arXiv:2010.14295v1 [astro-ph.HE] 27 Oct 2020

MNRAS 000, 1–18 (2020) Preprint 28 October 2020 Compiled using MNRAS L^ATEX style file v3.0

The flaring X-ray corona in the quasar PDS 456

J.N. Reeves^{1,2⋆}, V. Braito^{2,1}, D. Porquet^3, A.P. Lobban^4, G.A. Matzeu^{4,5}, E. Nardini^{6,7}

1Department of Physics, Institute for Astrophysics and Computational Sciences, The Catholic University of America, Washington, DC 20064, USA 2INAF, Osservatorio Astronomico di Brera, Via Bianchi 46 I-23807 Merate (LC), Italy 3Aix-Marseille Univ., CNRS, CNES, LAM, Marseille, France 4European Space Agency (ESA), European Space Astronomy Centre (ESAC), E-28691 Villanueva de al Cañada, Madrid, Spain 5Department of Physics and Astronomy (DIFA), University of Bologna, Via Gobetti 93/2 – 40129 Bologna, Italy 6INAF, Osservatorio Astrofisico di Arcetri, Largo Enrico Fermi 5, I-50125 Firenze, Italy 7Dipartimento di Fisica e Astronomia, Università di Firenze, via G. Sansone 1, I-50019 Sesto Fiorentino, Firenze, Italy

28 October 2020; submitted to MNRAS

ABSTRACT

New Swift monitoring observations of the variable, radio-quiet quasar, PDS 456, are presented. A bright X-ray flare was captured in September 2018, the flux increasing by a factor of 4 and with a doubling time-scale of 2 days. From the light crossing argument, the coronal size is inferred to be ∼< 30 gravitational radii for a black hole mass of 10^9 M_⊙ and the total flare energy exceeds 10^{51} erg. A hardening of the X-ray emission accompanied the flare, with the photon index decreasing from Γ = 2.2 to Γ = 1.7 and back again. The flare is produced in the X-ray corona, the lack of any optical or UV variability being consistent with a constant accretion rate. Simultaneous XMM-Newton and NuSTAR observations were performed, 1 − 3 days after the flare peak and during the decline phase. These caught PDS 456 in a bright, bare state, where no disc wind absorption features are apparent. The hard X-ray spectrum shows a high energy roll-over, with an e-folding energy of E_{fold} = 51^{+11}_{−8} keV. The deduced coronal temperature, of kT = 13 keV, is one of the coolest measured in any AGN and PDS 456 lies well below the predicted pair annihilation line in X-ray corona. The spectral variability, becoming softer when fainter following the flare, is consistent with models of cooling X-ray coronae. Alternatively, an increase in a non-thermal component could contribute towards the hard X-ray flare spectrum.

Key words: galaxies: active – quasars: individual (PDS 456) – X-rays: galaxies – black hole physics

1 INTRODUCTION

Active Galactic Nuclei (AGN) are powered by accretion on to a Super Massive Black Hole (SMBH), as a result of viscous dissipation of gravitational potential energy in an accretion disc (Shakura & Sunyaev 1973). For the typical mass of SMBHs in AGN, which range from 10^6 M⊙ to ∼> 10^9 M⊙, most of the accretion power is radiated in the UV band, in the form of the so-called Big Blue Bump (Malkan & Sargent 1982; Czerny & Elvis 1987). The disc emission is generally too cool to emit significant X-ray radiation, which is instead produced via Comptonization; i.e. through inverse Compton scattering of disc photons in an X-ray corona of hot electrons close to the black hole (Haardt & Maraschi 1991, 1993). Early high energy observations of Seyfert 1 galaxies, e.g. with the OSSE instrument on-board the Compton Gamma-Ray Observatory (CGRO), showed that the power-law X-ray continuum rolls over at high energies above 100 keV (Zdziarski et al. 1993; Madejski et al. 1995; Gondek et al. 1996), implying that the X-rays arise predominately via thermal Comptonization.

A variety of X-ray observatories have since demonstrated the al-

⋆ e-mail: james.n.reeves456@gmail.com most ubiquitous presence of high energy cut-offs in the hard X-ray spectra of AGN; e.g. Beppo-SAX (Petrucci et al. 2001; Perola et al. 2002; Dadina 2007), Integral (Bassani et al. 2006; Molina et al. 2009; Malizia et al. 2014), the Neil Gehrels Swift Observatory (hereafter Swift) Burst Alert Telescope (BAT) (Ricci et al. 2018) and recently NuSTAR (Fabian et al. 2015, 2017; Tortosa et al. 2018; Kamraj et al. 2018; Middei et al. 2019). The high energy cut-off usually occurs at energies of around 100 keV or higher, where the coronal electron temperatures are typically inferred to lie in the range kT ∼ 50 − 200 keV (e.g. Malizia et al. 2014; Ricci et al. 2018).

The increase in sensitivity afforded by the imaging hard X-ray optics on-board NuSTAR (Harrison et al. 2013) have made it possible to extend these coronal studies to AGN with lower X-ray fluxes, when compared to the typical, nearby, X-ray bright Seyfert 1s, thereby expanding the parameter space of observations. As a result, a small number of AGN are now thought to show high energy cut-offs at lower energies than previously thought and where the coronal temperatures may be as low as kT ∼ 10 − 30 keV (Baloković et al. 2015; Tortosa et al. 2017; Kara et al. 2017; Turner et al. 2018). Indeed, from studying the large number of AGN available from the BAT hard X-ray survey, Ricci et al. (2018) deduced a possible anticorrelation between the cut-off energy and Eddington ratio, whereby

© 2020 The Authors

2 J.N. Reeves

the coronal temperature decreases with increasing ratio. Thus it is interesting to exploit new observations to test whether the typical X-ray coronal properties may differ in the high Eddington regime.

It is also well established that the X-ray emission from AGN is rapidly variable, on time-scales as short as a few kiloseconds (e.g. Mushotzky et al. 1993). Measurements of X-ray variability, characterised via the break frequencies in power spectra and from interband X-ray lags, are consistent with the corona extending down to a few gravitational radii from the black hole and with time-scales which appear to scale with the SMBH mass (e.g. Markowitz et al. 2003; McHardy et al. 2006; De Marco et al. 2013; Kara et al. 2016). This requires that coronae are compact and radiatively efficient, where the analysis of the coronal compactness versus their temperature reveal that most AGN lie close to the relations predicted for pair production and annihilation in the corona (e.g. see Fabian et al. 2015 and references therein). Pair-production then provides a necessary mechanism to regulate the coronal temperature; here if the temperature becomes too high an excess of pairs will be produced, leading to a redistribution of particle energies and subsequently quenching the X-ray luminosity. The corona is likely powered by magnetic reconnection events (e.g. Di Matteo 1998), as the thermal energy stored in the corona itself is insufficient (Fabian et al. 2017) and such events may account for the rapid X-ray flares observed towards many AGN (e.g. Merloni & Fabian 2001).

At a redshift of z = 0.184 (Torres et al. 1997), the radio-quiet quasar PDS 456 has a bolometric luminosity of about 10^{47} erg s^{−1} and is one of the most luminous nearby AGN (Simpson et al. 1999; Reeves & Turner 2000). Its black hole mass, estimated from virial scaling relations, is near to 10^9 M⊙ (Reeves et al. 2009; Nardini et al. 2015). As a result, the QSO likely accretes close to the Eddington limit. It is known for its ultra fast wind, with an outflow velocity of 0.25 − 0.3c, which has become well established through many X-ray observations over the last decade (Reeves et al. 2003, 2009; Behar et al. 2010; Reeves et al. 2014; Gofford et al. 2014; Nardini et al. 2015; Hagino et al. 2015; Matzeu et al. 2016, 2017b,a; Parker et al. 2018a; Reeves et al. 2018a,b; Boissay-Malaquin et al. 2019; Reeves et al. 2020).

Furthermore PDS 456 is rapidly variable in X-rays, as was first noticed from X-ray flares detected in RXTE and Beppo-SAX observations (Reeves & Turner 2000; Reeves et al. 2002), with the X-ray flux increasing by factors of two on time-scales down to tens of kiloseconds and it was noted to be unusual for a high luminosity quasar. Subsequently, its rapid variability has also been measured in long Suzaku observations in 2007 and 2013 (Matzeu et al. 2016, 2017a). In particular, the flare seen with Suzaku in 2013 was the most prominent flare observed to date (Matzeu et al. 2016); the X-ray flux increased by a factor of three on a timescale of less than a day, although unfortunately due to scheduling constraints the decline phase was missed. The 2007 Suzaku flares were less prominent (up to a factor of two in flux), but were accompanied by significant spectral variability, with the photon index varying between Γ = 2.0 − 2.4 during the flaring intervals (Matzeu et al. 2017a). Importantly, the large SMBH mass in PDS 456, of MBH ∼ 10^9 M⊙ also implies that a gravitational radius translates into a lightcrossing time of 5 ks. This makes it possible to directly probe the compact size-scales close to the SMBH, on observable time-scales, which may not be possible in an AGN of much lower mass.

Here we present new XMM-Newton, NuSTAR and Swift observations of PDS 456, performed in September 2018. The observations highlight the extremely variable nature of the X-ray corona in PDS 456. The Swift monitoring reveals a bright X-ray flare, with a total duration of about one week and where the X-ray flux in-

Table 1. Observations of PDS 456 in 2018.

Observation Start (UT)^a Stop (UT)^a Exp(ks)^b

XMM-Newton 09/20 14:22:48 09/21 13:01:12 61.1 NuSTAR 09/20 01:16:09 09/21 21:46:09 81.9 Swift Obs 1–18 08/22 15:52:57 09/13 09:16:54 46.9 Swift Obs 19–23 09/14 15:16:58 09/21 07:03:53 12.1 Swift Obs 24–33 09/22 21:07:27 10/06 03:53:56 28.2 Swift Obs 18 09/13 07:16:45 09/13 09:16:54 3.1 Swift Obs 19 09/14 15:16:58 09/14 17:09:53 2.5 Swift Obs 20 09/18 16:34:37 09/18 18:23:52 2.9 Swift Obs 21 09/19 22:44:01 09/19 23:02:52 0.9 Swift Obs 22 09/20 03:43:56 09/20 05:30:53 2.8 Swift Obs 23 09/21 05:01:52 09/21 07:03:53 2.9 Swift Obs 24 09/22 21:07:27 09/22 22:53:53 2.9

aStart and Stop times in MM/DD and HH:MM:SS in UT. bExposure in ksec with XMM-Newton EPIC-pn, NuSTAR FPMA or Swift XRT.

creased by a factor of four. Coordinated XMM-Newton and NuSTAR observations, performed 1 − 3 days after the flare peak, capture the decline phase of the flare in detail. The paper and analysis is organised as follows. The details of the observational campaign are described in Section 2, along with the Swift light-curves. Section 3 quantifies the broad-band X-ray spectrum of PDS 456, obtained in a bright state with XMM-Newton and NuSTAR, following the peak of the flare. Here the hard X-ray cut-off and coronal temperature are measured for the first time in PDS 456, revealing an unusually cool X-ray corona in this epoch. In Section 4, the spectral variability during the flare is quantified, where the X-ray emission became substantially harder, while Section 5 details the subsequent changes to the optical to hard X-ray Spectral Energy Distribution (SED). Section 6 discusses the physical properties of the variable X-ray corona in PDS 456, which may characterise the high energy emission from an AGN that accretes at a high Eddington rate. Note that all errors in the text and tables are quoted at 90% confidence for one interesting parameter (or Δχ^2 = 2.7). A luminosity distance for PDS 456 of DL = 860 Mpc was adopted, for cosmological parameters of H0 = 73 km s^{−1} Mpc^{−1} and Ω0 = 0.73.

2 DESCRIPTION OF OBSERVATIONS

2.1 XMM-Newton and NuSTAR Observations

PDS 456 was observed once with XMM-Newton in September 2018 and twice in September 2019, as part of a campaign to study the long-term variability of its X-ray ultra fast outflow; see Reeves et al. (2020) (hereafter paper I) for a detailed description of all of the observations. In this paper, the XMM-Newton observation in September 2018 is presented in detail, which was also performed simultaneously with NuSTAR and alongside a concerted Swift monitoring campaign. As is discussed further below, this observation caught PDS 456 in an exceptionally bright flaring state, in contrast to the low flux 2019 observations which were presented in paper I. The details of the 2018 XMM-Newton, NuSTAR and Swift observations are listed in Table 1.

The observations were processed using the NUSTARDAS v1.8.0, XMM-Newton SAS v18.0 and HEASOFT v6.25 software. NuSTAR source spectra were extracted using a 50^{′′} circular region centred on the source and background from a 76^{′′} circular region clear from stray light. XMM-Newton EPIC-pn spectra were extracted from single and double events in Large Window mode, using a 30^{′′} source

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 3

Figure 1. 0.3-10 keV band Swift XRT lightcurve of PDS 456 from 2017–2019, extracted from the monitoring campaign and illustrating 3 years of variability of the quasar. Note that the time axis corresponds to the time since the start of the monitoring in each year. The vertical dotted lines indicate the start times of the three XMM-Newton observations in 2018 and 2019. In particular the 2018 XMM-Newton caught PDS 456 in a bright state, approximately 2 days after a major flare in the lightcurve. In contrast the 2019 Swift XRT monitoring revealed PDS 456 in a much lower flux, occurring at a minimum during the 2019a observation. Note that the count rate errors on some data points are smaller than the marker sizes.

region and 2 × 34^{′′} background regions on the same chip. The spectra and responses from the individual FPMA and FPMB detectors on-board NuSTAR were combined into a single spectrum after they were first checked for consistency. The spectra are binned to at least 50 counts per bin and over-sampled the resolution by no more than a factor of three. Photometric data-points were also extracted from the XMM-Newton Optical Monitor (OM, Mason et al. 2001) images, taken with the V, U, UVM2 and UVW2 filters. We corrected for Galactic reddening by adopting the extinction law from Cardelli et al. (1989) with R = 3.1 and E(B − V ) = 0.45.

After background subtraction, the EPIC-pn spectrum resulted in a net count rate of 3.985±0.008 cts s^{−1} over the 0.4–10 keV band and a net exposure of 61.1 ks after correcting for detector deadtime. The background level was very low, < 0.4% of the net source rate. The pn source spectrum was tested for the possible presence of photon pile-up using the SAS task EPATPLOT. The ratio of singles to double pixel events were found to be within 1% of the expected nominal values and thus no significant pile-up is present. Spectra from the hard X-ray NuSTAR FPMA and FPMB detectors were included in the analysis over the 3–50 keV band, with net count rates of 0.207 ± 0.002 cts s^{−1} and 0.200 ± 0.002 cts s^{−1} respectively, while the net exposure per detector was 81.9 ks and 81.6 ks respectively. Here the background rate is only 5% of the source rate, although the spectrum becomes background dominated above 50 keV where the NuSTAR effective area declines.

Spectra from the XMM-Newton Reflection Grating Spectrometer (RGS, den Herder et al. 2001) were extracted using the RGSPROC pipeline and were combined into a single spectrum, after first checking that the individual RGS 1 and RGS 2 spectra were consistent with each other within the errors. The total net count rate obtained over the 6–27Å band was 0.197 ± 0.002 cts s^{−1} with a net exposure time of 76.3 ks per RGS.

2.2 Swift Monitoring

PDS 456 has also been monitored by the Swift satellite from 2017– 2019. A total number of 32 observations were conducted in 2018 over an approximate 6 week period from 2018/08/22 to 2018/10/06 in order to coincide with the visibility window of the XMM-Newton and NuSTAR observations (see Table 1). The observations were performed with a typical exposure time of 2-3 ks from the X-ray Telescope (XRT, Burrows et al. 2005) and with imaging exposures taken with both the V and UVW1 band filters on-board the Swift UVOT (Roming et al. 2005). Monitoring was also performed in 2017 over a longer 200 day baseline from 2017/03/23 to 2017/10/09, consisting of 45 individual exposures, on an approximate daily sampling during the first 18 days and the remainder of the monitoring with a roughly weekly sampling. Note the very start of the 2017 Swift campaign also coincided with a joint XMM-Newton and NuSTAR observation; the observations have been presented in Reeves et al. (2018b) and were at a low flux level. Monitoring was resumed for about a month from 2019/08/31 to 2019/09/26, consisting of 22 pointings, in order to coincide with the two 2019 XMM-Newton observations published in paper I.

Figure 1 shows the complete Swift XRT lightcurve of PDS 456 from the whole monitoring campaign, extracted over the 0.3–10 keV band. The three portions correspond to the 2017, 2018 and 2019 monitoring periods as described above. The start times of the three XMM-Newton observations in 2018 and 2019 are also marked with vertical dotted lines. Critically, the 2018 monitoring period captured a bright X-ray flare centred at T+27 days, where the count rate increased by a factor of 4 and down again over a baseline of just over a week. While flaring is also evident in the 2017 monitoring, these events occur at an overall lower count rate. The 2018 XMM-Newton and NuSTAR observations occurred just two days after the maximum in the Swift lightcurve and captured part of the decline phase of the flare. In contrast, the two XMM-Newton observations in 2019 (hereafter 2019a and 2019b) occurred at a much lower flux level, where in particular the Swift XRT count rate at the time of the 2019a observation was only ∼ 0.05 cts s^{−1}, at the minimum flux level of the monitoring and more than an order of magnitude lower than at the peak of the flare in 2018. As was shown in paper I, the two low flux 2019 observations revealed a wealth of absorption features from the fast wind from PDS 456, both in the iron K-shell band and at soft Xrays, while the 2019a observation was also heavily obscured at soft X-ray energies by a low ionization absorber with a column density

MNRAS 000, 1–18 (2020)

4 J.N. Reeves

Figure 2. A zoom in of the 0.3–10 keV Swift XRT lightcurve during the 2018 monitoring campaign. The time axis corresponds to the start of the 2018 Swift monitoring, as listed in Table 1. The XRT points are shown as black circles, while the observations corresponding to the X-ray flare are numbered from 18–24, with obs 20 occurring at the peak of the flare. The start and stop times of the NuSTAR observation are marked by the vertical dot–dashed red lines which occurred during the decline phase of the flare, at about two days after the flare peak. The XMM-Newton observation was centred near to Swift obs 23. For comparison the range of count rates observed in the 2019 Swift monitoring is shown by horizontal blue dotted lines, illustrating the quiescent flux level of PDS 456 captured one year later.

of NH ≈ 10^{23} cm^{−2}. Figure 1 of Reeves et al. (2020) showed the broad-band spectral comparison between these three observations.

As the main aim in this paper is to study the 2018 X-ray flare, Swift XRT spectra were extracted from various intervals based upon the 2018 lightcurve. The 32 Swift observations in 2018 are numbered from obs 1–33, where observation 15 was not performed due to a GRB trigger. These intervals are listed in Table 1 and are displayed in Figure 2, where the latter shows the 2018 XRT lightcurve binned per observation. Here, observations 1–18 occur prior to the flare (the pre-flare period), observations 19–23 coincide with the flare, while observations 24–33 occur in the post-flare period. In addition, XRT spectra from each of the individual observations from obs 18–24 were also extracted to follow the spectral evolution during the flare, with obs 20 occurring at the peak of the flare. In addition, photometry and fluxes were extracted from each of the V and UVW1 images obtained from the Swift UVOT, making it possible to monitor changes in the optical to X-ray SED during the flare.

3 THE 2018 XMM-NEWTON AND NUSTAR SPECTRUM

First the broad-band X-ray spectrum from the joint XMM-Newton and NuSTAR observations was analysed, in order to parametrize the overall spectral form during the bright flaring epoch in 2018. The EPIC-pn and NuSTAR spectra were fitted jointly over the 0.4– 50 keV band, where for the latter the combined FPMA and FPMB spectra are used, as they are consistent within errors. A constant multiplicative factor was also included between the NuSTAR and XMM-Newton spectra to allow for any cross normalisation differences between satellites; however, this was found to be consistent with 1.0 within errors. The latest version of the XSPEC TBABS model (Wilms et al. 2000) was used to account for neutral absorption due to our own Galaxy, which includes the fine structure around the O

Figure 3. The broad-band XMM-Newton and NuSTAR spectrum of PDS 456 in 2018. The model fitted (solid blue line) consists of a powerlaw continuum, absorbed by only the Galactic column of N_H = 2.57 ± 0.04 × 10^{21} cm^{−2}, which accounts for the downturn observed at low energies. The continuum is also modified at high energies by an exponential cut-off function with an e-folding energy of E_{fold} = 51^{+11}_{−8} keV, while a broad Gaussian emission line near 7 keV was also included. XMM-Newton EPIC-pn points are shown as black circles and NuSTAR as red crosses. The lower panel shows the data/model residuals. Spectra are binned by a further factor of ×3 for clarity and are plotted in the QSO rest frame.

K-shell and Fe L-shell photoelectric edges. Abundances were set to those of Wilms et al. (2000). The Galactic absorption component was subsequently well determined in all of the models below, where NH = 2.57 ± 0.04 × 10^{21} cm^{−2}, which is just slightly in excess of the predicted H I column density of NH = 2.4 × 10^{21} cm^{−2} based on 21 cm measurements (Kalberla et al. 2005). This indicates there is little excess of neutral absorption towards PDS 456 and is also consistent with the RGS measurements (see Section 3.3).

A simple powerlaw with the above Galactic absorption returned a poor fit, with a reduced chi-squared of χ^2_ν = 810/449 and a rollover in the NuSTAR spectrum is apparent at high energies above 10 keV. The continuum form was subsequently modified to include a high energy exponential roll-over (or cut-off powerlaw), where the hard X-ray continuum declines in the form of the multiplicative factor M(E) = exp[(Ec − E)/E_{fold}]. Here, E_{fold} corresponds to the e-folding energy at high energies, while the low energy cut-off was set to Ec = 0.01 keV, well below the soft X-ray bandpass. This substantially improves the fit statistic by Δχ^2 = 206 for Δν = 1 fewer degrees of freedom. Adding a broad Gaussian emission line to parametrize the iron K line emission also significantly improved the fit (Δχ^2 = 107 for Δν = 3). No soft X-ray excess is required to fit the data below 2 keV and the whole continuum is well described by the simple cut-off powerlaw.

The fit to this model is shown in Figure 3 and the model parameters are listed in Table 2. Overall the fit statistic is χ^2_ν = 496/445 and only low-level residuals are present against the model; applying a small additional systematic error of ±1% results in an acceptable fit statistic of χ^2_ν = 460/445. The photon index is Γ = 1.92 ± 0.02, while the NuSTAR spectrum is steeper above 10 keV and this is well described by the exponential roll-over with E_{fold} = 50.7^{+10.7}_{−7.6} keV. Only a single broad emission line at iron K is required by the data, with a centroid energy of 6.92 ± 0.16 keV, a width of σ = 0.83^{+0.19}_{−0.15} keV and an equivalent width of 230^{+55}_{−48} eV.

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 5

Table 2. 2018 XMM-Newton and NuSTAR Spectral Parameters.

Parameter Cut-off PL Reflection Comptt

Γ 1.92 ± 0.02 1.85 ± 0.02 – E^a_{fold} or kT^a 50.7^{+10.7}_{−7.6} 43.5^{+6.4}_{−5.4} 13.1^{+4.4}_{−2.1} τ^b – – 2.15^{+0.30}_{−0.36} N^c_{CPL} 3.57 ± 0.03 – – N^d_H 2.57 ± 0.04 2.70 ± 0.05 2.62 ± 0.03 E^e_{Gauss} 6.92 ± 0.16 – 6.84 ± 0.19 σ^e_{Gauss} 0.83^{+0.19}_{−0.15} – 0.91^{+0.23}_{−0.17} F^f_{Gauss} 2.9^{+0.7}_{−0.6} – 3.3^{+0.8}_{−0.7} EW^g 230^{+55}_{−48} – 257^{+62}_{−54} q^h – 2.2 ± 0.4 – log ξ^i – 3.1 ± 0.1 – θ^j – 67^{+23}_{−8} – R^k – 0.14 ± 0.04 – F^l_{2−10 keV} 9.5 – – L^m_{2−10 keV} 9.3 – – L^m_{0.3−50 keV} 26.7 – – χ^2_ν 496.1/445 494.3/444 500.8/445

aE-folding energy of cut-off powerlaw continuum or coronal temperature (comptt model) in units of keV. b Optical depth of corona cNormalisation of the cut-off powerlaw continuum in units of ×10^{−3} photons cm^{−2} s^{−1} keV^{−1} at 1 keV. dGalactic column density in units of ×10^{21} cm^{−2}.

eCentroid energy and width of Fe K Gaussian emission line in units of keV.

f Line flux in units of ×10^{−5} photons cm^{−2} s^{−1}. g Equivalent width of emission line in units of eV. hPowerlaw disc emissivity.

iLog ionization parameter of reflector. Units of ξ are ergs cm s^{−1} j Inclination in degrees.

k Reflection fraction, corresponding the ratio of the reflected flux seen at infinity to the incident continuum flux.

lObserved 2–10 keV flux, in units of ×10^{−12} erg cm^{−2} s^{−1}. mAbsorption corrected rest-frame X-ray luminosity, in units of ×10^{44} erg s^{−1}.

The energy of the line profile suggests an origin in He or H-like iron and is similar in terms of its parameters to the broad ionized emission line found in previous observations of this quasar (e.g. Reeves et al. 2009; Nardini et al. 2015). As per other observations of PDS 456, there is no requirement for a narrow, neutral Fe Kα line at 6.4 keV, with a tight upper limit on its equivalent width of < 13 eV. This is consistent with the X-ray Baldwin effect, whereby the Fe Kα equivalent width diminishes with increasing X-ray luminosity and/or Eddington ratio (Iwasawa & Taniguchi 1993; Bianchi et al. 2007).

In contrast to previous observations of PDS 456 (e.g. Reeves et al. 2009; Gofford et al. 2014; Nardini et al. 2015; Matzeu et al. 2017b; Reeves et al. 2020) there is no strong requirement for a blue-shifted iron K absorption line associated with a fast wind at this epoch. An upper-limit to its equivalent width of < 65 eV was found upon attempting to include a Gaussian line of negative normalisation in the 8–10 keV range. Indeed the lack of any strong absorption like residuals either in the iron K band or at soft X-ray energies (see Sections 3.3 and 3.4) suggests that only the bare X-ray continuum is observed in this bright 2018 epoch. Here, PDS 456 may be more similar to some of the bare Seyferts 1s reported in the literature; e.g. Ark 120 (Vaughan et al. 2004; Matt et al. 2014; Porquet et al. 2018), Fairall 9 (Lohfink et al. 2012; Yaqoob et al. 2016), TON S180 (Parker et al. 2018b; Matzeu et al. 2020).

3.1 Ionized Reflection

We also tested whether the continuum and broad iron K emission line could be fitted with ionized reflection from an accretion disc. The RELXILL (v1.3.10) reflection model (García et al. 2014) was used in place of the Gaussian line. This reflection model combines the ionized reflection calculations of García et al. (2013), with the relativistic blurring computed with the RELLINE model Dauser et al. (2013), in a self consistent manner. The input continuum was assumed to be of the same cut-off powerlaw form. The iron line profile, while broad, is not strongly redshifted and as a result the black hole spin was fixed at a = 0; equivalent fits in terms of χ^2 where found between zero (a = 0) and maximal spin (a = 0.998). The inner radius was fixed to the innermost stable circular orbit (ISCO), equivalent to Rin = 6Rg , while the outer disc radius was set to Rout = 400Rg . The powerlaw disc emissivity function, in the form of R^{−q} was allowed to vary, as were the disc inclination and the ionization and normalisation of the reflector. The reflection fraction (R) was subsequently computed, giving the ratio of the reflected flux observed at infinity to the continuum flux incident upon the disc. A Solar abundance of iron was assumed, as otherwise it is not well determined.

The results of the fit are also listed in Table 2. It is statistically equivalent to the one with a broad Gaussian line, while the continuum parameters, in particular the e-folding energy of the cut-off powerlaw, remain very similar. The emissivity index is relatively flat, with q = 2.2 ± 0.4, suggesting that the disc is fairly evenly illuminated per unit surface area as a function of radius. Note that the inclination angle is constrained to θ > 59^∘. The ionization parameter is high, with log ξ = 3.1 ± 0.1, with most iron being in the form of He and H-like ions, as might be expected with the centroid energy of the iron line being close to 7 keV. The reflection strength is modest, with R = 0.14 ± 0.04 and indicates that the spectrum is mainly continuum dominated. Overall, the reflector is consistent with originating from an ionized disc, where the illumination is not too centrally concentrated, as might be produced by a more extended corona. Indeed, if a lamp-post type geometry is adopted for the reflection, then a high upper-limit of h < 19Rg is found.

3.2 Thermal Comptonization Models

Given the presence of the high energy cut-off in the NuSTAR data, the broad-band spectrum was fitted with thermal Comptonization models. In such models, the seed UV disc photons are inverse Compton scattered by electrons in the X-ray corona with a thermal distribution characterised by a temperature of kTe, which could account for the high energy roll-over. The NTHCOMP (Zdziarski et al. 1996; Zycki et al. 1999) and COMPTT (Titarchuk 1994) models were adopted. The results are reported in Table 2 for the latter and these models also give a good description of the shape of the X-ray spectrum from PDS 456 in the 2018 epoch. An input (seed photon) temperature of kT = 10 eV was assumed, which is a plausible value for the inner disc blackbody temperature for a luminous quasar accreting at near to Eddington. The broad Gaussian emission line was also retained as before.

In Figure 4 the confidence contours are shown for the simple cutoff powerlaw model (in the Γ vs E_{fold} plane) versus the NTHCOMP model (in the Γ vs kTe plane). For each case either the e-folding energy or the coronal temperature are well constrained by the data, where for the latter model kTe = 13.1^{+3.0}_{−1.8} keV. Similar results were found for the COMPTT model for either a slab or spherical geometry. For the slab, kTe = 13.1^{+4.4}_{−2.1} keV with an optical depth of τ =

MNRAS 000, 1–18 (2020)

6 J.N. Reeves

Figure 4. Confidence contours for:- (left) the e-folding (cut-off) energy against photon index for a cut-off power-law model and (right) for the electron temperature versus photon index for the thermal Comptonization model, NTHCOMP. Confidence contours (inner to outer) correspond to the 68%, 90%, 99%, 99.9% and 99.99% confidence levels for two interesting parameters. The greyscale shading corresponds to the χ^2 values of the fit, as indicated by the right hand bar, with the best-fitting parameter space represented by the darker shades. The cut-off energy and thus the electron temperature are well determined, via the presence of the strong roll-over in the NuSTAR spectrum towards high energies. Note that the measured cut-off and coronal temperature are at the lower end of what is typically measured recently in other nearby AGN with NuSTAR (e.g. Fabian et al. 2015; Tortosa et al. 2018).

2.15^{+0.30}_{−0.36} . For the sphere, kT = 12.9^{+2.7}_{−2.0} keV and τ = 5.0 ± 0.6. The fit statistic is the same for both cases (χ^2_ν = 501/445) and the higher depth for the sphere is due to the geometry. The values for the slab-like corona are listed in Table 2. The coronal temperature is in line with approximate relation with the e-folding energy seen in other AGN, where E_{fold} ≈ 2 − 3kT (e.g. Fabian et al. 2015).

Note that we also checked to see whether the Comptonisation results hold for the case where we use a reflection model to model the iron K line, as in Section 3.1. We use the RELXILLCP variant of the RELXILL reflection model, which uses the Comptonized continuum computed by NTHCOMP for the input continuum. The coronal temperature is consistent with the above values, where here kT = 14.4^{+1.8}_{−1.7} keV.

The 2018 observation is the first time where it has been possible to measure the high energy cut-off (and thus the coronal temperature) in PDS 456. This is likely due to a fortunate combination of the high X-ray flux and the fact that the bare continuum has been observed, unmodified by wind absorption unlike in previous NuSTAR observations of the quasar (e.g. Nardini et al. 2015). However we note that the measured kTe is significantly lower than what has been typically measured in most AGN with NuSTAR (Fabian et al. 2015, 2017; Tortosa et al. 2018; Middei et al. 2019). We will discuss further the coronal properties of PDS 456 in Section 6.

3.3 The 2018 RGS Spectrum

The high resolution 2018 RGS spectrum of PDS 456 was also analysed in order to place constraints on any soft X-ray emitting or absorbing gas in the bright state. The RGS spectrum was grouped into bins of width Δλ = 0.1 Å and Δλ = 0.05 Å; the former was used to define the continuum and the latter, which slightly over samples the RGS resolution, was used to search for any lines. The continuum was fitted with a simple power-law and neutral Galactic absorption, this yielded Γ = 1.98±0.08 and NH = 2.8±0.3×10^{21} cm^{−2}, consistent with the continuum parameters from the broad-band XMM- Newton pn and NuSTAR spectrum. The RGS spectrum also shows no soft excess, with the same photon index found in the soft X-ray band as at higher energies. The O abundance is consistent with that

Figure 5. The combined RGS 1+2 spectrum from the 2018 observation, plotted in the observed frame. The spectrum is binned at Δλ = 0.1 Å resolution and the 1σ error bars are shown in grey. The solid red-line show a power-law continuum, of Γ = 1.98 ± 0.08, absorbed by a neutral Galactic column of N_H = 2.8 ± 0.3 × 10^{21} cm^{−2}. Note that the feature near 23 Å is due to the neutral O I edge due to our Galaxy. The lower panel shows the residuals (in σ) against this continuum. The only marginally significant feature is at 16.4 Å (13.8 Å rest frame) and may be associated with a weak Ne IX forbidden emission line (see red marker). Otherwise no significant features are found, in emission or absorption.

of Wilms et al. (2000), with AO = 1.10 ± 0.20. The overall fit statistic is reasonable (χ^2_ν = 255/207), which reduces to close to χ^2_ν = 1.0 upon the addition of a ±3% systematic (see Kaastra et al. 2011) due to the high signal to noise. The observed 0.45–2.0 keV flux is 4.8 × 10^{−12} ergs cm^{−2} s^{−1} (or 9.5 × 10^{−12} ergs cm^{−2} s^{−1} when corrected for Galactic absorption).

The RGS spectrum is plotted in Figure 5, with the residuals to the power-law shown in the lower panel. No strong line-like resid-

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 7

uals are present over the spectrum. None the less we performed a blind Gaussian search for any line features, adopting the binning at Δλ = 0.05 Å and noting any features (in emission or absorption) significant at the Δχ^2 > 9.2 level (or > 99% confidence for 2 parameters). The only formally significant feature is an emission line at an observed wavelength of 16.40 ± 0.06 Å (rest-frame 13.85 ± 0.05 Å). This is quite close to the expected wavelength of the Ne IX forbidden line (at 13.7 Å). The equivalent width is small (EW = 5.1 ± 2.1 eV), the line is unresolved (σv < 1200 km s^{−1}) and is significant at the level of Δχ^2 = 12.7. No other lines, in emission or absorption, are observed close to their expected positions in the observed frame; e.g. O VII Heα (forbidden, 26.17 Å, or resonance, 25.57 Å), O VIII Lyα (22.46 Å) or Ne X Lyα (14.37 Å). An upper-limit can be placed on the column density of a warm absorber, where the velocity is allowed to vary within ±5000 km s^{−1} of the expected line wavelengths. For an ionization constrained within the range of log ξ = 0 − 2 erg cm s^{−1} and for a turbulence of σ = 300 km s^{−1}, then NH < 7 × 10^{20} cm^{−2}. This is similar to the bare Seyferts, such as Ark 120 (e.g. Reeves et al. 2016).

3.4 Constraints on a Fast Wind in 2018

In paper I, evidence was found in the low flux 2019b spectrum of PDS 456 for systematically blue-shifted absorption lines arising from the strong resonance transitions of O VII Lyα, Ne IX Heα and Ne X Heα. These were found to originate from a blue-shifted absorber, with a column density of NH = 2.3^{+0.9}_{−0.6} × 10^{21} cm^{−2}, an ionization parameter of log ξ ∼ 3 and an outflow velocity of v/c = −0.257 ± 0.003. It was found that the outflow velocity was entirely consistent with that inferred for the iron K absorption profile and it was suggested that the soft X-ray absorber may originate from the outer (pc scale) regions of the fast accretion disc wind in PDS 456. Furthermore in the lowest flux 2019a epoch, the soft wind column increased to NH ∼ 10^{23} cm^{−2}, although the low soft X-ray flux prohibited a detailed RGS analysis of that epoch.

We can compare the 2019b RGS spectrum with the bright state 2018 RGS spectrum, where the latter has a three times higher flux over the 0.4–2.0 keV RGS band. The strongest absorption line in the 2019b RGS spectrum originated from O VIII Lyα at a rest wavelength of 14.6 Å (17.2 Å observed frame). In the 2018 spectrum we find only an upper limit on the magnitude of the equivalent width, of < 3.6 eV, significantly weaker than the value of 11.5^{+3.9}_{−3.2} eV measured in the 2019b spectrum. Similar tight upper limits are also found for the blue-shifted Ne IX and Ne X lines in the 2018 spectrum. This indicates that the strength of the soft X-ray wind has diminished in 2018, possibly as a result of the higher continuum flux and subsequent ionization state.

Constraints were placed on the iron K absorption from a fast wind in 2018, using the XMM-Newton pn spectrum. The same absorption grid as per the 2019 data in paper I was used, which had a turbulence velocity of 10 000 km s^{−1} to model the strong iron K absorption lines observed in the 2019a and 2019b data-sets. This grid was based on the SED of PDS 456 obtained from the simultaneous 2017 XMM-Newton and NuSTAR observations, which occurred at the start of the 2017 Swift monitoring (see Reeves et al. 2018b for further details). The 2017 SED is appropriate for the 2019 observations, as the X-ray flux was at a similar low level. However for the 2018 observation, the X-ray flux was substantially higher, relative to the steady optical/UV flux in PDS 456 (e.g. Hamann et al. 2018).

The effect of this continuum change on the gas ionization state was subsequently investigated. To quantify this difference and in particular its effect on the iron K band absorber, we compared the 7–

Figure 6. Net-rate multi-band 2018 Swift XRT and UVOT lightcurve of PDS 456. The panels, from top to bottom, show the 3–10 keV (hard band) and 0.3– 1.5 keV (soft band) XRT lightcurves, the ratio of the hard/soft lightcurves and the Swift UVOT V and UVW1 band lightcurves. There is a clear increase in the source hardness during the course of the flare. The slight drop in hardness at T + 28 days occurs in obs 21, which has the shortest exposure of all the Swift observations. In contrast, there is no variability in either the optical (V band) or UV (UVW1 band) lightcurves. Note, for some data-points, the marker sizes may be larger than the error bars.

30 keV band fluxes; i.e. directly above the iron K-shell edge threshold. For the 2018 observation, the 7–30 keV band flux measured with NuSTAR is F_{7−30 keV} = 7.6 × 10^{−12} erg cm^{−2} s^{−1}, which is about 5 times higher than the flux measured in the 2019b observation (F_{7−30 keV} = 1.5 × 10^{−12} erg cm^{−2} s^{−1}) or compared to the low flux 2017 observation (F_{7−30 keV} = 1.8×10^{−12} erg cm^{−2} s^{−1}). Hence, given the difference in the ionizing X-ray flux, one should expect to observe an increase in the ionization parameter of the absorber by about the same factor if the gas responds in proportion to the hard X-ray continuum.

To test this, the 2018 spectrum was initially fitted adopting the same column density as per the low flux 2019b observation (where NH ∼ 7.0^{+1.9}_{−1.6} × 10^{23} cm^{−2}; see Table 3, Reeves et al. 2020), allowing the NH to vary only within the bounds of the errors from the 2019b observation. The velocity was allowed to vary within ±0.05c of the 2019 values (from 0.2 − 0.3c). A lower limit on the ionization parameter for the 2018 observation was found, with log ξ > 5.75, which is at least a factor of four higher in linear space compared to the 2019b spectrum (log ξ = 5.02 ± 0.12, Reeves et al. 2020). This is consistent with the ionization of the wind changing in proportion to the hard X-ray flux, for a given column density. Thus the greater hard X-ray luminosity in the 2018 observation might account for the relative weakness of the wind features in that epoch.

MNRAS 000, 1–18 (2020)

8 J.N. Reeves

4 THE X-RAY FLARE

We have seen that the 2018 broad band X-ray spectrum of PDS 456, characterising the decline phase of the flare in Figure 2, can be well described by the thermal Comptonized emission from an X-ray corona. It is also devoid of any features from a fast wind, in contrast to the other epochs of this quasar observed from 2001–2019 (Reeves et al. 2003, 2009, 2014, 2018a,b, 2020; Behar et al. 2010; Gofford et al. 2014; Hagino et al. 2015; Nardini et al. 2015; Matzeu et al. 2016, 2017b,a; Parker et al. 2018a; Boissay-Malaquin et al. 2019). Next, the properties of the X-ray flare are described in more detail, while the variability of the X-ray spectrum is also analysed. The latter is important in this context, as it can determine the evolution of the X-ray corona during the flare.

The multi-band Swift lightcurve is shown in Figure 6. Here the XRT lightcurve is split into a hard (3–10 keV) and soft (0.3– 1.5 keV) band, while the ratio of the hard/soft lightcurve is also displayed. In addition the optical (V band) and UV lightcurves (UVW1 band, centred at 2600 Å, Breeveld et al. 2011) are plotted from the Swift/UVOT. Considering the X-ray lightcurves, the magnitude of the flare is greater in the harder band compared to the soft X-rays. This is clear in the hard/soft band ratio, which shows that X-ray emission is hardest at the peak of the flare and reveals a gradual decline in the hardness ratio during the decline phase of the flare. In complete contrast, no variability is observed in either the V or UVW1 band lightcurves, even during the flare interval. This strongly suggests that the variability of PDS 456 is confined to the X-ray corona, with no underlying variability from the accretion disc emission in the optical and UV bands.

For comparison, a similar analysis was also performed for the 2017 Swift observations, where we also compared the hard band, soft band and hard/soft ratio XRT lightcurves. For illustration, in Figure 7, we zoom into two portions of the monitoring; the first 18 days, where Swift followed a regular daily sampling (upper 3 panels) and the last 100 days during a roughly weekly sampling of the lightcurve (lower 3 panels). In the former, minor flaring episodes are seen of shorter duration (Δt ≈ 2 days), with flux changes of up to a factor of two. In contrast to the 2018 flare, no strong hardness variations were seen over the course of these small flares. In the latter portion of the lightcurve, a more pronounced flare is seen at T + 170 days, with a factor of three increase in X-ray flux. Only a small spike in hardness is present just after the peak of the flare. However, the less frequent sampling, plus the lack of XMM-Newton and NuSTAR coverage, preclude a more detailed analysis of the spectral evolution during this particular flare. Similar to the 2018 monitoring, no significant variability was seen in the V and UVW1 band lightcurves.

4.1 Spectral Evolution during the Flare

As was noted in Section 2 (see Table 1 and Figure 2), to study the spectral variability further, the Swift lightcurve was split into three broad intervals for spectral analysis; the pre-flare interval (obs 1– 18), the mean flare interval (obs 19–23) and the post-flare interval (obs 24–33). In addition the Swift spectra were also extracted from the individual Swift observations from obs 18–24, to study more closely the evolution during the flare. All of these Swift XRT spectra were fitted with a simple power-law continuum modified by the Galactic absorption column measured from the broad-band fit in Section 3. Given the relative short exposures of the Swift spectra, this was sufficient to achieve a good fit, while a high energy cut-off is not required given the lack of bandpass above 10 keV.

The resulting Γ values and the 2–10 keV fluxes and luminosites

Figure 7. As per Figure 6, but showing the hard, soft and hard/soft ratio Swift XRT lightcurves for a portion of the 2017 monitoring. The upper three panels show the first portion of the lightcurve, with a daily monitoring pattern and where short flaring episodes are seen. The lower three panels show the last 100 days of the monitoring, with a roughly weekly sampling and where a prominent flare was observed at T + 170 days. In contrast to the 2018 flare, no strong hardness ratio variations accompanied the 2017 flares.

Table 3. Evolution of PDS 456 during the 2018 Swift flare.

Observation Γ F_{2−10 keV}^a L_{2−10 keV}^b

Obs 18 2.21 ± 0.13 3.9 ± 0.3 4.0 ± 0.3 Obs 19 2.05 ± 0.13 6.2 ± 0.5 6.1 ± 0.5 Obs 20 1.70 ± 0.03 18.3 ± 1.2 17.0 ± 1.1 Obs 21 1.63 ± 0.19 16.3 ± 2.3 14.6 ± 2.1 Obs 22 1.65 ± 0.10 11.4 ± 1.0 10.5 ± 0.9 Obs 23 1.83 ± 0.11 8.8 ± 0.7 8.4 ± 0.7 Obs 24 1.93 ± 0.15 5.2 ± 0.5 5.0 ± 0.5 Obs 1–18 2.16 ± 0.03 3.3 ± 0.1 3.2 ± 0.1 Obs 19–23 1.78 ± 0.03 11.4 ± 0.4 10.7 ± 0.4 Obs 24–33 2.09 ± 0.04 4.3 ± 0.1 4.2 ± 0.1

a2–10 keV X-ray flux in units of ×10^{−12} ergs cm^{−2} s^{−1} b2–10 keV X-ray luminosity in units of ×10^{44} ergs s^{−1}

are reported in Table 3. The evolution of both the photon index and X-ray luminosities during the flare are also shown in Figure 8. The X-ray spectrum became significantly harder during the flare. In the pre-flare period (obs 1–18) the photon index is Γ = 2.16 ± 0.03, which is well within the typical range for PDS 456; e.g. where Γ = 2.0 − 2.4, as measured from previous simultaneous XMM-Newton

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 9

Figure 8. Evolution in the photon index (upper panel) and 2–10 keV luminosity (lower panel) during the flare. The individual Swift observations are shown as filled circles as marked, while the summed pre-flare (obs 1–18) and post flare (obs 24–33) epochs are indicated by the left and right arrows respectively. The photon index decreases by a factor of ΔΓ = −0.5 as the X-ray luminosity increases and reaches its lowest value during obs 20–22, following the peak of the flare luminosity in obs 20. The photon index steepens after obs 22, following the decline in the X-ray luminosity. Note that the vertical dotted (blue) horizontal line shows the start and stop time of the NuSTAR and the dashed (green) line the XMM-Newton observations. These follow the decline phase of the flare for up to 3 days after the flare peak at T+27 days.

and NuSTAR observations (e.g. Nardini et al. 2015). At the peak of the flare in obs 20, the photon index is substantially harder, with Γ = 1.70 ± 0.08 and then remains hard during obs 21 and obs 22, even as the luminosity of the quasar starts to decline. This may hint at a short delay, of about a day, of the spectral response to changes in the flare luminosity, which may arise from the physical extent of the corona (see below). After obs 22, the source hardness declines with the Xray luminosity and by the time of the post-flare interval (obs 24-33), the photon index has returned to a more typical Γ = 2.09 ± 0.04.

4.1.1 Fractional Variability

To quantify further the spectral changes during the Swift monitoring, we investigate the fractional rms behaviour of PDS 456 by computing the fractional variability (or Fvar) spectrum. This provides us with a measure of the fractional variability of the source as a function of energy and is a useful tool for exploring source behaviour on different time-scales (Igo et al. 2020). Following the description provided in Vaughan et al. (2003), we first extract light curves in a series of adjacent energy bands and then compute the excess variance, σ^2_{XS}, which is defined as: σ^2_{XS} = S^2 − σ^2_{err}, where S^2 is the sample variance and σ^2_{err} is the mean square error. We then compute the normalised excess variance by dividing by the squared mean count rate

Figure 9. The fractional variability (or F_{var}) spectrum of PDS 456 calculated from the Swift observations. The black points (upper curve) correspond to all the 2018 Swift observations, red points (middle curve) are the flare observations (obs 18–24) and green points (lower curve) are the non-flare periods (obs 1–17 and obs 25–33). A clear difference is seen in the F_{var} spectrum during the flare and non-flare intervals. During the flare, F_{var} increases strongly with energy, consistent with the variability being driven by the variable hard component. Outside of the flare, the variability is monochromatic, exhibiting no strong spectral evolution. The 2017 F_{var} spectrum is also shown (small blue circles) and does not show enhanced hard variability.

in each band; i.e. σ^2_{NXS} = σ^2_{XS}/x^2. The square root of this value gives the fractional variability, Fvar, which allows us to express the normalised excess variance as a percentage. Errors on Fvar are given by equation B2 in Vaughan et al. (2003).

This was applied to the Swift observations over 5 discrete energy bands. Time intervals were chosen which covered; (i) all the 2018 monitoring, (ii) observations 18–24 coincident with the flare, (iii) observations 1–17 and 25–33, which cover the remaining Swift pointings minus the flare. These are plotted in Figure 9 and over all the observations it is apparent that Fvar increases with increasing energy, i.e. greater variability is observed in the harder bands. However a striking difference is found from comparing the flare vs non-flare intervals; in the former Fvar increases with energy, while from the non-flare portion a flat Fvar spectrum is seen. This is also the case compared to the 2017 Fvar spectrum, where no enhanced hard X-ray variability is found (Fig 9, blue curve). This confirms that the 2018 flare is coincident with the substantial spectral hardening, as seen from the evolution in Γ during the flare, or from the emergence of a hard flaring spectral component. In contrast, the spectral hardening is not seen during the 2017 monitoring.

4.2 Energetics and Coronal Size

The total energy of the flare was calculated by integrating the L_{2−10 keV} curve in Figure 8 between obs 18–24 and by linear interpolation between data-points. The total energy emitted over the 2–10 keV band is E_{2−10keV} = 8 × 10^{50} erg. A bolometric correction was defined from the broad-band XMM-Newton and NuSTAR spectrum, between the 0.3–50 keV and the 2-10 keV bands, which

MNRAS 000, 1–18 (2020)

10 J.N. Reeves

Figure 10. XMM-Newton pn and NuSTAR 3–10 keV lightcurve during part of the decline phase of the flare, from approximately 1–3 days after the peak. The NuSTAR points (binned to 5814s orbital bins) are shown by the red filled circles, the pn points are in black. In particular, a rapid drop is observed during the XMM-Newton part of the curve, centred around Swift obs 23. Spectral slices were extracted from the three intervals as indicated, representing (i) a bright plateau period, (ii) a decline phase and (iii) a post-decline period.

resulted in a correction factor of κ ∼ 3. Thus the total energy emitted in X-rays during the flare is E ∼ 2 × 10^{51} erg s^{−1}. Note that as there was little variability in the UV and optical bands, this likely represents close to the total output of the flare.

Between obs 18–20, the 2–10 keV luminosity increased by a factor of 4.3 ± 0.6 over a 5 day period. This implies a doubling time for the flare of about 2 days, assuming a linear increase in flux, although the rise time may have been faster if the flare peaked earlier between obs 19 and 20. On the decline portion of the flare, the halving time is also approximately 2 days. From the light crossing argument, the doubling time implies a X-ray coronal size in PDS 456 of the order d ∼< cΔt ≈ 5 × 10^{15} cm, which for a black hole mass of 10^9M⊙ corresponds to d <∼ 30Rg . This suggests that the X-ray corona in PDS 456 is extended and the flare may originate from the entire Xray emitting region, rather than just an isolated hot spot or a compact point like source.

4.3 The decline phase in detail

The XMM-Newton and NuSTAR observations were also used to study in greater detail the spectral variability during the declining portion of the flare, due to the better statistics and finer time sampling. The NuSTAR observation occurred over an approximate timescale of 1–3 days after the flare peak, commencing just after obs 21 (and prior to obs 22) and ending before obs 24. The shorter XMM- Newton observation was centred around Swift obs 23; this is visualised by the vertical lines in Figure 8. The subsequent 3–10 keV band lightcurve from both XMM-Newton (EPIC-pn) and NuSTAR is shown in Figure 10. The lightcurve reveals part of the decaying period, but with more structure than is possible from the Swift monitoring and may suggest that the decline occurs over a series of step– like decreases. In particular, a rapid factor of ×2 drop in flux over Δt = 30 ks was observed over the middle portion of the curve.

Three distinct spectral intervals were defined as indicated on Figure 10 :- (i) an initial bright plateau phase, (ii) a decline phase and (iii) a post decline phase. NuSTAR spectra were extracted from each

Table 4. XMM-Newton and NuSTAR Spectral Slices.

Parameter slice 1 slice 2 slice 3

Γ 1.87 ± 0.01 1.92 ± 0.02 1.98 ± 0.02 E^a_{fold} 65^{+14}_{−10} 48^{+14}_{−9} 36^{+11}_{−7} N^b_{CPL} 4.51 ± 0.03 3.53 ± 0.02 3.13 ± 0.04 E^c_{Fe} 6.92 ± 0.16^{t t} σ^c_{Gauss} 0.96^{+0.22}_{−0.17}^{t t} F^d_{Fe} 7.3 ± 1.6 4.2 ± 2.0 2.9^{+1.2}_{−1.1} EW^e 395^{+85}_{−70} 290 ± 140 225^{+105}_{−95} C^f 0.95 ± 0.02 1.0^f 1.12 ± 0.03 F^g_{2−10 keV} 12.7 9.2 7.4 F^g_{10−50 keV} 11.2 7.1 4.4 L^h_{2−10 keV} 12.4 9.1 7.4 L^h_{10−50 keV} 11.0 7.1 4.5 Exp (XMM)^i 16.8 36.4 8.1 Exp (NuSTAR)^i 38.0 17.8 22.8 χ^2_ν 396.9/382 – –

aE-folding energy of the cut-off powerlaw continuum in units of keV. bNormalisation of the cut-off powerlaw, where the units are ×10^{−3} photons cm^{−2} s^{−1} keV^{−1} at 1 keV.

cCentroid energy and width of Fe K emission line in units of keV. dLine flux in units of ×10^{−5} photons cm^{−2} s^{−1}. eEquivalent width of emission line in units of eV.

f Multiplicative constant between the XMM-Newton and NuSTAR spectra. Fixed at 1.0 for slice 2.

g Observed flux, in units of ×10^{−12} erg cm^{−2} s^{−1}.

hAbsorption corrected rest-frame X-ray luminosity, in units of ×10^{44} erg s^{−1}.

iExposure time of slice in ksec from XMM-Newton or NuSTAR. tParameter is tied between the slices.

interval, as well as the portions of the XMM-Newton pn spectra in each phase. A constant multiplicative factor in flux between the XMM-Newton and NuSTAR spectra was introduced in the analysis to account for the offset in exposures between intervals (i) and (iii), while the XMM-Newton and NuSTAR intervals were entirely simultaneous in interval (ii) and the constant was set to 1.0. Note that the spectrum in interval 1 does not represent the peak of the flare, as a strong drop in flux was observed by Swift just prior to this interval, occurring between obs 20 and obs 22 (Figure 8).

The three spectral slices were fitted with a cut-off powerlaw model modified by Galactic absorption, which is shown in Figure 11 (left panel). This provides a good representation of the broad-band X-ray continuum and the high energy roll-over is also apparent in all three slices, as per the mean spectrum. The parameters from applying this model to all the slices are listed in Table 4, where a broad Gaussian line is also included. Figure 11 (right panels) shows the residuals of the NuSTAR slices against the continuum, before including the broad line in the model. As is discussed below, the iron emission line is particularly apparent in residuals of the bright first slice, peaking close to 7 keV in the rest frame.

Overall, as per the Swift observations, the continuum appears to become softer as the flux declines, where the photon index increases from slice 1 (Γ = 1.87 ± 0.01) to slice 3 (Γ = 1.98 ± 0.02). There is marginal evidence for the e-folding energy to decrease, where in the bright slice 1, E_{fold} = 65^{+14}_{−7} keV and in the faintest slice 3, E_{fold} = 36^{+11}_{−3} keV. The combination of the change in Γ and E_{fold} reproduces the spectral softening apparent in Figure 11 from slice 1 through to slice 3.

Curiously, as is seen from Table 4, the flux of the broad iron K line near 7 keV decreases with the declining continuum flux, while as a result its equivalent width remains constant (within errors).

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 11

Figure 11. Left panel. The fluxed XMM-Newton pn (crosses) and NuSTAR (filled circles) spectra from slices 1–3. The spectra are fluxed against a Γ = 2 power-law and corrected for Galactic absorption. The best fit cut-off powerlaw model to each slice is shown as a solid line, including the broad Gaussian emission at Fe K. As the source flux declines, the spectra become noticeably softer, consistent with the trend seen in Figure 8. Right panel. The residuals of the three NuSTAR slices against the cut-off powerlaw continuum, prior to including any iron K emission line. The broad emission line peaks near 7 keV and appears strongest during the brightest slice 1 and then diminishing as the hard X-ray continuum declines (see Table 4). Note the final slice 3 shows some absorption residuals between 9–10 keV, which may indicate that the wind starts to re-emerge once the X-ray flux declines.

The iron line flux is about 2.5 times higher in the brightest slice 1 (FFe = 7.3 ± 1.6 × 10^{−5} photons cm^{−2} s^{−1}), versus the faintest slice 3, where FFe = 2.9 ± 1.2 × 10^{−5} photons cm^{−2} s^{−1}, while the hard X-ray (10–50 keV) flux decreases by the same factor. Thus the line emitter may respond to the decline in the continuum. In this context, the relatively large line flux in slice 1 might be due to a response to an earlier high continuum level (e.g. at the flare peak in obs 20), via a subsequent reverberation delay. Unfortunately the short Swift observations cannot measure the iron line at early epochs to confirm this. None the less, the observed response of the line flux between slice 1 and 3 on a time-scale of within a day corresponds to a light crossing distance of R ∼ 3 × 10^{15} cm, or ∼ 20Rg for MBH = 10^9 M⊙. Thus it may be that the iron K emission from the inner disc regions is being revealed in this unusually bright, bare state of PDS 456. Note, if we instead parametrize the iron K emission with ionized reflection, as per Section 3.1, then the flux of the reflection component also diminishes with decreasing luminosity.

Finally we also placed limits on the presence of the fast, ionized wind in the three slices. We parameterise it through a simple Gaussian line of negative normalisation. In slice 3, there is some evidence (e.g. Figure 11, right, lower panel) of negative residuals between 9– 10 keV in the NuSTAR data. Upon modeling these with a Gaussian line, the equivalent width of the absorption line is 170 ± 95 eV in slice 3, compared to < 90 eV in slice 1 where no residuals are apparent. However, as this change is not significant at the 90% level, we are unable to further quantify the change of the wind in response to the continuum on these short timescales.

4.3.1 Fractional Variability and Difference Spectrum

The Fvar spectrum was also computed for the 2018 XMM-Newton EPIC-pn and NuSTAR observations. For the pn, we do this over 30 approximately equally logarithmically spaced energy bins from 0.3– 10 keV, while for the NuSTAR spectrum, we use 10 bins from 3– 50 keV. For both data-sets, we extracted light curves with a bin size of Δt = 5 814 s, corresponding to the NuSTAR orbital time-scale. The subsequent Fvar spectrum is shown in Figure 12 (left panel).

Note that the y-axes are slightly different for the two spectra. This is because the NuSTAR observation covered a longer baseline and so we are sampling variability on a slightly longer time-scale than with XMM-Newton. A high minus low difference spectrum was also extracted for comparison and is also plotted in Figure 12 (right panel). In this case, the slice 1 minus slice 2 spectrum was computed, as the slice 3 spectrum has a much shorter XMM-Newton exposure.

Both the Fvar and difference spectra show a hard, rising spectrum below 10 keV from the XMM-Newton data, indicating that the variability is dominated by a harder spectral component. However in the NuSTAR band above 10 keV, the spectra roll over, showing that the variability diminishes towards higher energies. The difference spectrum has been compared to a power-law of Γ ∼ 1.7 fitted below 10 keV, which, when extrapolated above 10 keV over-predicts the variable emission that is seen. Instead the spectrum can be simply parametrized by a broken power-law function, where the photon index steepens from Γ = 1.74 ± 0.05 to Γ = 2.15 ± 0.15 around a rest-frame break energy of 10 keV. This could also be accounted for by a cut-off power-law, where in this case, given the larger errors, the e-folding energy is constrained at the 90% level to be between 25– 100 keV. Interestingly, the photon index below 10 keV is consistent with that obtained in the Swift spectra near the peak of the flare and thus could be indicative of a harder, Comptonized emission component, which may dominate the flare emission.

The Fvar and difference spectrum of the flare here is quantitatively similar to that measured during the 2007 Suzaku observation of PDS 456, when the QSO was also in a fairly bright, continuum dominated state; see Matzeu et al. (2017a) for details. There, a mixture of hard and soft X-ray flares were observed. Although the level of variability in 2007 was more modest, the Fvar spectrum of the Suzaku hard flares showed a very similar form to that observed here (e.g. compare with Figure 12 and 13 of Matzeu et al. 2017a), with a rising spectrum up to 10 keV, consistent with a harder Γ = 1.7 − 1.8 powerlaw. In contrast, the soft X-ray flares seen appeared to show the opposite behaviour, with an increase in the soft X-ray excess (which is not observed here) and a steepening of the

MNRAS 000, 1–18 (2020)

12 J.N. Reeves

Figure 12. (a) The F_{var} spectrum and (b) the difference spectrum, computed from the XMM-Newton and NuSTAR observations. Both show a rising spectrum below 10 keV, which is consistent with the variable emission arising from a harder component associated with the flare, with a photon index of Γ = 1.7 (solid black line in the difference spectrum). Above 10 keV, the spectra harden as the variability starts to diminish towards higher energies. This may be due to the presence of the high energy cut-off, which is apparent in all of the hard X-ray spectral slices.

2–10 keV power-law component up to Γ = 2.4. This may suggest a bi-modal behaviour of the X-ray flares seen towards PDS 456.

5 THE EVOLUTION OF THE SED DURING THE FLARE

Next, the evolution of the SED of PDS 456 during the course of the flare is modelled and the results are interpreted in the framework of accretion disc corona models. Four different epochs were considered:- (i) the pre-flare SED (formed from the obs 1–18 Swift observations), (ii) the peak flare SED (Swift obs 20), (iii) the decline phase (from the simultaneous XMM-Newton and NuSTAR spectrum) and (iv) the post-flare SED (Swift obs 24–33). Using the mean XMM- Newton and NuSTAR observation for epoch (iii) allows a high signal to noise parameterisation out to hard X-rays of the declining flare phase. As there was no variability in either the optical or UV bands throughout the 2018 campaign, the mean XMM-Newton OM and Swift UVOT photometric points were used to characterise this part of the SED and these are applied to each of the epochs with a 2% systematic error in flux^1. The SED of these four epochs are shown in Figure 13. For plotting purposes only, the X-ray spectra have been corrected for Galactic absorption, while the optical and UV fluxes have been corrected for reddening, as per Section 2.

The frequently used OPTXAGNF model (Done et al. 2012) was then used to describe each of the epochs, which fits the SED from an accreting SMBH in an energetically consistent manner (Jin et al. 2012). This model comprises of three different emission components which are illustrated schematically in Figure 5 of Done et al. (2012). At radii greater than Rcor, the gravitational potential energy is released in the form of a colour corrected disc blackbody spectrum and this accounts for the optical and UV continuum. Within the coronal radius, Rcor, the power is radiated in a hot Comptonized component to produce the hard X-ray power-law, with the remainder in the form of a warm Comptonized component and can explain the soft Xray excess which is often observed in AGN when its temperature is above about 0.1 keV. The fraction of the accretion power below Rcor that is radiated in the form of the hard X-ray power-law is given by the parameter, fPL.

1 see https://xmmweb.esac.esa.int/docs/documents/CAL-SRN-0378-1- 1.pdf for an estimate of the XMM-Newton OM systematics

Here, our aim is to quantify the relative changes of the hard powerlaw indices and their corresponding fPL values between the epochs, as well as to estimate the scale of the coronal radius and the overall luminosity. We note that an in-depth SED spectral analysis, including relativistic and inclination angle effects as performed for Ark 120 (Porquet et al. 2019), is beyond the aim of the present paper and will be reported in forthcoming work. We used a modified version of OPTXAGNF that allows the hot corona temperature to be a free parameter, rather than fixed to 100 keV (C. Done, private communication). As no significant soft X-ray excess is observed in the 2018 PDS 456 spectra, the electron temperature of the warm opticallythick component was set to kTe = 0.1 keV. Thus in the present case, the warm Comptonization component has no observable impact on the observed X-ray spectra, although it may enhance the Wien tail of the disc emission in the unobservable extreme UV band. A co-moving proper distance of 726 Mpc^2 and a black hole mass for PDS 456 of MBH = 1 × 10^9 M⊙ were adopted as model input parameters. This is consistent with the black hole mass estimates from either Reeves et al. (2009) or Nardini et al. (2015), computed on the basis of the correlation between Hβ FWHM and 5100 Å luminosity arising from a virialized BLR; e.g. from Nardini et al. (2015), then log(MBH/M⊙) = 9.2 ± 0.2. The effect of adjusting the black hole mass is discussed below. The dimensionless black hole spin parameter (a) was fixed to a = 0, and the default inclination of cos i = 0.5 is assumed, which is also consistent with the reflection modelling in Section 3.1.

Only two parameters are required to vary between epochs. These are the coronal parameters, the hard X-ray photon index (Γ) and fPL, the fraction of the accretion power radiated in the hot corona. Note that while both the Eddington fraction and the coronal radius are free parameters in the model, they are not allowed to vary between the four epochs. This is due to the lack of variability in the optical and UV band, as a significant adjustment in either parameter between epochs produces strong variations in the accretion disc emission (e.g. as per the SED of Ark 120, Porquet et al. 2019) which is not observed in the Swift UVOT lightcurve of PDS 456. The results from applying the OPTXAGNF model to the four SED epochs

2 The luminosity distance, D_L, is then calculated from the co-moving distance, D_{CM}, as D_L = (1 + z)D_{CM}

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 13

Figure 13. The 2018 optical to X-ray SED of PDS 456 and fitted by the

OPTXAGNF model (see text). The X-ray data-sets correspond to:- (i) the pre-

flare Swift spectrum (obs 1–18, black filled circles), (ii) the peak flare spectrum (Swift obs 20, blue open circles), (iii) the mean XMM-Newton and NuS- TAR spectrum (red crosses, representing the flare decline epoch) and (iv) the post flare spectrum (Swift obs 24-33, green stars). The optical and UV photometric points are from the Swift UVOT (blue open circles) and XMM-Newton OM (red circles); these have been applied to all epochs as there is no optical or UV variability. The SED changes can be purely described by variability in the hot coronal emission, with no resulting change in the overall mass accretion rate.

is shown in Table 5. The photon index shows the same hardening as observed in the Swift monitoring, decreasing by ΔΓ = −0.5 at the peak of the flare, while fPL increases from ∼ 9% (preflare) to ∼ 17% (peak flare) and back down again post-flare. Thus the SED changes observed in Figure 13 are purely described by the variability of the X-ray corona, with no changes in the overall disc emission or accretion rate. The best-fitting Eddington ratio is log(L/L_{Edd}) = −0.38^{+0.06}_{−0.07} for an assumed black hole mass of MBH = 10^9 M⊙, i.e. ∼ 40% of Eddington. The total bolometric luminosity is L_{bol} ∼ 5 × 10^{46} ergs s^{−1}. The coronal radius, which describes the transition between the optically thick disc and the coronal region, is Rcor = 35^{+8}_{−4} Rg (or Rcor ∼ 5 × 10^{15} cm). The coronal extent is broadly consistent with the size-scale derived from the flare variability in Section 4. The inferred hot corona temperature of kT = 13^{+3}_{−2} keV is very similar to that found in section 3.2.

The effect of adjusting the black hole mass in the SED model was also investigated. This just results in changes in the Eddington ratio and the coronal radius, the other parameters (Γ, fPL) are virtually unchanged. Adopting a smaller mass of MBH = 5 × 10^8 M⊙, the Eddington ratio is correspondingly higher with log(L/L_{Edd}) = 0.21 ± 0.04 and is mildly super-Eddington. Black hole mass values much smaller than this are unlikely, as PDS 456 would then be significantly super-Eddington. The coronal radius is moderately larger in terms of the gravitational radius in this case (Rcor = 47^{+3}_{−4} Rg), with a fit statistic identical to the model reported in Table 5 for a 10^9 M⊙ black hole.

6 DISCUSSION

6.1 The Cool X-ray Corona of PDS 456

For the first time it has been possible to measure the high energy cut-off in the hard X-ray spectrum of PDS 456, thanks to the high X-ray flux and continuum dominated spectrum from the 2018 NuSTAR and XMM-Newton observations. PDS 456 also appears one of the highest luminosity AGN for which the cut-off has been measured. The cut-off energy (of E_{fold} ∼ 50 keV) and thus the coronal temperature (of kT ∼ 15 keV) revealed for PDS 456 are substantially lower than measured at hard X-rays for most other AGN, where typical rollover energies of 100 keV or higher are observed; e.g. with Beppo-SAX (Perola et al. 2002; Dadina 2007), Swift-BAT (Ricci et al. 2018), Integral (Malizia et al. 2014) or NuS- TAR (Fabian et al. 2015; Tortosa et al. 2018; Kamraj et al. 2018). For instance Kamraj et al. (2018) studied the cut-off energies obtained from NuSTAR observations of hard X-ray selected Swift BAT AGN. Of these, only 6 out of 46 AGN had lower-limits on the cut-off consistent with values of about 50 keV or lower.

Subsequently, Middei et al. (2019) performed a detailed comparison between AGN cut-offs measured with NuSTAR (Tortosa et al. 2018) and the predictions made with the MoCA model (Monte-carlo code for Comptonization in Astrophysics; Tamborra et al. 2018). The latter performs up to date photon ray tracing simulations of the corona, predicting output Comptonized spectra for a variety of different physical conditions and coronal geometries. Overall, 26 AGN in this sample have detected cut-offs in their NuSTAR spectra, with e-folding energies ranging from 42 ± 3 keV (Ark 564) to 720^{+130}_{−190} keV (NGC 5506) when modelled with a cut-off powerlaw. By comparison with the predictions from the MoCA code, Middei et al. (2019) computed a corresponding range of coronal temperature from kT = 21 ± 2 keV to 123^{+9}_{−15} keV (for a slab geometry), with mean coronal values of < kT >= 50 ± 21 keV and < τ > 1.9 ± 0.8. We used the empirical relations derived by these authors between the cut-off energy, photon index, versus the coronal temperature and optical depth (see their equations 2–5 and Figure 6), to deduce the coronal parameters of PDS 456 from the MoCA simulations. Adopting E_{fold} = 50 keV and Γ = 1.9 from the mean 2018 NuSTAR and XMM-Newton spectrum, values of kT ≈ 20 − 25 keV and τ ≈ 3 are derived for PDS 456. The same temperature was derived for a spherical corona, but with a higher depth of τ ∼ 5. This confirms the unusually low temperature of the hard X-ray corona in PDS 456, as inferred from a self consistent physical model.

Indeed, the sensitive imaging hard X-ray observations afforded by NuSTAR have now revealed a small subset of AGN, which also have low cut-off energies. Tortosa et al. (2017) first reported an unusually low high energy cut-off in NuSTAR observations of GRS 1734−292, an AGN which lies close to the Galactic plane. Here a temperature of kT ∼ 12 keV was measured, with a thick coronal depth (with τ ∼ 3 for a slab and τ ∼ 6 for a spherical coronal geometry), similar to the case of PDS 456. As noted above, the NLS1 Ark 564 has a very similar high energy roll-over (Kara et al. 2017), with a measured cut-off energy of E_{fold} = 42±3 keV and a subsequent coronal temperature of kT = 15 ± 2 keV. Another example is the nearby, luminous QSO, 1H 0419−577, where Turner et al. (2018) also reported a temperature of kT = 15 keV for the X-ray corona as measured its NuSTAR spectrum. This AGN also likely accretes at a high rate and like PDS 456, has a steep UV to X-ray SED, dominated by a strong blue-bump. One possibility is that the softer seed photon population of these AGN helps to cool the corona, resulting in a softer hard X-ray spectrum, as was also suggested to account for very soft,

MNRAS 000, 1–18 (2020)

14 J.N. Reeves

Table 5. Multi Epoch SED Model

Parameter Decline Pre-flare Peak flare Post-flare

M_{BH}/10^9M_⊙ 1.0 – – – log(L/L_{Edd})^a −0.38^{+0.06}_{−0.07}^{t t t} R_{cor}/R_g^b 35.0^{+7.5}_{−3.8}^{t t t} kT_{hot} (keV) 13.1^{+2.8}_{−1.8}^{t t t} Γ 1.99 ± 0.01 2.27 ± 0.04 1.75^{+0.08}_{−0.07} 2.16 ± 0.04 F_{PL}^c (in %) 12.5 ± 1.1 8.9^{+1.6}_{−1.3} 17.4 ± 1.9 8.1^{+1.3}_{−1.1} F^d_{2−10 keV} 9.4 ± 0.8 3.1^{+0.5}_{−0.4} 17.5^{+1.8}_{−1.9} 4.1^{+0.6}_{−0.5} F^d_{10−50 keV} 7.2^{+0.7}_{−0.6} 1.3 ± 0.2 22.9^{+2.4}_{−2.5} 2.2 ± 0.3 χ^2_ν 956/889 – – –

aLog ratio of L_{bol} to L_{Edd}.

bCoronal radius, R_{cor}, in units of the gravitational radius. cFraction of accretion power below R_{cor} emitted in the X-ray power-law. dObserved flux, in units of ×10^{−12} erg cm^{−2} s^{−1}. tParameter is tied between the epochs.

X-ray spectrum of the NLS1, RE J1034+396 (Pounds et al. 1995). None the less, these steep spectrum hard X-ray AGN appear to be unusual examples compared to the AGN population as a whole and it is possible that a high Eddington ratio may be the link between them. This may support the trend observed by Ricci et al. (2018), whereby higher Eddington AGN have cooler hard X-ray corona, based on their Swift–BAT results.

6.2 The Coronal Variability

The daily Swift monitoring has made it possible to capture a luminous X-ray flare from PDS 456, with a total energy output exceeding 10^{51} erg. As is seen in both Sections 4 and 5, the flare is only observed in the X-ray band and no significant variability is found in the optical or UV bands. As a result the flare appears intrinsic to the X-ray corona, while the underlying accretion disc emission, which produces the seed photons, remains constant. Furthermore, during the flaring periods, PDS 456 exhibits a pronounced hardening of the spectrum, as seen through changes in the hardness ratio, the Fvar spectrum of the flare and subsequently through the changes in photon index. This is opposite of the behaviour in many radioquiet AGN, whereby the X-ray spectra can become softer with increasing flux and as a result tend to exhibit Fvar spectra which decline towards higher energies. Recent examples of AGN with steep (or soft) Fvar spectra include:- PG 1211+143 (Lobban et al. 2016), IRAS 13224-3809 (Parker et al. 2017), Ark 120 (Lobban et al. 2018) and NGC 3227 (Lobban et al. 2020).

Such rapid X-ray variability in PDS 456 has also been detected in past monitoring observations, e.g. with RXTE and Beppo-SAX (Reeves & Turner 2000; Reeves et al. 2002) and was noted as being unusual for a luminous, high mass, radio-quiet quasar. Reeves et al. (2002) interpreted the earlier X-ray flares seen towards PDS 456 in terms of a cascade of magnetic reconnection events from the accretion disc corona, with a predicted total output reaching as high as 10^{51} erg, in agreement with the value observed here. Similar arguments were also formulated by Merloni & Fabian (2001) in order to explain the X-ray variability of AGN generally.

The flare time-scale has also made it possible to estimate the likely coronal size. The light crossing distance, as derived from the doubling time during the rise of the flare, implies a size of D ∼< 5 × 10^{15} cm, which corresponds to D <∼ 30Rg for a black hole mass of MBH = 10^9 M⊙. The coronal radius deduced from the SED modelling, via the OPTXAGNF model (Section 5.1), is also consistent with this. Furthermore, from behaviour of the flare in Figure 8, we note that the response (increase) in the photon index may appear to be delayed by 1–2 days following the peak of the flare. This could arise as a result of the physical extent of the corona, in order for changes in its physical properties (like the electron temperature) to be transmitted throughout the X-ray emission region.

Changes in the coronal properties, in particular its temperature (θ) and depth (τ ), following an injection of magnetic energy into the corona, could reproduce the pronounced spectral changes during the flare. Both affect the Compton y parameter in the same direction, where y = 4(θ + 4θ^2)τ (τ + 1) (and θ = kT /mec^2); here kT determines the energy transferred per photon scattering and τ sets the average number of scatterings per photon. Either an increase in θ or τ will translate into a harder spectrum and an increase in observed X-ray luminosity. Figure 6 in Middei et al. (2019) also shows how values in the kT versus τ plane in X-ray coronae map on to the observed Γ and E_{fold} for the hard X-ray continuum, as computed from the MoCA code. Comparing their results for a slab geometry, the evolution from Γ = 2.2 to Γ = 1.7 (and back again) during the flare could be explained by a doubling in temperature from kT = 20 keV to kT = 40 keV, for a constant depth of τ ∼ 3. The Compton y parameter increases from y ∼ 2 to y ∼ 5 as a result. This would explain the harder flare spectrum, with the approximate e-folding energy also increasing (from ∼ 50 to ∼ 100 keV), although the Swift XRT spectra are not sensitive to the cut-off. Alternatively an increase in optical depth, e.g. via an injection of pairs into the corona during the flare onset, would also result in similar spectral hardening.

The reverse may happen during the decline phase and the corona could cool due to inverse Compton scattering, if less energy is injected post-flare. The post-flare NuSTAR spectral slices show a noticeable softening of the hard X-ray spectrum following the flare and this might suggest a cooling corona. This can occur on plausible time-scales, for instance Matzeu et al. (2017a) estimate a Compton cooling time-scale of the order of a few tens of kiloseconds in PDS 456, to account for spectral softening following flares seen in Suzaku observations. Regardless, the cooling time-scales are almost certainly shorter than the light crossing time of the corona, as is discussed further below.

6.3 Coronal compactness versus temperature

The measurement of both the temperature and size of the corona in PDS 456 makes it possible to place the QSO on a diagram

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 15

of compactness versus temperature; e.g. as recently compiled by Fabian et al. (2015) for AGN with a variety of hard X-ray cut-off measurements. The compactness parameter is approximately the ratio between the light crossing versus cooling time of the corona and is defined as (e.g. Guilbert et al. 1983):-

l = L R σT mec^3 (1) where L is the luminosity and R the source radius. High compactness values (where l >> 1) imply Compton cooling times much shorter than the light crossing time and electrons will readily cool as they propagate through the corona. For PDS 456, we use a coronal size of 5 × 10^{15} cm, while from the SED in Section 5.1 we calculate a UV to X-ray luminosity (from 5 eV to 100 keV) of LUV−X ∼ 5 × 10^{46} erg s^{−1}. This results in a compactness value of l ∼ 200 for PDS 456. Adopting a lower luminosity will result in a lower compactness; e.g. if only the 0.1–200 keV X-ray band is considered, as per Fabian et al. (2015), then the compactness is an order of magnitude lower, given that the UV luminosity dominates over the X-ray one for PDS 456.

Figure 14 shows the position of PDS 456 on the kT vs compactness (l) plane. The position of most of the AGN compiled in the Fabian et al. (2015) coronal study is marked by the shaded area. In comparison the dashed line shows the electron-positron pair annihilation line, as calculated by Stern et al. (1995) for a slab corona (with similar relations for other geometries) and subsequently adopted in the AGN compilations of Fabian et al. (2015, 2017). To the right (or above) this line, at a high temperature and compactness, runaway pair production can occur and it is noticeable that most AGN with coronal measurements fall in the area just to the left (or below) of the pair annihilation line. As discussed by Fabian et al. (2015), it seems likely that this process acts as a thermostat for the corona, an increase in pairs subsequently leading to a reduction in observed luminosity and temperature.

PDS 456 falls about an order of magnitude below this line in terms of its unusually low temperature, as would other AGN with cool coronae such as Ark 564 and 1H 0419-577. The coronal measurement of PDS 456 corresponds to just one point in time, when the corona appears to be in a cooling phase. Thus an interesting question is how might PDS 456 evolve on this diagram during the course of the flare? To fully test this, multi-epoch broad-band observations (i.e. with XMM-Newton and NuSTAR) would be required to quantify how the coronal temperature varies, via the high energy roll-over. Thus if the temperature increases during the flare onset as the luminosity rises (and Γ hardens), the AGN should move towards the upper-right, closer towards the pair annihilation line and the shaded area in the diagram. This would be as a result of both the temperature and compactness (via the luminosity) increasing. The opposite may happen during the decline (cooling) phase.

Another question is how is the coronal temperature regulated and indeed how pairs can be produced given the lack of sufficient hard X-ray photons for such a cool corona? One possibility is that a significant non-thermal tail exists to the electron population, with the Comptonization arising from a hybrid thermal/non-thermal plasma (e.g. Zdziarski et al. 1993). Indeed, Fabian et al. (2017) discuss this possibility in detail and conclude that some of the coolest coronae are likely to have the most substantial non-thermal components. In this case, increasing the fraction of non-thermal versus thermal leptons in the corona has the effect of shifting the pair line towards lower temperatures (e.g. compare with Figure 3, Fabian et al. 2017),

Figure 14. The position of PDS 456 on the temperature (kT ) vs compactness (l) plane. The dashed blue line shows e^+/e^− annihilation line for a corona with a slab geometry, adapted from Fabian et al. (2015), above which runaway pair production would occur. The light blue shaded area shows the position of the AGN compiled by Fabian et al. (2015), which tend to fall just to the left of the annihilation line, with typical temperatures in the range from 50–200 keV. On the other hand, PDS 456 (diamond point) falls well to the left of the diagram, indicating that it has an unusually cool corona compared to most AGN.

as the pairs are readily produced by the non-thermal tail. This scenario could be compatible for AGN with cool corona like PDS 456.

An alternative non-thermal source of X-ray emission in PDS 456 may be the base of a relativistic jet. Although PDS 456 is classified as a radio-quiet quasar (Simpson et al. 1999; Reeves & Turner 2000), it is not radio-silent (Yun et al. 2004). One possibility is that the jet activity is sporadic and associated with the strong X-ray flare. The X-ray photon index of the variable flare component, of Γ = 1.7, is consistent with the typical values observed in radio-loud quasars (Reeves et al. 2000; Donato et al. 2001) and is considerably harder (by ΔΓ = −0.5) compared to what is usually observed towards PDS 456 (Nardini et al. 2015). However not all the previous X-ray flares seen towards PDS 456 show this behaviour. The lower flux flares seen during the 2017 Swift monitoring (Figure 1) do not exhibit the same change in hardness as per the 2018 flare, while the 2007 Suzaku observations showed a mixture of hard and soft flares (Matzeu et al. 2017a).

Interestingly, recent VLBI observations of PDS 456 show evidence for a compact, relativistic jet (Yang et al. 2019, 2020). The high resolution radio map of Yang et al. (2020) shows a collimated jet structure, which extends up to 500 pc to the NW of the optical nucleus of PDS 456. Further, non collimated, extended radio structure is also observed, which the authors suggest may be associated to thermal shocks produced by the wide angle wind of PDS 456. However, the jet power is low (< 10^{40} ergs s^{−1}), more than five orders of magnitude below the X-ray luminosity of PDS 456 and also by the same factor compared to the radio emission typically observed towards flat-spectrum radio-loud quasars of similar bolometric luminosity (e.g. Figure 10, Donato et al. 2001). Producing a significant contribution towards the X-ray emission from a low power jet in

MNRAS 000, 1–18 (2020)

16 J.N. Reeves

Figure 15. The 2013 Suzaku XIS lightcurve of PDS 456, extracted over the 3–10 keV band. Data from the XIS 0 and XIS 3 CCDs were combined into a single lightcurve. A ×3 increase in flux due to the onset of a pronounced flare is observed 400–450 ks into the observations. Following a gap due to scheduling constraints, PDS 456 returned to a low, quiescent flux state after the flare. The observation was split into 4 segments (colour coded (i) to (iv), black, magenta, red and blue) for spectral analysis.

Figure 16. Time selected spectra of PDS 456 from the 2013 Suzaku observations. As is indicated on Figure 12, these correspond to; (i, black crosses) the pre-flare spectrum, (ii, magenta, open circles) the flare spectrum, (iii, red stars) the initial post-flare spectrum, (iv, blue, filled circles), the final post flare spectrum. The spectra show a substantial increase in opacity of the blueshifted iron K absorption line between 8.5–9 keV, occurring in the post-flare segments (iii) and (iv). This can be modeled by an increase in the wind column density from N_H ∼ 10^{23} cm^{−2} prior to the flare, to N_H ∼ 10^{24} cm^{−2} post-flare. For comparison, the mean 2018 XMM-Newton spectrum is also shown (v, cyan crosses), which is devoid of features. Note the counts spectra have been converted into νF_ν fluxed spectra against a Γ = 2 powerlaw and the best fit XSTAR absorption models (solid lines) are superimposed.

PDS 456 may then be challenging. None the less, future radio vs Xray monitoring could establish any link between the onset of radio activity and the strong X-ray flares seen towards PDS 456.

6.4 The Connection between X-ray Flares and the Wind

The bright 2018 observations of PDS 456 have revealed a featureless X-ray continuum, devoid of strong wind features. Matzeu et al. (2017b) compared the X-ray luminosities for all of the archival XMM-Newton, Suzaku and NuSTAR observations of PDS 456 from 2001–2014; the QSO was found to vary in the range L_{2−10 keV} =

2.8 − 10.5 × 10^{44} erg s^{−1}. In comparison, during the 2018 XMM- Newton and NuSTAR observation, the X-ray luminosity varied between L_{2−10 keV} = 7.4 − 12.4 × 10^{44} erg s^{−1} (Table 4), at the uppermost end of the historic range, while the luminosity at the flare peak in Swift was even higher, at L_{2−10 keV} = 1.7 × 10^{45} erg s^{−1} (Table 3). In contrast, the 2–10 keV luminosity of the 2019 observations, where strong wind features were revealed, were nearly an order of magnitude fainter (L_{2−10 keV} = 2.5 × 10^{44} erg s^{−1}; Reeves et al. 2020). Thus in 2018 the wind features may be weak due to the strong ionizing flux, occurring as a result of the flare. The harder than usual continuum (reaching Γ = 1.7 near the flare peak) could also contribute towards the wind becoming over ionized. In future work, we will investigate further whether the intrinsic difference between the iron K profiles between the 2018 and 2019 epochs can be accounted for via the continuum changes acting upon self consistent disc wind models (Sim et al. 2008, 2010).

6.4.1 Comparison to the 2013 Suzaku Observations

The comparison with a long 2013 Suzaku observation of PDS 456, covering a baseline of over 1 Ms and sampling sufficient variability, provides an opportunity to test the wind variability in response to a major flare. These data were originally studied in Gofford et al. (2014) and Matzeu et al. (2016); here we revisited the lightcurve and time-selected spectra to further investigate the wind variability in response to continuum in the light of the above.

The 3–10 keV lightcurve of the 2013 Suzaku observation is shown in Figure 15. The onset of a substantial flare is seen between 400– 450 ks, with the 3–10 keV flux increasing by a factor of ×3 during this period. Unfortunately, due to a scheduling gap (between 450– 850 ks), the full coverage of the flare was missed. Subsequently, in the latter part of the lightcurve, the flux returned to a quiescent level, with only minor flaring present. As a result, the XIS (0+3) spectra were extracted from four distinct segments:- (i) the pre-flare portion (0–400 ks), (ii) the flare onset (400–450 ks), (iii) an initial postflare period (850–1200 ks) and (iv) a final post-flare period (1200– 1500 ks). To fit the spectra, a baseline model consisting of a powerlaw modified by neutral partial covering absorption (in addition to the Galactic column) was adopted, as is described in detail by Gofford et al. (2014) and Matzeu et al. (2016). To account for the wind absorption, the XSTAR grid adopted for the low flux 2017 SED of PDS 456 was used, as was also was recently applied to the 2019

MNRAS 000, 1–18 (2020)

The flaring corona in PDS 456 17

low flux observations (Reeves et al. 2020). Note the SED of the 2013 Suzaku observations (Fig 5, Matzeu et al. 2016) was very similar to the 2017 epoch (Fig 10, Reeves et al. 2018b), with similar 2–10 keV fluxes and little optical/UV variability.

The resulting spectra and best-fitting models are plotted in Figure 16. It is apparent that substantial wind variability is observed, as is seen through the growth of the strong Fe XXVI Lyα absorption line through segments (i) to (iii) and (iv) between 8.5–9.0 keV in the QSO rest frame. This can be accounted for by an order of magnitude increase in the wind column density, where in the preflare segment (i) a modest NH = 1.4 ± 0.9 × 10^{23} cm^{−2} is measured, which increases significantly post flare to a maximum of NH = 1.4 ± 0.3 × 10^{24} cm^{−2} in segment (iv). In this case a common (i.e. constant) ionization was assumed, where log ξ = 5.1±0.2. Alternatively, an order of magnitude decrease in the ionization (for a constant column) could also model the increase in opacity (see Gofford et al. 2014; Matzeu et al. 2016 for details). However such a strong decrease in ionization is not consistent with the continuum variability, where the post-flare flux is only ∼ 30% lower than the pre-flare level. Furthermore, the increase in flux during the flare would only serve to initially increase the wind ionization, whereas the opposite change occurs. Thus simple ionization changes imposed upon a steady state wind appear a less likely scenario and the wind may be intrinsically variable in column density in this case.

6.4.2 Does coronal activity drive the wind in PDS 456?

Curiously, the ten-fold increase in opacity in 2013 occurred a few days after the initial flare. This might suggest a link between major X-ray flares, such as in 2013 or 2018 and subsequent wind ejection events. One possibility is that the enhanced radiation flux associated with the flares could help drive the wind ejecta. The peak flare X-ray luminosity in 2013 reaches L ∼ 3 × 10^{45} erg s^{−1} (extrapolated over 0.3–50 keV and absorption corrected). The corresponding radiation momentum rate is then ṗ_{rad} ∼ 10^{35} dyne. For the 2013 wind parameters (NH = 10^{24} cm^{−2}, v = 0.25c) and adopting a launch radius equal to the escape radius (Resc = 32Rg ∼ 5 × 10^{15} cm), then the mass outflow rate is Ṁ = μmpΩvoutNHR ∼ 5 × 10^{26} g s^{−1}. The latter estimate is consistent with that of Nardini et al. (2015), for a derived wind solid angle of Ω = 2π in PDS 456. The corresponding wind momentum rate is then ṗw = 4 × 10^{36} dyne. Thus even allowing for an underestimate of the flare luminosity (as the flare peak was not observed in 2013), its radiation thrust is unlikely to be sufficient to drive the emerging wind without a substantial force multiplier factor. The latter appears unlikely for a high ionization wind (e.g. Kraemer et al. 2018).

More plausibly, the wind may be linked to coronal events, leading to the ejection of material through MHD processes (e.g. Fukumura et al. 2015). While this cannot be directly tested on the 2018 observations due to the lack of sensitive X-ray coverage postflare, the 2013 observations do require the emergence of powerful wind ejecta a few days after the initial flare. The dynamical timescale appears plausible, where t_{dyn} = vΔt ∼ 3 × 10^{15} cm; i.e. the crossing times are of the order of tens of gravitational radii, commensurate with the inner disc. Curiously, the coronal size inferred from modelling the 2018 flare is also of the order of the escape radius of the 0.25c wind component. Possible coronal ejection events have been suggested to coincide with strong flares seen in the highly variable Seyfert 1, Mrk 335 (Wilkins et al. 2015), where an ultra fast outflow may be observed in higher flux states of this AGN (Gallo et al. 2019). Early XMM-Newton observations of the NLS1, Mrk 766 (Pounds et al. 2003), also implied a putative link between flares and disc ejecta, with an increase in iron K absorption being associated with periods of flaring activity. Future monitoring of PDS 456 will help capture further flares and sensitive follow-up observations will yield insight into the correspondence of the wind with the coronal flares.

7 ACKNOWLEDGEMENTS

We dedicate this paper to our friend and colleague, Ian George, who has sadly passed away. JR acknowledges support through grants 80NSSC18K1603 and HST-GO-14477. VB acknowledges support from grant 80NSSC20K0793. GM and APL both acknowledge the support of an ESA fellowship. DP acknowledges financial contribution from CNES. EN acknowledges financial contribution from ASI- INAF n.2017-14-H.0. We also thank Chris Done for use of the modified OPTXAGNF model. Based on observations obtained with XMM- Newton, an ESA science mission with instruments and contributions directly funded by ESA Member States and NASA. This work has been partially supported by the ASI-INAF program I/004/11/4

8 DATA AVAILABILITY

The data analysed in this paper are publicly available from the XMM-Newton (http://nxsa.esac.esa.int/) and NASA/HEASARC (https://heasarc.gsfc.nasa.gov) archives.

REFERENCES

Baloković M., et al., 2015, ApJ, 800, 62 Bassani L., et al., 2006, ApJ, 636, L65 Behar E., Kaspi S., Reeves J., Turner T. J., Mushotzky R., O’Brien P. T., 2010, ApJ, 712, 26 Bianchi S., Guainazzi M., Matt G., Fonseca Bonilla N., 2007, A&A, 467, L19 Boissay-Malaquin R., Danehkar A., Marshall H. L., Nowak M. A., 2019, ApJ, 873, 29 Breeveld A. A., Landsman W., Holland S. T., Roming P., Kuin N. P. M., Page M. J., 2011, in McEnery J. E., Racusin J. L., Gehrels N., eds, American Institute of Physics Conference Series Vol. 1358, American Institute of Physics Conference Series. pp 373–376 (arXiv:1102.4717), doi:10.1063/1.3621807 Burrows D. N., et al., 2005, Space Sci. Rev., 120, 165 Cardelli J. A., Clayton G. C., Mathis J. S., 1989, ApJ, 345, 245 Czerny B., Elvis M., 1987, ApJ, 321, 305 Dadina M., 2007, A&A, 461, 1209 Dauser T., Garcia J., Wilms J., Böck M., Brenneman L. W., Falanga M., Fukumura K., Reynolds C. S., 2013, MNRAS, 430, 1694 De Marco B., Ponti G., Cappi M., Dadina M., Uttley P., Cackett E. M., Fabian A. C., Miniutti G., 2013, MNRAS, 431, 2441 Di Matteo T., 1998, MNRAS, 299, L15 Donato D., Ghisellini G., Tagliaferri G., Fossati G., 2001, A&A, 375, 739 Done C., Davis S. W., Jin C., Blaes O., Ward M., 2012, MNRAS, 420, 1848 Fabian A. C., Lohfink A., Kara E., Parker M. L., Vasudevan R., Reynolds C. S., 2015, MNRAS, 451, 4375 Fabian A. C., Lohfink A., Belmont R., Malzac J., Coppi P., 2017, MNRAS, 467, 2566 Fukumura K., Tombesi F., Kazanas D., Shrader C., Behar E., Contopoulos I., 2015, ApJ, 805, 17 Gallo L. C., et al., 2019, MNRAS, 484, 4287 García J., Dauser T., Reynolds C. S., Kallman T. R., McClintock J. E., Wilms J., Eikmann W., 2013, ApJ, 768, 146 García J., et al., 2014, ApJ, 782, 76 Gofford J., et al., 2014, ApJ, 784, 77

MNRAS 000, 1–18 (2020)

18 J.N. Reeves

Gondek D., Zdziarski A. A., Johnson W. N., George I. M., McNaron-Brown K., Magdziarz P., Smith D., Gruber D. E., 1996, MNRAS, 282, 646 Guilbert P. W., Fabian A. C., Rees M. J., 1983, MNRAS, 205, 593 Haardt F., Maraschi L., 1991, ApJ, 380, L51 Haardt F., Maraschi L., 1993, ApJ, 413, 507 Hagino K., Odaka H., Done C., Gand hi P., Watanabe S., Sako M., Takahashi T., 2015, MNRAS, 446, 663 Hamann F., Chartas G., Reeves J., Nardini E., 2018, MNRAS, 476, 943 Harrison F. A., et al., 2013, ApJ, 770, 103 Igo Z., et al., 2020, MNRAS, 493, 1088 Iwasawa K., Taniguchi Y., 1993, ApJ, 413, L15 Jin C., Ward M., Done C., 2012, MNRAS, 422, 3268 Kaastra J. S., et al., 2011, A&A, 534, A37 Kalberla P. M. W., Burton W. B., Hartmann D., Arnal E. M., Bajaja E., Morras R., Pöppel W. G. L., 2005, A&A, 440, 775 Kamraj N., Harrison F. A., Baloković M., Lohfink A., Brightman M., 2018, ApJ, 866, 124 Kara E., Alston W. N., Fabian A. C., Cackett E. M., Uttley P., Reynolds C. S., Zoghbi A., 2016, MNRAS, 462, 511 Kara E., García J. A., Lohfink A., Fabian A. C., Reynolds C. S., Tombesi F., Wilkins D. R., 2017, MNRAS, 468, 3489 Kraemer S. B., Tombesi F., Bottorff M. C., 2018, ApJ, 852, 35 Lobban A. P., Vaughan S., Pounds K., Reeves J. N., 2016, MNRAS, 457, 38 Lobban A. P., Porquet D., Reeves J. N., Markowitz A., Nardini E., Grosso N., 2018, MNRAS, 474, 3237 Lobban A. P., Turner T. J., Reeves J. N., Braito V., Miller L., 2020, MNRAS, 494, 5056 Lohfink A. M., Reynolds C. S., Miller J. M., Brenneman L. W., Mushotzky R. F., Nowak M. A., Fabian A. C., 2012, ApJ, 758, 67 Madejski G. M., et al., 1995, ApJ, 438, 672 Malizia A., Molina M., Bassani L., Stephen J. B., Bazzano A., Ubertini P., Bird A. J., 2014, ApJ, 782, L25 Malkan M. A., Sargent W. L. W., 1982, ApJ, 254, 22 Markowitz A., et al., 2003, ApJ, 593, 96 Mason K. O., et al., 2001, A&A, 365, L36 Matt G., et al., 2014, MNRAS, 439, 3016 Matzeu G. A., Reeves J. N., Nardini E., Braito V., Costa M. T., Tombesi F., Gofford J., 2016, MNRAS, 458, 1311 Matzeu G. A., Reeves J. N., Nardini E., Braito V., Turner T. J., Costa M. T., 2017a, MNRAS, 465, 2804 Matzeu G. A., Reeves J. N., Braito V., Nardini E., McLaughlin D. E., Lobban A. P., Tombesi F., Costa M. T., 2017b, MNRAS, 472, L15 Matzeu G. A., et al., 2020, MNRAS, 497, 2352 McHardy I. M., Koerding E., Knigge C., Uttley P., Fender R. P., 2006, Nature, 444, 730 Merloni A., Fabian A. C., 2001, MNRAS, 328, 958 Middei R., Bianchi S., Marinucci A., Matt G., Petrucci P. O., Tamborra F., Tortosa A., 2019, A&A, 630, A131 Molina M., et al., 2009, MNRAS, 399, 1293 Mushotzky R. F., Done C., Pounds K. A., 1993, ARA&A, 31, 717 Nardini E., et al., 2015, Science, 347, 860 Parker M. L., et al., 2017, MNRAS, 469, 1553 Parker M. L., Reeves J. N., Matzeu G. A., Buisson D. J. K., Fabian A. C., 2018a, MNRAS, 474, 108 Parker M. L., Miller J. M., Fabian A. C., 2018b, MNRAS, 474, 1538 Perola G. C., Matt G., Cappi M., Fiore F., Guainazzi M., Maraschi L., Petrucci P. O., Piro L., 2002, A&A, 389, 802 Petrucci P. O., et al., 2001, ApJ, 556, 716 Porquet D., et al., 2018, A&A, 609, A42 Porquet D., et al., 2019, A&A, 623, A11 Pounds K. A., Done C., Osborne J. P., 1995, MNRAS, 277, L5 Pounds K. A., Reeves J. N., Page K. L., Wynn G. A., O’Brien P. T., 2003, MNRAS, 342, 1147 Reeves J. N., Turner M. J. L., 2000, MNRAS, 316, 234 Reeves J. N., O’Brien P. T., Vaughan S., Law-Green D., Ward M., Simpson C., Pounds K. A., Edelson R., 2000, MNRAS, 312, L17 Reeves J. N., Wynn G., O’Brien P. T., Pounds K. A., 2002, MNRAS, 336, L56

Reeves J. N., O’Brien P. T., Ward M. J., 2003, ApJ, 593, L65 Reeves J. N., et al., 2009, ApJ, 701, 493 Reeves J. N., et al., 2014, ApJ, 780, 45 Reeves J. N., Porquet D., Braito V., Nardini E., Lobban A., Turner T. J., 2016, ApJ, 828, 98 Reeves J. N., Braito V., Nardini E., Lobban A. P., Matzeu G. A., Costa M. T., 2018a, ApJ, 854, L8 Reeves J. N., Braito V., Nardini E., Hamann F., Chartas G., Lobban A. P., O’Brien P. T., Turner T. J., 2018b, ApJ, 867, 38 Reeves J. N., Braito V., Chartas G., Hamann F., Laha S., Nardini E., 2020, ApJ, 895, 37 Ricci C., et al., 2018, MNRAS, 480, 1819 Roming P. W. A., et al., 2005, Space Sci. Rev., 120, 95 Shakura N. I., Sunyaev R. A., 1973, A&A, 500, 33 Sim S. A., Long K. S., Miller L., Turner T. J., 2008, MNRAS, 388, 611 Sim S. A., Miller L., Long K. S., Turner T. J., Reeves J. N., 2010, MNRAS, 404, 1369 Simpson C., Ward M., O’Brien P., Reeves J., 1999, MNRAS, 303, L23 Stern B. E., Poutanen J., Svensson R., Sikora M., Begelman M. C., 1995, ApJ, 449, L13 Tamborra F., Matt G., Bianchi S., Dovčiak M., 2018, A&A, 619, A105 Titarchuk L., 1994, ApJ, 434, 570 Torres C. A. O., Quast G. R., Coziol R., Jablonski F., de la Reza R., Lépine J. R. D., Gregório-Hetem J., 1997, ApJ, 488, L19 Tortosa A., et al., 2017, MNRAS, 466, 4193 Tortosa A., Bianchi S., Marinucci A., Matt G., Petrucci P. O., 2018, A&A, 614, A37 Turner T. J., Reeves J. N., Braito V., Costa M., 2018, MNRAS, 476, 1258 Vaughan S., Edelson R., Warwick R. S., Uttley P., 2003, MNRAS, 345, 1271 Vaughan S., Fabian A. C., Ballantyne D. R., De Rosa A., Piro L., Matt G., 2004, MNRAS, 351, 193 Wilkins D. R., Gallo L. C., Grupe D., Bonson K., Komossa S., Fabian A. C., 2015, MNRAS, 454, 4440 Wilms J., Allen A., McCray R., 2000, ApJ, 542, 914 Yang J., An T., Zheng F., Baan W. A., Paragi Z., Mohan P., Zhang Z., Liu X., 2019, MNRAS, 482, 1701 Yang J., Paragi Z., Nardini E., Baan W. A., Fan L., Mohan P., Varenius E., An T., 2020, arXiv e-prints, p. arXiv:2008.05194 Yaqoob T., Turner T. J., Tatum M. M., Trevor M., Scholtes A., 2016, MNRAS, 462, 4038 Yun M. S., Reddy N. A., Scoville N. Z., Frayer D. T., Robson E. I., Tilanus R. P. J., 2004, ApJ, 601, 723 Zdziarski A. A., Lightman A. P., Maciolek-Niedzwiecki A., 1993, ApJ, 414, L93 Zdziarski A. A., Johnson W. N., Magdziarz P., 1996, MNRAS, 283, 193 Zycki P. T., Done C., Smith D. A., 1999, MNRAS, 305, 231 den Herder J. W., et al., 2001, A&A, 365, L7

This paper has been typeset from a TEX/L^ATEX file prepared by the author.

MNRAS 000, 1–18 (2020)