, A&A, 549, A104 Landstreet J. D., Kupka F., Ford H. A., Officer T., Sigut T. A. A., Silaj J., Strasser S., Townshend A., 2009, A&A, 503, 973 Lehmann H., et al., 2011, A&A, 526, A124 Lehmann H., Southworth J., Tkachenko A., Pavlovski K., 2013, A&A, 557, A79 Lindoff U., 1972, A&A, 16, 315 Macrae D. A., 1952, ApJ, 116, 592 Mashonkina L., 2011, mast.conf, 314 McDonald I., Zijlstra A. A., Boyer M. L., 2012, MNRAS, 427, 343 Michaud G., Richer J., 2013, EAS, 63, 199 Molenda-Żakowicz J., et al., 2013, MNRAS, 434, 1422 Mortier A., Sousa S. G., Adibekyan V. Z., Brandão I. M., Santos N. C., 2014, A&A, 572, A95 Munari U., Zwitter T., 1997, A&A, 318, 26 Murphy S. J., Grigahcène, A., Niemczura E., Kurtz D. W., Uytterhoeven K., 2012, MNRAS, 427, 1418 Murphy S. J., 2014, PhDT, Univ. Central Lancashire Murphy S. J., Bedding T. R., Niemczura E., Kurtz D. W., Smalley B., 2015, MNRAS, 447, 3948 Murphy S. J., et al. 2016, MNRAS, 459, 1201 Nemec J. M., Cohen J. G., Ripepi V., Derekas A., Moskalik P., Sesar B., Chadid M., Bruntt H., 2013, ApJ, 773, 181 Niemczura E., et al., 2015, MNRAS, 450, 2764 Nordstrom B., Stefanik R. P., Latham D. W., Andersen J., 1997, A&AS, 126, Przybilla N., Butler K., Becker S. R., Kudritzki R. P., Venn K. A., 2000, A&A, 359, 1085 Renson P., Manfroid J., 2009, A&A, 498, 961 Richer J., Michaud G., Turcotte S., 2000, ApJ, 529, 338 Royer F., 2009, The Rotation of Sun and Stars, Lecture Notes in Physics. Vol. 765. Berlin: Springer, pp. 207-230 Royer F., et al., 2012, SF2A-2012: Proceedings of the Annual meeting of the French Society of Astronomy and Astrophysics. Eds.: S. Boissier, P. de Laverny, N. Nardetto, R. Samadi, D. Valls-Gabaud and H. Wozniak, pp. 389-392 Ryabchikova T., et al., 2016, MNRAS, 456, 1221 Saio, H. et al. 2015, MNRAS, 447, 3264 Sbordone L., 2005, MSAIS, 8, 61 Schmid, V. S., Aerts, C. 2016, arXiv, 1605.07958 Seaton M. J., 1979, MNRAS, 187, 73 Shporer A., et al., 2014, ApJ, 788, 92 Smalley B., 2004, IAUS, 224, 131 Smalley B., et al., 2015, MNRAS, 452, 3334 Southworth J., et al., 2011, MNRAS, 414, 2413 Uytterhoeven K., et al., 2010, AN, 331, 993 Uytterhoeven K., et al., 2011, A&A, 534, A125 Takeda Y., Han I., Kang D. I., Lee B. C., Kim K. M., 2008, JKAS, 41, 83 Talon S., Richard O., Michaud G., 2006, ApJ, 645, 634 Telting J. H., et al., 2014, AN, 335, 41

Tkachenko A., et al., 2013, A&A, 556, A52 Tkachenko A., Lehmann H., Smalley B., Uytterhoeven K., 2013, MNRAS, 431, 3685 Tkachenko A., Lehmann H., Smalley B., Debosscher J., Aerts C., 2012, MNRAS, 422, 2960 Ulusoy C., et al., 2013, MNRAS, 428, 3551

APPENDIX A: COMPARISON WITH THE LITERATURE

Most stars presented in this work are analysed here for the first time. We summarise the literature on the remainder in this appendix.

• KIC 2162283 – eclipsing binary system. The star was analysed here as a single object and the results of all methods are consistent. Armstrong et al. (2014) combined the data from the photometric surveys to construct SED for this binary system and obtained primary and secondary stellar temperatures of 7530 ± 350 and 7520 ± 540 K.

• KIC 3219256 – our results are consistent with each other. Catanzaro et al. (2011) used low resolution data to obtain similar effective temperature 7500 ± 150 K and surface gravity 3.6 ± 0.1 dex.

• KIC 3429637 – the atmospheric parameters obtained in this work are consistent. The effective temperatures from SED with TD1 (7340 K) and without TD1 data (7260 K) are also similar. Renson & Manfroid (2009) mentioned this star in the catalogue of chemically peculiar objects, without pointing the peculiarity type. Catanzaro et al. (2011) analysed medium resolution spectra and obtained effective temperature 7100 ± 150 K, similar to our value. The surface gravity determined by them, 3.00 ± 0.20 dex is lower that our value, 3.40±0.10 dex. McDonald, Zijlstra, & Boyer (2012) determined fundamental atmospheric parameters from the analysis of the high-resolution spectra. The atmospheric parameters obtained by them, effective temperature 7300 ± 100 K, surface gravity 3.0 ± 0.1 dex, microturbulence 4.0 ± 0.5 km s^{−1}, and projected rotational velocity 51 ± 1 km s^{−1} are close to our results. They also confirmed earlier characterizations of KIC 3429637 as a marginal Am star.

• KIC 3453494 – our results are consistent. The star was analysed by Tkachenko et al. (2012). They found similar effective temperature from SED analysis, 7840 ± 240 K, and from spectral analysis, 7737 ± 57 K. Also their log g value is consistent with our result. On the other hand, the microturbulence value obtained here, 2.00 ± 0.5 km s^{−1}is lower than 3.24 ± 0.66 km s^{−1}determined by Tkachenko et al. (2012). It is the result of very fast rotation of this star, which makes it difficult to derive the correct value of microturbulence.

• KIC 3868420 – this star belongs to a multiple system consisting of two brighter and closer components, 10.35 and 10.61 mag, with separation 2.5”, plus a wide (26”) third component with V = 11.71 mag. For this reason the photometric magnitudes used for SED construction are unreliable, as they were obtained for the combined light of the close pair. There is insufficient photometry of the individual stars to obtain SED fits for each star. Moreover, this is a HADS pulsator, so photometry will sample the star at different phases and brightnesses. Our results from Balmer and iron lines

Spectroscopic survey of Kepler stars 15

analysis are consistent. Nemec et al. (2013) defined this star as HADS with T_{eff} = 7612 K, log g = 3.71, ξt = 2.3 km s^{−1}, macroturbulence 23.0 km s^{−1}, and v sin i = 5.7 km s^{−1} from spectrum synthesis. Their atmospheric parameters are consistent with our results except for microturbulence, which is lower. The differences in v sin i are caused by the inclusion of macroturbulence.

• KIC 5988140 – results obtained here are consistent with each other and with Paper I. Catanzaro et al. (2011) found a lower T_{eff} , 7400 ± 150 K, but the same log g 3.7 ± 0.3 from the analysis of low resolution spectroscopy. Lampens et al. (2013) found effective temperature 7600 ± 30 K, surface gravity 3.40 ± 0.12 dex, projected rotation velocity 52 ± 1.5 km s^{−1}, and microturbulence 3.16 ± 0.20 km s^{−1} from high-resolution spectroscopy and spectrum synthesis.

• KIC 5880360 – the atmospheric parameters obtained in this work are consistent. McDonald, Zijlstra, & Boyer (2012) determined effective temperature 7510 K from the SED analysis, significantly lower than the result obtained by us (8070 ± 220 K).

• KIC 6370489 – our results are consistent. Molenda-Żakowicz et al. (2013) determined similar effective temperature 6241 ± 116 K and surface gravity 3.98 ± 0.21 dex from the analysis of high-resolution spectra. Also Chaplin et al. (2014) obtained similar effective temperatures of 6300 ± 80 K and 6324 ± 144 K from photometric data.

• KIC 7119530 – the results from iron lines analysis are consistent with Paper I. Catanzaro et al. (2011) determined a lower effective temperature, 7500 K, from low resolution spectroscopy and Balmer-line analysis. Their surface gravity, 3.6 ± 0.3 dex is consistent with ours.

• KIC 7748238 – the atmospheric parameters obtained in this work agree very well with each other. Tkachenko et al. (2012) found similar values of T_{eff} (7264 K), log g (3.96) and ξt (3.53 km s^{−1}) from high-resolution spectrum synthesis.

• KIC 7798339 – our results are consistent. Nordstrom et al. (1997) analysed echelle spectra in the narrow wavelength range 5165.77–5211.25 Å to obtain T_{eff} = 7000 K, log g = 3.5 and v sin i = 15.4 km s^{−1}. These values are in good agreement with ours. Catanzaro et al. (2011) analysed medium resolution spectra and obtained effective temperature 6700 ± 150 K and surface gravity 3.7 ± 0.3 dex, close to our results. McDonald, Zijlstra, & Boyer (2012) determined T_{eff} = 6900 K from SED analysis, consistent with ours.

• KIC 8211500 – the atmospheric parameters obtained in this work are consistent. It is a binary system WDS18462+4408 of stars with magnitudes 8.19 and 11.28 and separation 0.7”. The SED result is for combined light, but the large magnitude difference means that the faint companion should not affect the results. McDonald, Zijlstra, & Boyer (2012) determined T_{eff} = 7709 K in accordance with our results. Similarly, Murphy et al. (2015) gave T_{eff} = 7800 K and log g = 3.8.

• KIC 8694723 – our results are consistent. Atmospheric parameters of this star determined from the analysis of high-resolution spectra were available before. Molenda-Żakowicz et al. (2013) obtained T_{eff} and log g (6287 ± 116 K, 4.00 ± 0.21), iron abundance (−0.38 ± 0.22), and v sin i value (3.8 ± 0.7 km s^{−1}) consistent with our results. Karoff et al. (2013) derived T_{eff} = 6287±60 K, log g =

4, 079 ± 0.035, iron abundance −0.59 ± 0.06, and projected rotational velocity 6.6 km s^{−1} in accordance with our values. The atmospheric parameters and projected rotational velocities close to the values obtained here were also given by Bruntt et al. (2012). Higher effective temperatures (about 6400 − 6500 K) were determined by Mortier et al. (2014) from the equivalent-width method and high-resolution spectroscopy.

• KIC 9349245 – the atmospheric parameter indicators adopted in this work agree very well with each other. Renson & Manfroid (2009) included this star in their catalogue of Ap, HgMn and Am stars, but without the classification of the peculiarity type. Balona (2013) classified this star as rotationally variable star on the basis of Kepler data. Balona (2014) determined the effective temperature of the star as 7690 K, lower than our results. Catanzaro et al. (2015) analysed the SED and high-resolution spectra and determined the atmospheric parameters of this star. The results from the SED (8250 ± 250 K) and from spectrum synthesis (T_{eff} = 8300 ± 200 K, log g = 4.00 ± 0.30, ξt = 3.1 ± 0.5 km s^{−1}, and v sin i 80 ± 3 km s^{−1}) are consistent with the results of our analysis.

• KIC 9408694 (V2367 Cyg) – is a HADS pulsator, so photometry used for SED construction can sample the star at different phases and brightnesses. Our results are consistent with each other, and in agreement with the valued determined before. Balona et al. (2012) analysed low-resolution spectra and obtained T_{eff} 7300 ± 150 K, log g 3.5 ± 0.1 consistent with our results. Also Ulusoy et al. (2013) analysed low-resolution data to obtain similar values. The best fit to the Hβ and Hα lines was obtained for effective temperature 7250 K and surface gravity 3.5 dex.

• KIC 9410862 – our results are consistent. Chaplin et al. (2014) determined effective temperatures from SDSS (6230± 53 K) and IRFM (6143 ± 148 K) photometry, in agreement with our results.

• KIC 10030943 – this is an eclipsing binary. The atmospheric parameter indicators adopted in this work agree with each other, except for the SED T_{eff} . This may be the result of the influence of the secondary star on the photometric indices. Using photometric methods, Armstrong et al. (2014) determined atmospheric parameters of both objects, effective temperatures 6761 ± 354 K and 6727 ± 549 K, respectively.

• KIC 10661783 – our results are consistent. This is an eclipsing binary of β Lyr type (semi-detached). It was analysed by Southworth et al. (2011) as an eclipsing binary system with δ Sct pulsations. They determined temperatures of both stars at 8000 ± 160 and 6500 K. Lehmann et al. (2013) analysed physical properties of both stars and found effective temperatures (7764 ± 54, 5980 ± 72 K), surface gravities (3.9, 3.6 dex), and projected rotational velocities (79 ± 4, 48 ± 3 km s^{−1}). Our results are consistent with the atmospheric parameters of the primary component. In a catalogue of Kepler eclipsing binary stars, Armstrong et al. (2014) give wildly discordant effective temperatures of 9197±475 K and 7714 ± 808 K for primary and secondary, respectively.

• KIC 11973705 – is a binary star, probably consisting of a late-B and a late-A star. We noted ellipsoidal variability in the Kepler light curve. The atmospheric parameters obtained in this work are consistent with each other, and corre-

16 E. Niemczura et al.

spond to the A star. The effective temperature from H2014 differs significantly from the other results, at 11000 K.

Lehmann et al. (2011) performed spectral analysis of Kepler SPB and β Cep candidate stars. They classified this star as SPB with spectral type B8.5 V-IV (HD 234999) and determined T_{eff} from SED analysis (7920 ± 100 K) taking into account TD-1 data. The effective temperature obtained by Lehmann et al. (2011) from spectral analysis is similar to the one in H2014, 11150 K. They therefore appear to have sampled both stars.

Catanzaro et al. (2011) noted that the spectral type recorded in the Henry Draper catalogue (B9), is an entire spectral class too early in comparison with their classification of A9.5 V. They classified the star as a δ Sct variable in a binary system. Their atmospheric parameters obtained from the analysis of low-resolution (R 5000) spectroscopy and 2MASS, uvbyβ and IRFM photometry are in accordance with our results.

Balona et al. (2011) searched Kepler observations for variability seen in B stars. The star was classified as binary system with an SPB and a δ Sct component, with spectral type B8.5 V-IVb. In a catalogue of effective temperatures for Kepler eclipsing binary stars, Armstrong et al. (2014) gave 7918 ± 356 K and 6528 ± 556 K, not particularly capturing the nature of either star. Balona et al. (2015) classified this star as Maia variable.

APPENDIX B: ADDITIONAL TABLES

Table B1. Abundances of chemical elements for the analysed stars (on the scale in which log ϵ(H) = 12). The median value is given; standard deviations were calculated only if the number of analysed parts or lines (depending on v sin i of the star) is greater than three. In other cases the average value calculated from standard deviations of other elements are given. Number of analysed parts or lines is given in brackets.

KIC 10030943 KIC 10341072 KIC 10661783 KIC 10717871 KIC 11044547 KIC 11622328 KIC 11973705 KIC 2162283 KIC 2694337 KIC 3219256 C 8.65±0.05 (6) 8.75±0.10 (5) 8.17±0.20 (4) 8.41±0.25 (5) 8.49±0.35 (5) 8.43±0.14 (3) 8.45±0.19 (2) 8.64±0.37 (14) 8.58±0.19 (10) 8.32±0.11 (2) N − − 8.42±0.20 (1) − 8.28±0.18 (1) − − 8.72±0.19 (2) 8.34±0.17 (1) − O 8.93±0.15 (1) − 8.92±0.20 (2) 9.02±0.19 (1) 8.92±0.18 (2) 8.93±0.13 (2) 8.49±0.19 (2) 9.17±0.19 (2) 9.02±0.17 (1) 8.78±0.11 (1) Ne − − − − − − − − − − Na 5.98±0.14 (3) 7.06±0.09 (3) 6.58±0.20 (2) 6.44±0.19 (2) 6.80±0.18 (1) − − 6.61±0.13 (3) 6.70±0.17 (2) 6.59±0.11 (1) Mg 7.30±0.23 (6) 7.74±0.23 (7) 7.79±0.18 (5) 7.65±0.12 (5) 7.68±0.14 (8) 7.71±0.05 (4) 6.81±0.11 (3) 7.63±0.17 (8) 7.80±0.12 (12) 7.66±0.13 (4) Al − 6.73±0.18 (1) − − 6.30±0.18 (1) − − 6.78±0.19 (1) − − Si 7.19±0.24 (12) 7.69±0.20 (13) 7.51±0.32 (11) 7.52±0.14 (10) 7.74±0.15 (8) 7.61±0.39 (3) 7.25±0.37 (3) 7.65±0.25 (36) 7.55±0.20 (17) 7.82±0.17 (7) P − − − − − − − − − − S 7.55±0.15 (2) 7.75±0.18 (2) 7.70±0.20 (2) 7.14±0.19 (2) − − − 7.61±0.16 (11) 7.39±0.23 (3) 7.05±0.11 (1) Cl − − − − − − − − − − K − − − − − − − − − − Ca 6.18±0.17 (15) 6.80±0.25 (18) 6.33±0.25 (13) 6.70±0.22 (12) 6.78±0.16 (15) 6.33±0.10 (5) 5.48±0.18 (8) 6.48±0.21 (22) 6.68±0.15 (13) 6.43±0.11 (9) Sc 2.94±0.12 (5) 3.64±0.15 (9) 3.36±0.19 (6) 3.50±0.39 (5) 3.37±0.24 (6) 3.26±0.04 (4) 2.11±0.25 (3) 3.04±0.23 (9) 3.21±0.14 (9) 3.13±0.08 (5) Ti 4.92±0.11 (25) 5.37±0.22 (25) 5.18±0.23 (21) 5.12±0.26 (17) 5.20±0.16 (27) 5.14±0.09 (10) 4.03±0.17 (10) 5.26±0.20 (50) 5.13±0.18 (23) 5.07±0.14 (15) V 4.23±0.21 (3) 4.39±0.35 (4) 4.10±0.18 (4) 4.55±0.19 (2) 4.87±0.18 (2) 4.22±0.13 (1) − 4.89±0.25 (9) 3.96±0.27 (3) − Cr 5.42±0.16 (20) 5.83±0.21 (23) 5.80±0.18 (18) 5.59±0.20 (16) 5.70±0.11 (16) 5.67±0.12 (10) 4.66±0.17 (5) 6.08±0.19 (64) 5.71±0.17 (23) 5.57±0.12 (12) Mn 5.30±0.24 (4) 5.80±0.25 (6) 5.15±0.29 (6) 5.80±0.09 (3) 5.48±0.18 (2) 5.29±0.13 (1) − 5.47±0.25 (17) 5.34±0.13 (5) 5.07±0.11 (2) Fe 7.07±0.10 (58) 7.63±0.08 (45) 7.51±0.12 (47) 7.45±0.11 (45) 7.63±0.13 (63) 7.40±0.09 (27) 6.50±0.14 (24) 7.71±0.14 (187) 7.60±0.07 (59) 7.40±0.10 (45) Co − 5.96±0.18 (2) − 5.78±0.19 (1) − − − 5.59±0.31 (4) 5.06±0.17 (1) − Ni 5.95±0.14 (21) 6.53±0.21 (29) 6.22±0.20 (13) 6.22±0.14 (11) 6.61±0.23 (8) 6.55±0.22 (3) 5.67±0.20 (5) 6.65±0.18 (72) 6.36±0.21 (25) 6.23±0.10 (9) Cu 4.45±0.15 (2) 4.30±0.09 (3) 3.36±0.20 (1) 4.06±0.19 (1) − − − 4.54±0.12 (3) 3.98±0.17 (2) − Zn 4.39±0.15 (1) 4.19±0.18 (1) − 4.21±0.19 (1) − − − 4.88±0.19 (2) 3.96±0.17 (1) − Ga − − − − − − − 4.02±0.19 (1) − − Sr 3.08±0.15 (1) 3.52±0.18 (2) 3.43±0.20 (1) 2.98±0.19 (1) 3.11±0.18 (1) 2.31±0.13 (1) 2.02±0.19 (1) 3.94±0.01 (3) 3.39±0.17 (2) 3.26±0.11 (1) Y 2.34±0.18 (6) 2.76±0.26 (5) 2.32±0.12 (4) 2.47±0.20 (3) 2.19±0.18 (2) 1.82±0.13 (1) 1.97±0.19 (1) 3.02±0.20 (15) 2.49±0.21 (5) − Zr 2.87±0.07 (4) 3.12±0.01 (3) 2.78±0.21 (3) 2.65±0.23 (4) 3.90±0.18 (1) − − 3.26±0.26 (10) 3.05±0.13 (5) − Ba 2.59±0.13 (3) 2.90±0.18 (2) 3.26±0.20 (2) 2.80±0.14 (3) 2.32±0.18 (2) 2.77±0.13 (1) 1.66±0.19 (2) 3.64±0.19 (4) 2.83±0.17 (2) 3.05±0.11 (2) La 1.39±0.15 (2) 1.35±0.18 (1) 1.56±0.20 (1) 1.61±0.19 (1) − − − 2.55±0.10 (5) 1.73±0.17 (1) − Ce 1.85±0.15 (2) − − − − − − 2.85±0.14 (12) 1.91±0.17 (1) − Pr − − − − − − − − − − Nd 2.08±0.15 (2) 2.38±0.18 (2) − − − − − 2.43±0.16 (9) 2.37±0.17 (2) − Sm − − − − − − − − − − Eu − 2.49±0.18 (1) − − − − − − − − Gd − − − − − − − − − − Dy − − − − − − − − − − Er − − − − − − − − − −

Table B1. continuation

KIC3331147 KIC 3429637 KIC 3453494 KIC 3868420 KIC 4647763 KIC 5880360 KIC 5988140 KIC 6123324 KIC 6279848 KIC 6370489 C 8.36±0.12 (12) 8.21±0.14 (8) 7.97±0.11 (2) 7.95±0.30 (11) 8.31±0.08 (5) 8.27±0.16 (1) 8.33±0.20 (7) 8.94±0.18 (2) 8.08±0.23 (13) 8.21±0.22 (24) N − − − − − − − − − − O 9.15±0.17 (1) 8.39±0.13 (1) 8.43±0.11 (1) 8.49±0.16 (1) − − 8.72±0.16 (1) − 8.19±0.17 (1) 8.52±0.22 (1) Ne − − − − − − − − − − Na 6.52±0.23 (3) 6.57±0.13 (2) − 6.67±0.34 (6) 6.64±0.26 (4) − 5.32±0.16 (1) − 6.37±0.23 (3) 5.95±0.13 (10) Mg 7.79±0.04 (6) 7.77±0.13 (5) 8.02±0.01 (3) 7.42±0.23 (13) 7.47±0.10 (7) 7.23±0.35 (4) 7.80±0.05 (4) 7.43±0.18 (2) 7.36±0.18 (10) 7.37±0.11 (12) Al − − − 6.67±0.16 (1) − − − − − − Si 7.60±0.19 (25) 7.47±0.17 (11) 7.98±0.16 (4) 7.68±0.25 (24) 7.48±0.31 (12) 7.05±0.16 (2) 7.62±0.26 (11) 7.50±0.18 (2) 7.36±0.25 (19) 7.29±0.26 (53) P − − − − − − − − − − S 7.28±0.15 (4) 7.45±0.08 (4) − 7.14±0.24 (10) 7.29±0.15 (1) − 7.40±0.16 (2) − 7.42±0.04 (3) 7.01±0.14 (10) Cl − − − − − − − − − − K − − − − − − − − − − Ca 6.58±0.26 (20) 6.70±0.12 (17) 6.46±0.09 (3) 5.66±0.21 (22) 6.60±0.14 (14) 6.20±0.15 (6) 6.53±0.20 (22) 5.60±0.25 (5) 6.37±0.12 (22) 6.11±0.17 (49) Sc 2.91±0.06 (7) 3.33±0.07 (11) 2.95±0.11 (2) 2.59±0.09 (9) 3.30±0.14 (7) 2.69±0.19 (4) 3.18±0.10 (9) 2.70±0.20 (5) 3.14±0.09 (10) 2.93±0.17 (21) Ti 4.92±0.15 (31) 5.03±0.18 (36) 4.99±0.19 (9) 4.93±0.19 (67) 4.93±0.12 (35) 4.61±0.10 (7) 5.13±0.13 (28) 4.58±0.23 (11) 4.83±0.13 (52) 4.73±0.19 (180) V 4.37±0.17 (2) 4.50±0.15 (7) − 4.66±0.17 (10) 4.18±0.15 (2) − 4.61±0.16 (2) − 4.32±0.29 (8) 3.73±0.19 (29) Cr 5.60±0.11 (29) 5.76±0.14 (34) 5.47±0.12 (3) 6.23±0.15 (94) 5.58±0.14 (25) 5.53±0.15 (7) 5.66±0.18 (25) 5.08±0.15 (5) 5.50±0.17 (55) 5.30±0.20 (155) Mn 5.32±0.25 (6) 5.46±0.16 (8) 5.30±0.11 (1) 5.74±0.19 (29) 5.28±0.24 (9) 5.15±0.16 (1) 5.08±0.20 (8) 5.41±0.18 (2) 5.05±0.22 (16) 4.99±0.26 (63) Fe 7.47±0.13 (95) 7.53±0.08 (82) 7.44±0.11 (17) 7.93±0.13 (438) 7.39±0.08 (62) 7.19±0.13 (24) 7.47±0.11 (87) 6.63±0.18 (21) 7.27±0.09 (154) 7.13±0.12 (652) Co 6.02±0.17 (2) 5.59±0.13 (2) − 5.40±0.05 (3) 6.36±0.15 (1) − − − 5.02±0.17 (1) 4.62±0.22 (27) Ni 6.12±0.19 (37) 6.49±0.11 (27) 6.17±0.11 (2) 6.96±0.13 (100) 6.28±0.13 (27) 5.85±0.09 (3) 6.30±0.15 (19) 5.50±0.08 (7) 6.08±0.16 (49) 5.86±0.15 (157) Cu 3.88±0.37 (3) 4.17±0.06 (3) − 4.92±0.16 (2) 4.42±0.15 (2) − − − 4.08±0.17 (2) 3.73±0.11 (5) Zn 4.16±0.17 (2) 4.83±0.13 (2) − 5.28±0.04 (3) 4.53±0.15 (2) − 4.57±0.16 (1) 3.70±0.18 (1) 4.57±0.17 (2) 4.18±0.04 (4) Ga − − − 3.38±0.16 (1) − − − − 2.96±0.17 (1) 2.40±0.22 (1) Sr 3.41±0.17 (1) 4.00±0.13 (2) − 4.00±0.16 (2) 3.56±0.15 (2) 0.79±0.16 (1) 3.91±0.16 (2) 0.61±0.18 (1) 3.69±0.17 (2) 2.66±0.11 (3) Y 1.97±0.21 (4) 3.01±0.19 (11) − 3.04±0.11 (17) 2.64±0.10 (7) − 2.62±0.24 (4) 2.20±0.18 (2) 2.53±0.23 (16) 1.99±0.25 (18) Zr 3.31±0.17 (2) 3.19±0.20 (6) − 3.00±0.16 (3) 3.06±0.22 (6) − 3.64±0.16 (2) − 3.01±0.11 (9) 2.45±0.26 (24) Ba 2.66±0.10 (3) 3.60±0.14 (3) 3.60±0.11 (1) 3.80±0.16 (5) 3.04±0.15 (2) 1.88±0.16 (2) 3.58±0.19 (3) 1.32±0.18 (1) 2.79±0.21 (3) 2.31±0.09 (5) La 0.60±0.17 (1) 1.60±0.22 (3) − 2.18±0.16 (2) 1.32±0.15 (1) − − − 1.63±0.22 (3) 0.96±0.19 (13) Ce 1.94±0.17 (2) 2.40±0.13 (1) − 2.79±0.03 (10) − − − − 2.22±0.17 (2) 1.60±0.20 (34) Pr 0.65±0.17 (1) − − 1.67±0.16 (2) − − − − − 0.46±0.34 (7) Nd 1.38±0.17 (1) 2.10±0.10 (6) − 2.40±0.10 (10) 1.84±0.15 (2) − 2.42±0.16 (1) − 2.04±0.18 (4) 1.29±0.23 (35) Sm − − − − − − − − − 0.93±0.22 (2) Eu − − − 2.01±0.16 (1) − − − − − 2.08±0.22 (2) Gd − − − − − − − − − 1.03±0.17 (3) Dy − − − − − − − − − 0.58±0.28 (4) Er − − − − − − − − − 1.43±0.22 (2)

Table B1. continuation

KIC 6443122 KIC 6670742 KIC 7119530 KIC 7122746 KIC 7668791 KIC 7748238 KIC 7767565 KIC 7773133 KIC 7798339 KIC 8211500 C 8.39±0.23 (4) 8.58±0.05 (3) 8.18±0.15 (3) 8.43±0.07 (3) 8.29±0.20 (13) 8.45±0.15 (6) 8.21±0.23 (5) 8.78±0.11 (8) 8.36±0.25 (27) 8.51±0.11 (4) N − − − − 7.99±0.16 (1) − − − 8.17±0.19 (1) − O 8.99±0.16 (1) 9.11±0.16 (2) 8.66±0.22 (2) 8.86±0.17 (2) 8.92±0.16 (2) 8.78±0.16 (1) 8.53±0.17 (2) 8.94±0.16 (1) 8.58±0.19 (2) 8.82±0.18 (2) Ne − − − − − − − − − − Na 7.04±0.16 (2) − 6.77±0.22 (1) 5.85±0.17 (1) 6.79±0.10 (4) 6.65±0.16 (2) 6.42±0.17 (2) 6.51±0.15 (4) 5.75±0.12 (7) 6.46±0.18 (2) Mg 7.37±0.08 (4) 7.86±0.19 (5) 7.71±0.17 (5) 7.76±0.16 (7) 7.82±0.07 (9) 7.87±0.16 (5) 8.06±0.24 (8) 7.70±0.09 (9) 7.45±0.18 (10) 7.95±0.18 (5) Al − − − − 6.77±0.16 (1) − − − 6.25±0.19 (2) − Si 7.40±0.24 (14) 7.34±0.27 (3) 7.86±0.29 (6) 7.31±0.40 (7) 7.56±0.19 (15) 7.74±0.22 (10) 7.77±0.21 (17) 7.62±0.24 (22) 7.28±0.21 (36) 7.36±0.18 (7) P − − − − − − − − − − S 7.39±0.11 (3) − − 6.92±0.17 (1) 7.46±0.26 (5) 7.59±0.16 (2) 7.27±0.17 (2) 7.47±0.02 (3) 7.06±0.13 (9) 7.63±0.18 (2) Cl − − − − − − − − − − K − − − − − − − − − − Ca 6.25±0.25 (12) 6.17±0.11 (7) 6.44±0.12 (6) 6.32±0.17 (12) 6.52±0.16 (29) 6.65±0.14 (13) 6.51±0.20 (23) 6.62±0.19 (24) 6.40±0.18 (41) 6.18±0.23 (13) Sc 2.86±0.12 (6) 3.32±0.29 (4) 3.29±0.30 (6) 3.26±0.15 (5) 3.23±0.17 (10) 3.18±0.19 (6) 3.30±0.09 (8) 3.40±0.24 (11) 3.10±0.19 (16) 2.99±0.23 (5) Ti 4.86±0.12 (17) 4.86±0.15 (8) 5.08±0.10 (8) 5.13±0.12 (18) 5.19±0.13 (47) 5.01±0.16 (20) 5.32±0.21 (31) 5.32±0.19 (55) 4.93±0.18 (115) 5.13±0.20 (20) V 4.61±0.16 (2) − − − 4.41±0.14 (5) 4.79±0.16 (2) 4.96±0.15 (4) 4.41±0.27 (5) 4.02±0.24 (18) 4.04±0.18 (1) Cr 5.65±0.17 (16) 5.63±0.14 (5) 5.68±0.23 (5) 5.58±0.14 (10) 5.79±0.18 (59) 5.55±0.16 (15) 6.00±0.14 (31) 5.92±0.16 (49) 5.41±0.23 (125) 5.88±0.14 (11) Mn 5.21±0.28 (7) 5.65±0.16 (2) 5.71±0.22 (2) 5.60±0.17 (2) 5.29±0.17 (11) 5.66±0.20 (5) 5.23±0.14 (8) 5.30±0.25 (15) 5.01±0.25 (35) 5.61±0.14 (3) Fe 7.50±0.08 (45) 7.31±0.11 (16) 7.38±0.21 (19) 7.45±0.12 (37) 7.46±0.10 (117) 7.49±0.11 (48) 7.75±0.13 (98) 7.64±0.11 (143) 7.13±0.12 (352) 7.56±0.09 (39) Co − − − − − − − 6.32±0.16 (2) 4.81±0.30 (16) − Ni 6.47±0.22 (23) 5.93±0.13 (3) 6.80±0.31 (4) 6.21±0.28 (9) 6.18±0.19 (34) 6.43±0.19 (18) 6.63±0.14 (23) 6.22±0.15 (47) 5.87±0.17 (100) 6.51±0.22 (11) Cu 4.51±0.16 (1) − − − 4.19±0.16 (2) 4.35±0.16 (2) 4.43±0.17 (1) 4.29±0.16 (2) 3.35±0.19 (1) − Zn 4.60±0.16 (2) − − 4.39±0.17 (1) 4.45±0.16 (1) − 4.76±0.17 (2) 4.29±0.16 (2) 3.97±0.19 (2) 4.48±0.18 (1) Ga − − − − − − − − − − Sr 3.43±0.16 (1) 1.23±0.16 (1) 1.48±0.22 (1) 2.90±0.17 (1) 3.93±0.16 (1) 3.27±0.16 (1) 4.10±0.17 (2) 3.74±0.16 (2) 3.20±0.04 (3) 3.02±0.18 (1) Y 2.70±0.09 (8) − 2.68±0.33 (3) 2.05±0.17 (2) 2.55±0.19 (10) 2.51±0.24 (4) 2.95±0.24 (6) 2.61±0.20 (8) 2.30±0.16 (19) 2.57±0.28 (3) Zr 2.90±0.16 (2) − − 3.18±0.17 (1) 2.78±0.21 (10) 3.63±0.04 (3) 3.14±0.17 (4) 3.09±0.20 (7) 2.92±0.13 (19) 3.45±0.18 (1) Ba 3.13±0.16 (2) 3.01±0.16 (1) 2.64±0.22 (2) 2.29±0.17 (2) 2.53±0.16 (2) 2.61±0.16 (2) 3.85±0.09 (4) 3.10±0.16 (2) 2.89±0.23 (4) 3.37±0.18 (2) La 1.52±0.16 (1) − − − 1.49±0.16 (2) − 2.45±0.17 (2) 1.37±0.16 (2) 1.29±0.19 (11) − Ce − − − − 2.27±0.22 (4) − 2.63±0.17 (1) 2.02±0.16 (1) 1.69±0.22 (34) − Pr − − − − − − − − 1.08±0.19 (2) − Nd − − − − 2.38±0.16 (2) − 2.60±0.17 (2) 1.65±0.14 (3) 1.44±0.26 (31) − Sm − − − − − − − − 1.43±0.19 (2) − Eu − − − − − − − − 0.30±0.19 (2) − Gd − − − − − − − − 1.19±0.08 (3) − Dy − − − − − − − − 1.37±0.04 (4) − Er − − − − − − − − 1.38±0.19 (1) −

Table B1. continuation

KIC 8222685 KIC 8694723 KIC 8827821 KIC 8881697 KIC 9229318 KIC 9349245 KIC 9408694 KIC 9410862 KIC 9650390 KIC 9656348 C 8.07±0.11 (5) 8.19±0.06 (9) 8.15±0.10 (3) 8.72±0.25 (3) 8.60±0.24 (9) 8.38±0.16 (13) 8.59±0.19 (20) 8.33±0.22 (10) 8.61±0.15 (1) 8.31±0.26 (15) N − − − − − 8.40±0.15 (1) − − − − O 8.92±0.14 (1) − 8.66±0.15 (1) 9.14±0.19 (2) 9.12±0.16 (2) 8.78±0.07 (4) 9.08±0.24 (1) − 8.95±0.15 (1) 8.68±0.23 (2) Ne − − − − − − − − − − Na 6.51±0.14 (1) 5.85±0.11 (7) 6.32±0.15 (2) − 6.95±0.21 (4) 7.18±0.21 (6) 6.52±0.17 (9) 6.03±0.11 (9) − 6.20±0.28 (3) Mg 7.50±0.08 (5) 7.22±0.12 (11) 7.99±0.15 (7) 7.95±0.14 (6) 7.92±0.14 (8) 8.11±0.12 (9) 7.82±0.17 (13) 7.54±0.05 (8) 8.07±0.15 (2) 7.51±0.19 (6) Al − − − − 6.67±0.16 (1) − − 5.78±0.17 (1) − − Si 7.47±0.25 (11) 7.24±0.28 (34) 7.64±0.23 (12) 7.53±0.25 (5) 7.73±0.18 (16) 7.93±0.20 (23) 7.67±0.29 (44) 7.32±0.19 (46) 7.29±0.19 (3) 7.03±0.25 (10) P − − − − − − − − − − S 7.14±0.14 (2) 7.00±0.17 (2) 7.55±0.15 (2) 7.83±0.19 (1) 7.57±0.11 (3) 7.50±0.11 (7) 7.47±0.16 (11) 7.06±0.17 (2) − 6.58±0.23 (1) Cl − − − − − − − − − − K − − − − − − − − − − Ca 6.27±0.13 (12) 5.99±0.16 (47) 6.59±0.20 (15) 6.50±0.20 (7) 6.67±0.18 (17) 6.87±0.18 (22) 6.58±0.19 (38) 6.22±0.18 (33) 6.56±0.14 (4) 5.85±0.12 (16) Sc 2.85±0.08 (5) 2.85±0.10 (23) 3.43±0.13 (6) 3.16±0.20 (5) 3.55±0.04 (6) 3.38±0.13 (7) 3.62±0.13 (13) 2.88±0.10 (16) 3.77±0.24 (5) 2.38±0.25 (5) Ti 4.77±0.09 (19) 4.65±0.16 (111) 5.11±0.12 (16) 5.07±0.23 (15) 5.42±0.13 (25) 5.30±0.17 (33) 5.25±0.20 (89) 4.74±0.15 (117) 4.88±0.09 (5) 4.40±0.20 (34) V 4.61±0.14 (1) 3.28±0.26 (11) 4.92±0.15 (2) 4.07±0.19 (1) 4.85±0.25 (5) 4.81±0.15 (5) 4.63±0.23 (13) 3.57±0.15 (22) − 4.07±0.22 (5) Cr 5.52±0.14 (13) 5.18±0.17 (105) 5.69±0.22 (15) 5.78±0.18 (8) 5.96±0.17 (25) 5.97±0.14 (33) 5.79±0.22 (97) 5.30±0.17 (110) 5.98±0.13 (5) 5.01±0.20 (27) Mn 5.14±0.15 (4) 4.94±0.19 (32) 5.43±0.15 (3) 5.67±0.19 (2) 5.75±0.26 (6) 5.74±0.10 (6) 5.25±0.24 (29) 4.97±0.19 (32) 6.13±0.15 (1) 4.65±0.34 (7) Fe 7.20±0.07 (47) 7.02±0.10 (431) 7.60±0.07 (34) 7.49±0.11 (26) 7.75±0.08 (53) 7.92±0.11 (89) 7.53±0.13 (338) 7.19±0.13 (427) 7.59±0.11 (13) 6.84±0.11 (81) Co − 4.60±0.12 (7) − − 5.41±0.16 (1) 6.40±0.15 (2) 5.04±0.22 (11) 4.70±0.06 (15) − 4.73±0.23 (2) Ni 6.05±0.18 (15) 5.76±0.12 (91) 6.47±0.17 (14) 6.42±0.19 (6) 6.61±0.14 (31) 6.89±0.16 (45) 6.28±0.15 (87) 5.93±0.15 (138) 6.66±0.15 (2) 5.86±0.37 (27) Cu 4.23±0.14 (2) 3.66±0.10 (3) 4.80±0.15 (2) − 5.24±0.16 (2) 4.62±0.15 (2) 4.10±0.11 (4) 3.78±0.01 (3) − 4.13±0.23 (2) Zn 4.47±0.14 (2) 4.24±0.17 (2) 4.40±0.15 (1) 4.66±0.19 (1) 4.46±0.16 (1) 5.18±0.15 (2) 4.61±0.24 (2) 4.18±0.08 (3) − 3.98±0.23 (2) Ga − 2.48±0.17 (1) − − − − 3.91±0.24 (2) − − − Sr 3.01±0.14 (1) 2.72±0.17 (2) 3.66±0.15 (1) 3.00±0.19 (1) 4.00±0.16 (1) 3.40±0.15 (1) 3.63±0.25 (3) 3.24±0.17 (1) 2.42±0.15 (1) 2.96±0.23 (2) Y 2.22±0.31 (3) 1.75±0.14 (14) 2.63±0.21 (3) 1.63±0.19 (1) 2.89±0.21 (7) 2.70±0.18 (7) 2.42±0.14 (11) 1.65±0.15 (16) 1.90±0.15 (1) 1.71±0.23 (7) Zr 2.73±0.14 (2) 2.49±0.28 (19) 3.04±0.14 (3) 3.12±0.19 (1) 3.22±0.08 (4) 3.13±0.33 (4) 2.95±0.20 (14) 2.75±0.34 (6) − 2.58±0.08 (5) Ba 2.17±0.14 (2) 2.22±0.15 (4) 3.14±0.15 (2) 2.76±0.19 (2) 3.08±0.16 (2) 3.62±0.14 (5) 2.76±0.16 (5) 2.13±0.25 (4) − 1.65±0.35 (3) La 0.77±0.14 (1) 0.89±0.24 (4) 1.74±0.15 (1) − 2.16±0.16 (2) 2.57±0.11 (3) 1.48±0.14 (8) 0.96±0.27 (5) − 1.16±0.23 (2) Ce − 1.44±0.14 (16) − − 2.25±0.16 (2) 2.59±0.10 (4) 1.85±0.21 (15) 1.44±0.14 (10) − 1.47±0.26 (3) Pr − 0.20±0.17 (2) − − − − 1.26±0.33 (3) 0.72±0.17 (1) − − Nd − 1.12±0.20 (12) − − 2.21±0.16 (1) 2.45±0.15 (2) 1.72±0.26 (14) 1.11±0.26 (18) − 1.75±0.23 (2) Sm − 0.70±0.17 (1) − − − − 1.25±0.24 (1) 2.10±0.17 (1) − − Eu − 0.68±0.17 (1) − − − − − − − − Gd − 1.11±0.17 (1) − − − − 1.77±0.24 (2) − − − Dy − 0.80±0.17 (1) − − − − 1.67±0.24 (2) − − − Er − − − − − − − − − −

Table B1. continuation

KIC 9828226 KIC 9845907 KIC 9941662 KIC 9970568 C 8.43±0.16 (2) 7.90±0.20 (19) 8.25±0.34 (4) 7.86±0.24 (2) N − 7.58±0.18 (1) − − O 8.89±0.16 (1) 8.57±0.04 (3) 8.55±0.20 (1) 9.26±0.24 (1) Ne − − − − Na − 6.08±0.15 (7) 6.66±0.20 (1) 6.66±0.24 (1) Mg 6.52±0.16 (2) 7.47±0.13 (13) 7.73±0.22 (4) 7.74±0.27 (5) Al − 6.15±0.18 (1) − − Si 6.60±0.16 (2) 7.34±0.16 (24) 7.73±0.14 (6) 6.89±0.34 (4) P − − − − S − 7.02±0.20 (8) 7.54±0.20 (1) 7.94±0.24 (2) Cl − − − − K − − − − Ca 6.21±0.16 (2) 6.01±0.11 (32) 5.69±0.19 (8) 6.37±0.21 (8) Sc 3.24±0.16 (2) 2.61±0.12 (9) 2.94±0.54 (3) 3.14±0.25 (3) Ti 3.91±0.13 (4) 4.79±0.15 (78) 5.13±0.16 (16) 5.18±0.25 (12) V − 4.27±0.21 (20) 4.70±0.20 (2) − Cr 4.71±0.16 (4) 5.39±0.20 (84) 6.07±0.19 (10) 5.41±0.30 (8) Mn − 5.23±0.20 (32) 5.20±0.13 (4) 4.91±0.24 (2) Fe 6.37±0.21 (11) 7.10±0.11 (272) 7.63±0.06 (39) 7.34±0.09 (21) Co − 5.18±0.04 (3) − − Ni − 5.79±0.23 (62) 6.49±0.11 (8) 6.07±0.28 (6) Cu − 3.93±0.18 (2) − − Zn − − 4.54±0.20 (1) 4.90±0.24 (1) Ga − − − − Sr − 2.61±0.18 (2) 3.89±0.20 (1) 1.99±0.24 (1) Y − 2.11±0.19 (8) 2.94±0.20 (2) 3.14±0.24 (2) Zr − 2.57±0.19 (16) 2.95±0.20 (1) 2.93±0.24 (1) Ba 1.23±0.16 (1) 2.01±0.14 (4) 3.97±0.20 (2) 3.47±0.24 (2) La − 1.43±0.13 (3) − − Ce − 2.05±0.17 (9) − − Pr − − − − Nd − 1.44±0.28 (6) − − Sm − − − − Eu − 0.87±0.18 (2) − − Gd − − − − Dy − − − − Er − 1.65±0.18 (1) − −